目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

組態

驗證

使用者端疑難排解

相關資訊

簡介

本檔案將說明第2層通道通訊協定網路伺服器(LNS)透過虛擬專用撥接網路(VPDN)將一個IPv6首碼委派給在第2層通道通訊協定存取集中器(LAC)和LNS之間建立的使用者端路由器的情況下的首碼委派組態範例。

必要條件

需求

思科建議您瞭解UP的端到端第1層連線

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

客戶端配置：

下面是客戶端路由器上的配置示例：

ipv6 unicast-routing

!

interface Ethernet0/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ipv6 address FE80::1234 link-local

ipv6 address autoconfig

ipv6 enable

no ipv6 nd ra suppress

ipv6 dhcp client pd my-prefix1

no keepalive

ppp chap hostname test@cisco.com

ppp chap password 0 cisco

no cdp enable

end

!

interface FastEthernet0/2

description -  This interface is connected to the LAN segment

no ip address

ipv6 address my-prefix1 ::1/64

ipv6 enable

LAC配置：

LAC上的配置示例如下所示：

hostname LAC

!

vpdn enable

!

vpdn-group 1

request-dialin

protocol l2tp

domain cisco.com

initiate-to ip 192.168.1.2

source-ip 192.168.1.1

no l2tp tunnel authentication

!

bba-group pppoe global

virtual-template 1

!

interface Ethernet0/0

no ip address

pppoe enable group global

!

interface Ethernet1/0

ip address 192.168.1.1 255.255.255.0

!

interface Virtual-Template1

no ip address

ppp authentication chap

!

LNS配置：

LNS上的配置示例如下所示：

ipv6 unicast-routing

!

vpdn enable

!

vpdn-group 1

accept-dialin

protocol l2tp

virtual-template 1

terminate-from hostname LAC

vpn vrf test

lcp renegotiation on-mismatch

no l2tp tunnel authentication

!

username test@cisco.com password cisco

interface Ethernet1/0

ip vrf forwarding test

ip address 192.168.1.2 255.255.255.0

negotiation auto

cdp enable

end

interface Virtual-Template1

ip address 10.1.1.1 255.255.255.0

ipv6 enable

ipv6 dhcp server AAA

peer default ip address pool local

peer default ipv6 pool PPPOE_POOL6

no keepalive

ppp authentication chap

!

ipv6 dhcp pool AAA

prefix-delegation pool DHCPv6Pool

!

ipv6 local pool PPPOE_POOL6 2001:DB8:5AB:10::/60 64

!

ip local pool local 10.1.1.2 10.1.1.100

!

ipv6 local pool DHCPv6Pool 2A02:838F:F880::/42 56

!

驗證

Client#show ipv6 interface brief FastEthernet0/2

FastEthernet0/2              [up/up]

FE80::205:FF:FE77:2C1B

2A02:838F:F880::1

Client#show ipv6 interface brief dialer1

Dialer1                [up/up]

FE80::1234

2001:DB8:5AB:10::1234

使用者端疑難排解

這些調試有助於調試問題：

debug ppp negotiation

debug ipv6 dhcp detail

Client#show debug

PPP:

PPP protocol negotiation debugging is on

IPv6 DHCP:

IPv6 DHCP debugging is on (detailed)

這是在PPP協商完成並且相應的虛擬訪問為UP之後，在客戶端路由器上調試ipv6 dhcp詳細資訊的片段。

*Jun 27 15:08:53.019: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access2, changed state to up

*Jun 27 15:09:03.711: IPv6 DHCP: detailed packet contents

*Jun 27 15:09:03.711:   src FE80::1234

*Jun 27 15:09:03.711:   dst FF02::1:2 (Dialer1)

*Jun 27 15:09:03.711:   type REQUEST(3), xid 1849347

*Jun 27 15:09:03.711:   option ELAPSED-TIME(8), len 2

*Jun 27 15:09:03.711:     elapsed-time 3202

*Jun 27 15:09:03.711:   option CLIENTID(1), len 10

*Jun 27 15:09:03.711:     00030001000500772C1B

*Jun 27 15:09:03.711:   option ORO(6), len 6

*Jun 27 15:09:03.711:     IA-PD,DNS-SERVERS,DOMAIN-LIST

*Jun 27 15:09:03.711:   option SERVERID(2), len 10

*Jun 27 15:09:03.711:     000300017CAD74F9EB00

*Jun 27 15:09:03.711:   option IA-PD(25), len 41

*Jun 27 15:09:03.711:     IAID 0x000B0001, T1 0, T2 0

*Jun 27 15:09:03.711:     option IAPREFIX(26), len 25

*Jun 27 15:09:03.711:       preferred 0, valid 0, prefix 2A02:838F:F880::/56

*Jun 27 15:09:03.711: IPv6 DHCP: Sending REQUEST to FF02::1:2 on Dialer1

*Jun 27 15:09:03.711: IPv6 DHCP: Received REPLY from FE80::7EAD:74FF:FEF9:EB00 on Dialer1

*Jun 27 15:09:03.711: IPv6 DHCP: detailed packet contents

*Jun 27 15:09:03.711:   src FE80::7EAD:74FF:FEF9:EB00 (Dialer1)

*Jun 27 15:09:03.711:   dst FE80::1234 (Dialer1)

*Jun 27 15:09:03.711:   type REPLY(7), xid 1849347

*Jun 27 15:09:03.711:   option SERVERID(2), len 10

*Jun 27 15:09:03.711:     000300017CAD74F9EB00

*Jun 27 15:09:03.711:   option CLIENTID(1), len 10

*Jun 27 15:09:03.711:     00030001000500772C1B

*Jun 27 15:09:03.711:   option IA-PD(25), len 41

*Jun 27 15:09:03.711:     IAID 0x000B0001, T1 302400, T2 483840

*Jun 27 15:09:03.711:     option IAPREFIX(26), len 25

*Jun 27 15:09:03.711:       preferred 604800, valid 2592000, prefix 2A02:838F:F880::/56

*Jun 27 15:09:03.711: IPv6 DHCP: Processing options

*Jun 27 15:09:03.711: IPv6 DHCP: Adding prefix 2A02:838F:F880::/56 to my-prefix1

*Jun 27 15:09:03.711: IPv6 DHCP: T1 set to expire in 302400 seconds

*Jun 27 15:09:03.711: IPv6 DHCP: T2 set to expire in 483840 seconds

*Jun 27 15:09:03.711: IPv6 DHCP: DHCPv6 changes state from REQUEST to OPEN (REPLY_RECEIVED) on Dialer1

相關資訊

- IPv6訪問服務：DHCPv6首碼委派

- T技術支援與檔案 — Cisco Systems