目錄

簡介

必要條件

需求

採用元件

拓撲

問題

升級程式

簡介

本文描述如何在Catalyst 9400 StackWise虛擬連結(SVL)設定上升級複雜可程式化邏輯裝置(CPLD)版本的分步程式。

必要條件

需求

思科建議您瞭解Catalyst 9400上的Stackwise虛擬安裝和配置的基本知識。

採用元件

本文檔中的資訊基於PID： C9404R軟體和硬體版本。

模組:

C9400-SUP-1XL

C9400-LC-24XS

軟體版本：17.09.4a

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

拓撲

問題

在Catalyst 9400中，在某些罕見情況下升級Cisco IOS®版本時，裝置的CPLD版本未升級。特定版本的CPLD和Rommon版本可以從https://www.cisco.com/c/en/us/td/docs/switches/lan/catalyst9400/software/release/17-13/release_notes/ol-17-13-9400/rommon_versions.html 連結進行檢查。

請參閱以下代碼段：

9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:05:00

1/0       C9400-LC-24XS       ok                    00:00:56

2         C9400-SUP-1XL       ok                    00:05:00

2/0       C9400-SUP-1XL       ok                    00:00:53

R0                            ok, active            00:05:00

P1        C9400-PWR-3200AC    ok                    00:04:38

P9        C9404-FAN           ok                    00:04:37

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:04:57

1/0       C9400-LC-24XS       ok                    00:00:08

2         C9400-SUP-1XL       ok                    00:04:57

2/0       C9400-SUP-1XL       ok                    00:00:07

R0                            ok, standby           00:04:57

P1        C9400-PWR-3200AC    ok                    00:04:35

P9        C9404-FAN           ok                    00:04:33

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

2         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

在這種情況下，備用的CPLD在升級後沒有升級。

升級程式

步驟 1. 請使用show redundacny驗證SVL是否正常運行。

9400-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = Switch 1

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Peer Processor Information :

----------------------------

Standby Location = Switch 2 >>>>>>>>>>Switch 2 is standby

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

步驟 2.要升級CPLD版本，請使用以下命令：

upgrade hw-programmable cpld filename bootflash: switch {1-2} RP active

9400-1#upgrade hw-programmable cpld filename bootflash: switch 2 R0

Firmware upgrade requires the SVL member to reload. Do you want to proceed?(y/n)y

Use cli 'redundancy reload peer' to upgrade the firmware on peer

9400-1#redundancy reload peer

Stack is in Half ring setup; Reloading a switch might cause stack split

Reload peer [confirm]

Preparing to reload peer

步驟 3.這裡您可以看到CPLD正在升級：

Chassis 2 reloading, reason - Admin reload CLI

May 4 01:34:23.829: %PMAN-5-EXITACTION: R0/0: pvp:

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Current ROMMON image : Primary

Last reset cause : SoftwareResetTrig

C9400-SUP-1XL platform with 16777216 Kbytes of main memory

Starting System FPGA Upgrade .....

Programming SPI Primary image is completed.

Authenticating SPI Primary image .....

IO FPGA image is authenticated successfully.

Programming Header .....

FPGA HDR file size: 12

Image page count: 1

Verifying programmed header .....

Verifying programmed header .....

Programmed header is verified successfully.

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Power Cycle is needed to complete System firmware upgrade.

It takes ~7 mins to upgrade firmwre after power cycle starts.

DO NOT DISRUPT AFTER POWER C

Initializing Hardware......

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

步驟 4.確認CPLD是否在待機狀態下升級：

F241.24.02-9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:38

1/0       C9400-LC-24XS       ok                    00:25:34

2         C9400-SUP-1XL       ok                    00:29:38

2/0       C9400-SUP-1XL       ok                    00:25:31

R0                            ok, active            00:29:38

P1        C9400-PWR-3200AC    ok                    00:29:16

P9        C9404-FAN           ok                    00:29:14

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:35

1/0       C9400-LC-24XS       ok                    00:00:11

2         C9400-SUP-1XL       ok                    00:29:35

2/0       C9400-SUP-1XL       ok                    00:00:10

R0                            ok, standby           00:29:35

P1        C9400-PWR-3200AC    ok                    00:29:13

P9        C9404-FAN           ok                    00:29:11

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

2 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

步驟 5.在這種情況下，如果需要升級活動交換機的CPLD版本，您必須執行以下步驟：

1. Do a switchover

9400-1#redundency force-switchover                             >>>>>>>>>>Initially Switch 1 is active and Switch 2 is standby.

After switchover it is vise-versa

2. Upgrade the CPLD version of previous active [now standby] with the command:

9400-1#upgrade hw-programmable cpld filename bootflash: switch 1 R0

3. Reload the the standby

9400-1#redundancy reload peer