目錄

簡介

支援的HX系統

使用時機

使用方法

分析工具輸出 — 後續步驟

CLI命令

簡介

本文檔介紹在Hyperflex HyperV群集上運行超級檢查運行狀況檢查和預升級工具的過程。此工具是對hyperflex系統進行主動自檢以確保其穩定性和彈性的實用程式。它可幫助自動執行hyperflex系統上的運行狀況和升級前檢查清單，以在hyperflex升級和維護操作期間節省時間。

注意：在使用工具之前，請始終下載該工具的最新版本。由於該工具經常增強，因此使用舊版本可能導致丟失重要檢查。

支援的HX系統

- Hyperflex版本 — 3.0、3.5、4.0

- Hyperflex標準集群

- 僅在Microsoft Hyper-V中的Hyperflex群集上受支援

附註：如何在hyperflex ESXi群集上運行超級檢查，請訪問 —

https://www.cisco.com/c/en/us/support/docs/hyperconverged-infrastructure/hyperflex-hx-data-platform/214101-hypercheck-hyperflex-health-pre-upgr.html

使用時機

- 在Hyperflex升級之前。

- 維護視窗前後的Hyperflex運行狀況檢查

- 識別故障驅動器/磁碟。

- 使用Cisco TAC時

- 隨時主動進行運行狀況檢查。

使用方法

步驟1.從此處的Cisco github devnet帳戶下載Hyperflex-Hypercheck.zip。請獲得最新副本，其中包含最新的改進和更新。

附註：僅使用從Cisco github devnet帳戶下載的指令碼。

步驟2.使用群集管理IP(CMIP)將其上傳到儲存控制器VM(SCVM)。

使用首選方法 — scp/sftp/ftp/tftp — 將Hypercheck-HyperV-master.zip複製到/tmp目錄

對於MAC:

從CLI執行SCP（請確認Hyperflex-Hypercheck.zip位於您運行scp的同一資料夾中）

# scp Hypercheck-HyperV-master.zip root@<scvm-eth0:mgmtip>:/tmp/

使用以下資訊確定HX環境中的群集管理IP - Hyperflex手冊

對於Windows:

我們可以使用WINSCP傳輸檔案，如下所示 —

步驟3.擷取Hypercheck-HyperV-master.zip的內容

鍵入cd /tmp以更改為/tmp目錄

root@hyper11-stc:~# cd /tmp/

鍵入unzip Hypercheck-HyperV-master.zip 解壓縮檔案

root@hyper11-stc:/tmp# unzip Hypercheck-HyperV-master.zip

Archive: Hypercheck-HyperV-master.zip

67f0d63639785f5c18b8ed35ff789f748157e944

creating: Hypercheck-HyperV-master/

inflating: Hypercheck-HyperV-master/README.md

inflating: Hypercheck-HyperV-master/ReadMe.txt

inflating: Hypercheck-HyperV-master/TestInfo.txt

inflating: Hypercheck-HyperV-master/VHXTool.py

inflating: Hypercheck-HyperV-master/prettytable.py

inflating: Hypercheck-HyperV-master/progressbar.py

root@hyper11-stc:/tmp#

步驟4.執行VHXTool Python指令碼

鍵入cd Hypercheck-HyperV-master以轉到Hypercheck-HyperV-master目錄

root@hyper11-stc:/tmp# cd Hypercheck-HyperV-master

鍵入python VHXTool.py執行指令碼

root@hyper11-stc:/tmp/Hypercheck-HyperV-master# python VHXTool.py

步驟5.出現提示時輸入HyperV管理員使用者名稱、密碼和群集根密碼

Please enter below info of Hyper-V Cluster:

Enter the Hyper-V Username(Ex: Domain\Username):

Enter the Hyper-V Password:

Enter the HX-Cluster Root Password:

附註：要停止指令碼執行，請使用鍵[CTRL+Z]，該鍵將立即停止

步驟6.Hyperflex-Hypercheck工具將提示您詢問環境中是否有裸機安裝了Active Directory。

附註：無論在此處提供什麼輸入（是/否），指令碼將繼續運行。以下消息將顯示為警告消息。

「請注意，所有Active Directory伺服器/DNS伺服器不應巢狀在Hyperflex資料儲存區虛擬機器中。您的環境中應始終存在物理（裸機）AD」

步驟7. Hyperflex-Hypercheck工具開始其檢查。根據群集中的已收斂節點數，執行過程大約需要5到10分鐘

步驟8.瞭解已執行的輸出/檢查

以下檢查由Hyperflex-Hyperchecktool執行

Hyperflex Checks: (Below checks are performed on all the storage controller VMs)

Cluster services check - Verifies the status of storfs, stMgr and stNodeMgr services.

Enospc state check - Checks if the cluster space usage is above the warning threshold or no.

Zookeeper check - Checks whether the Zookeeper is running or no.

Exhibitor check - Verfies the status of the Exhibitor service which manages the ZK.

System Disks Usage - Checks if /sda1, var/stv and /var/zookeeper is less than 80%.

HDD health check - Reports if you have any blacklisted disk in your cluster.

DNS check - Checks whether DNS is configured and reachable.

Timestamp check - Checks if all the controller VMs have the exact same time.

NTP sync check - Checks whether NTP is reachable from the storage controller VMs and synced.

Check package & versions - Checks for packages and versions on Storage Controller VMs.

Check Iptables count - Checks for Iptables count on and ensure it is same on all Storage Controller VMs.

Cache Disks check     - Checks the number of Cache Disks.

Extra pnodes check - Looks for any extra/duplicate pnode entries in the cluster.

Memory usage check - Checks for available memory more than 2GB.

Incidence of OOM in the log file - Checks for any previous incidence of Out Of Memory Condition.

Check permissions for /tmp -  Checks if the /tmp permissions are set correctly.

Check Cluster Access Policy - Checks the Configured Cluster Access Policy

CMIP Hostname – Check if the clustermanagementip has hostname defined

Check domain join health – checking domain join health of the node.

HYPER-V Checks: (Below checks are performed on each HyperV node)

Hostname – check and print the hostname of the node.

Cluster Failover – check and ensure cluster failover is enabled.

Hyper-V Role – Check and ensure HyperV role is enabled.

Node State - Checks the state of the node.

Network Interfaces State - Checks the Network Interfaces State of the node.

Remote Management Enabled - Check if the Remote Management is enabled on the node.

MTU for Storage Data Network - Check MTU for the Storage Data Network of the node.

Domain and forest details -  Check the Domain and forest details of the cluster.

Host file entries- Check if the host file have correct entries.

Check Adapter details - Check Adapter details of the node.

Drivers test - Check the status of minifilter drivers.

SMB Test - Checking SMB Path reachability from the node.

VMMS – Checking the VMMS Service status

步驟9.獲取指令碼輸出的報告。您可以獲得如下所示的內容

超檢查報告tar檔案儲存在/var/log/springpath 和/tmp/Hypercheck-HyperV-master下。因此，您可以從/var/log/springpath 或/tmp/Hypercheck-HyperV-master下下載tar捆綁包。或者，您只需生成並上載storfs支援捆綁包，該捆綁包還將包含超級檢查報告tar。

超級檢查報告tar檔案儲存在/var/log/springpath下。

報告tar檔案示例 — VHX_Report_2020_08_29_08_40_20.tar被複製到路徑：/var/log/springpath

鍵入ls -l | grep VHX_Report檢視Hyperflex-Hypercheck工具建立的檔案

Under /var/log/springpath,

root@hyper11-stc:/var/log/springpath# ls -l | grep VHX_Report

-rw-r--r--  1 root    root    370K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20.tar

root@hyper10-stc:/var/log/springpath#

Under /tmp/Hypercheck-HyperV-master

root@hyper11-stc:/tmp/Hypercheck-HyperV-master# ls -ltrh

total 576K

-rwxrwxrwx 1 root root  53K Apr 10  2018 prettytable.py

-rwxrwxrwx 1 root root 1.4K Jan 22  2019 progressbar.py

-rwxrwxrwx 1 root root 1.6K Aug 28 00:27 ReadMe.txt

-rwxrwxrwx 1 root root  75K Aug 28 06:32 VHXTool.py

-rwxrwxrwx 1 root root 3.5K Aug 28 06:46 TestInfo.txt

-rw-r--r-- 1 root root  49K Aug 29 08:40 prettytable.pyc

-rw-r--r-- 1 root root 1.8K Aug 29 08:40 progressbar.pyc

drwxr-xr-x 2 root root 4.0K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20

-rw-r--r-- 1 root root 370K Aug 29 08:47 VHX_Report_2020_08_29_08_40_20.tar

Hypercheck日誌包中的檔案和日誌 —

root@hyper11-stc: tmp/Hypercheck-HyperV-master # cd VHX_Report_2020_08_29_08_40_20

root@hyper11-stc: tmp/Hypercheck-HyperV-master # ls -ltrh

-rw-r--r-- 1 root root  27K Aug 29 08:44 VHX_Report_10.8.16.65.txt

-rw-r--r-- 1 root root  27K Aug 29 08:45 VHX_Report_10.8.16.66.txt

-rw-r--r-- 1 root root  27K Aug 29 08:47 VHX_Report_10.8.16.67.txt

-rw-r--r-- 1 root root 101K Aug 29 08:47 VHX_Tool_Main_Report_2020-08-29_08-47-43_HYPER11-SMB.txt

-rw-r--r-- 1 root root 186K Aug 29 08:47 VHXTool_2020-08-29_08-40-20.log

步驟10:匯出HX_YYYY_MM_DD_HH_MM_SS.tar並與TAC共用。

使用首選方法從SCVM使用scp/sftp/ftp/tftp匯出超級檢查日誌，或者只下載包含VHX_Report tar捆綁包的storfs支援捆綁包。

步驟11. 3節點集群的VHXTool輸出示例

Please enter below info of Hyper-V Cluster:

Enter the Hyper-V Username(Ex: Domain\Username): hx.local\hxadmin

Enter the Hyper-V Password:

Enter the HX-Cluster Root Password:

Is the Active Directory installed on Physical (bare metal) in your Environment (Enter Yes/No): yes

Note: Please be aware that all Active Directory Servers/ DNS Servers should not be nested in Hyperflex datastore virtual machines. There should always be physical (bare metal) ADs in your environment.

SMB Name: HYPER10-SMB

SSH connection established to HX Node: 10.8.16.65

SSH connection established to HX Node: 10.8.16.66

SSH connection established to HX Node: 10.8.16.67

HX Cluster Nodes:

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| Nodes | Eth0 IP Address | HostName    | Eth1 IP Address | Eth1 MTU | Cluster Mgmt IP          | Cluster Data IP | CRM Master |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 1     | 10.8.16.65      | hyper10-stc | 10.8.18.65      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 2     | 10.8.16.66      | hyper11-stc | 10.8.18.66      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

| 3     | 10.8.16.67      | hyper12-stc | 10.8.18.67      | 9000     | HYPER10-MGMT-IP.hx.local | 10.8.18.69      | 10.8.18.67 |

+-------+-----------------+-------------+-----------------+----------+--------------------------+-----------------+------------+

HX Controller: 10.8.16.65

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.66

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.67

Cluster services check      [########################] COMPLETE

ZooKeeper & Exhibitor check [########################] COMPLETE

HDD health check            [########################] COMPLETE

Pre-Upgrade Check           [########################] COMPLETE

Hyper-V check               [########################] COMPLETE

HX Controller: 10.8.16.65

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper10-stc                                            | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER10-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

HX Controller: 10.8.16.66

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper11-stc                                           | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER11-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

HX Controller: 10.8.16.67

Test Summary:

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Name                             | Result                                                        | Comments                                                       |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cluster services check           | PASS                                                          | Checks storfs, stMgr, sstNodeMgr service running on each node. |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Enospc state check               | PASS                                                          | Checks if the cluster storage utilization is above threshold.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Zookeeper check                  | PASS                                                          | Checks if Zookeeper service is running.                        |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Exhibitor check                  | PASS                                                          | Checks if Exhibitor in running.                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| System Disks Usage               | PASS                                                          | Checks if /sda1, var/stv and /var/zookeeper is less than 80%.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| HDD health check                 | PASS                                                          | Checks if any drive is in blacklisted state.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| DNS check                        | PASS                                                          | Checks if configured DNS is reachable.                         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Timestamp check                  | PASS                                                          | Checks if the timestamp is same across all Nodes.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| NTP sync check                   | PASS                                                          | Checks if the NTP is synced with NTP server.                   |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check package & versions         | PASS                                                          | Checks for count and version of HX packages on each node.      |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Iptables count             | PASS                                                          | Checks if the IP Table count matches on all nodes.             |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Cache Disks check                | PASS                                                          | Checks the number of Cache Disks.                              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Extra pnodes check               | PASS                                                          | Checks for any stale Node entry.                               |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Memory usage check               | PASS                                                          | Checks for available memory more than 2GB.                     |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Incidence of OOM in the log file | PASS                                                          | Checks for any previous incidence of Out Of Memory Condition.  |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check permissions for /tmp       | PASS                                                          | Checks if the /tmp permissions are set correctly.              |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check Cluster Access Policy      | Lenient                                                       | Checks the Configured Cluster Access Policy                    |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Check CMIP Hostname              | PASS                                                          | Check if the clustermanagementip has hostname defined.         |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

| Domain join health               | Name = hyper12-stc                                           | Checking domain join health of the Node.                       |

|                                  | Domain = HX.LOCAL                                             |                                                                |

|                                  | Distinguished Name = CN=HYPER12-STC,OU=HYPER10,DC=hx,DC=local |                                                                |

+----------------------------------+---------------------------------------------------------------+----------------------------------------------------------------+

################################################################################

Hyper-V check:

################################################################################

Hyper-V Clusters: 10.8.16.61, 10.8.16.62, 10.8.16.63

Hyper-V Host: 10.8.16.61

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                              | Comments                                                    |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER10                                                                             | Check if the hostname is defined.                           |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                           | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                           | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                                | Check the Node State.                                       |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                                | Check the Network Interfaces State.                         |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                                | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                                | Check MTU for the Storage Data Network.                     |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                               | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                  |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                             |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                    |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                               |                                                             |

|                                          | Status                  : OK                                                        |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                     | Check if the host file have correct entries.                |

|                                          | 10.8.18.65     HYPER10-SMB.hx.local                                                 |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                 |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address      | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------      |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.61}     |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.61}     |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.61}     |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.61}     |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.84.129} |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                  | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                  |                                                             |

|                                          | CsvNSFlt                                1       404900         0                    |                                                             |

|                                          | CsvFlt                                  0       404800         0                    |                                                             |

|                                          | CCFFilter                               1       261160         0                    |                                                             |

|                                          | storqosflt                              1       244000         0                    |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                    |                                                             |

|                                          | wcifs                                   0       189900         0                    |                                                             |

|                                          | CldFlt                                  0       180451         0                    |                                                             |

|                                          | FileCrypt                               0       141100         0                    |                                                             |

|                                          | svhdxflt                                0       135100         0                    |                                                             |

|                                          | luafv                                   1       135000         0                    |                                                             |

|                                          | npsvctrig                               1        46000         0                    |                                                             |

|                                          | Wof                                     1        40700         0                    |                                                             |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                                | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                                | Checking SMB reachability of node.                          |

+------------------------------------------+-------------------------------------------------------------------------------------+-------------------------------------------------------------+

Hyper-V Host: 10.8.16.62

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                                      | Comments                                                    |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER11                                                                                     | Check if the hostname is defined.                           |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                                   | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                                   | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                                        | Check the Node State.                                       |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                                        | Check the Network Interfaces State.                         |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                                        | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                                        | Check MTU for the Storage Data Network.                     |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                                       | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                          |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                                     |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                            |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                                       |                                                             |

|                                          | Status                  : OK                                                                |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                             | Check if the host file have correct entries.                |

|                                          | 10.8.18.66     HYPER10-SMB.hx.local                                                         |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                         |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address              | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------              |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.70, 10.8.16.62} |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.62}             |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.62}             |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.62}             |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.247.198}        |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                          | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                          |                                                             |

|                                          | CsvNSFlt                                1       404900         0                            |                                                             |

|                                          | CsvFlt                                  0       404800         0                            |                                                             |

|                                          | CCFFilter                               1       261160         0                            |                                                             |

|                                          | storqosflt                              2       244000         0                            |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                            |                                                             |

|                                          | wcifs                                   0       189900         0                            |                                                             |

|                                          | CldFlt                                  0       180451         0                            |                                                             |

|                                          | FileCrypt                               0       141100         0                            |                                                             |

|                                          | svhdxflt                                0       135100         0                            |                                                             |

|                                          | luafv                                   1       135000         0                            |                                                             |

|                                          | npsvctrig                               1        46000         0                            |                                                             |

|                                          | Wof                                     1        40700         0                            |                                                             |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                                        | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                                        | Checking SMB reachability of node.                          |

+------------------------------------------+---------------------------------------------------------------------------------------------+-------------------------------------------------------------+

Hyper-V Host: 10.8.16.63

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Name                                     | Status                                                                             | Comments                                                    |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| HostName                                 | HYPER12                                                                            | Check if the hostname is defined.                           |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Cluster Failover                         | Installed                                                                          | Check if the Failover Cluster Manager feature is installed. |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Hyper-V Role                             | Installed                                                                          | Check if the Hyper-V Manager feature is installed.          |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Node State                               | PASS                                                                               | Check the Node State.                                       |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Network Interfaces State                 | PASS                                                                               | Check the Network Interfaces State.                         |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Remote Management Enabled                | PASS                                                                               | Check if the Remote Management is enabled on the node.      |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| MTU for Storage Data Network             | 9000                                                                               | Check MTU for the Storage Data Network.                     |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check the Domain and forest details      | Description             : HXDC-DOMAIN                                              | Check the Domain and forest details of the cluster.         |

|                                          | DnsForestName           : hx.local                                                 |                                                             |

|                                          | DomainControllerAddress : \\10.8.12.254                                            |                                                             |

|                                          | DomainControllerName    : \\HXDC                                                   |                                                             |

|                                          | DomainName              : HXDC-DOMAIN                                              |                                                             |

|                                          | Status                  : OK                                                       |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check host file entries                  |                                                                                    | Check if the host file have correct entries.                |

|                                          | 10.8.18.67     HYPER10-SMB.hx.local                                                |                                                             |

|                                          | 10.8.18.69     HYPER10-SMB.hx.local                                                |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Check Adapter details                    | InterfaceAlias                 InterfaceDescription                IPv4Address     | Check Adapter details of the node.                          |

|                                          | --------------                 --------------------                -----------     |                                                             |

|                                          | vswitch-hx-inband-mgmt         Hyper-V Virtual Ethernet Adapter    {10.8.16.63}    |                                                             |

|                                          | vswitch-hx-storage-data        Hyper-V Virtual Ethernet Adapter #2 {10.8.18.63}    |                                                             |

|                                          | vswitch-hx-vm-network          Hyper-V Virtual Ethernet Adapter #3 {10.8.19.63}    |                                                             |

|                                          | vswitch-hx-livemigration       Hyper-V Virtual Ethernet Adapter #4 {10.8.17.63}    |                                                             |

|                                          | vEthernet (New Virtual Switch) Hyper-V Virtual Ethernet Adapter #5 {169.254.18.96} |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Drivers test                             | Filter Name                     Num Instances    Altitude    Frame                 | Check the status of minifilter drivers.                     |

|                                          | ------------------------------  -------------  ------------  -----                 |                                                             |

|                                          | CsvNSFlt                                1       404900         0                   |                                                             |

|                                          | CsvFlt                                  0       404800         0                   |                                                             |

|                                          | CCFFilter                               1       261160         0                   |                                                             |

|                                          | storqosflt                              2       244000         0                   |                                                             |

|                                          | ResumeKeyFilter                         0       202000         0                   |                                                             |

|                                          | wcifs                                   0       189900         0                   |                                                             |

|                                          | CldFlt                                  0       180451         0                   |                                                             |

|                                          | FileCrypt                               0       141100         0                   |                                                             |

|                                          | svhdxflt                                0       135100         0                   |                                                             |

|                                          | luafv                                   1       135000         0                   |                                                             |

|                                          | npsvctrig                               1        46000         0                   |                                                             |

|                                          | Wof                                     1        40700         0                   |                                                             |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| Virtual Machine Management service check | PASS                                                                               | Checking if VMMS service is Up and Running.                 |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

| SMB Test                                 | PASS                                                                               | Checking SMB reachability of node.                          |

+------------------------------------------+------------------------------------------------------------------------------------+-------------------------------------------------------------+

Main Report File: VHX_Tool_Main_Report_2020-09-13_09-49-38_HYPER10-SMB.txt

Report tar file: VHX_Report_2020_09_13_21_42_18.tar

Report file copied to path: /var/log/springpath

Release Notes:

https://www.cisco.com/c/en/us/support/hyperconverged-systems/hyperflex-hx-data-platform-software/products-release-notes-list.html

Upgrade Guides:

https://www.cisco.com/c/en/us/support/hyperconverged-systems/hyperflex-hx-data-platform-software/products-installation-guides-list.html

Note:

1) Hypercheck doesnot perform FAILOVER TEST, so please ensure that the upstream is configured for network connectivity for JUMBO or NORMAL MTU size as needed.

分析工具輸出 — 後續步驟

- 該工具自動執行在Hyperflex系統上運行手動命令的流程。

- 如果工具運行OK並在所有測試上提供PASS/COMPLETED。HX系統適用於指令碼執行的所有檢查。

- 如果工具在某些檢查中失敗或者未成功運行，可以使用CLI命令（下面列出）在Hyperflex系統上執行與指令碼「手動」相同的檢查。

- 此工具不檢查任何舊/新/開放/解決的警告，因此強烈建議在任何升級或維護活動之前檢視Hyperflex發行說明和升級指南。

附註： 不要 開啟TAC案例，因為指令碼無法運行。請手動運行命令，找出問題並開啟SR找到問題。

CLI命令

在Hyperflex SCVM上 —

ssh to All Hyperflex SCVMs-

# service_status.sh

# sysmtool --ns cluster --cmd enospcinfo

# echo srvr | nc 0 2181

# pidof exhibitor

# sysmtool --ns disk --cmd list | grep -i blacklisted | wc -l

# stcli services dns show (and ping the IPs listed)

# date ; compare the time on all SCVMs. They should ideally be identical

# stcli services ntp show

# sysmtool --ns cleaner --cmd status

# ntpq -p -4

# dpkg -l | grep -i springpath

# iptables -L -n | wc -l

# hxcli cluster info

# df -h ; check that /var/stv should not be more than 80% used

# zgrep -i “out of memory” /var/log/springpath/debug-storfs.*

# domainjoin-cli query

在HyperV節點上 —

Open the Windows Powershell

# Get-ClusterNode

# Get-ClusterNetwork

# Get-Service WinRM, Make sure windows remote management service is running

# Get-Content $env:SystemRoot\System32\Drivers\etc\hosts , Make sure you have correct host entried

# test-path\\<smb-share name fqdn>\<datastorename> This should return true ,if not datastore is not reachable via smb.

# Get-NetIPConfiguration

# Get-NetIPInterface -AddressFamily IPv4 -InterfaceAlias vswitch-hx-storage-data | select NlMtu*