目錄

簡介

開始之前

慣例

必要條件

採用元件

背景理論

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

此配置支援遠端使用者（例如，家庭使用者或出差員工）使用V.90協定通過模擬撥號數據機連線到網路。使用PC和模擬數據機，使用者通過撥號PPP連線到Cisco 3640路由器上的基本速率介面(BRI)。BRI提供高速數據機連線，並且成本低於主速率介面(PRI)。

注意：由於BRI上的通道限制，每次只有兩個非同步使用者可撥號到每個BRI。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

本文件沒有特定先決條件。

採用元件

此配置是使用下面的軟體和硬體版本開發和測試的。

- Cisco 3640

- Cisco BRI網路模組（使用以下方法之一）：

- NM-4B-S/T — 四埠ISDN BRI網路模組，最低版本800-01236-03

- NM-4B-U — 帶整合NT-1網路模組的四埠ISDN BRI，最低版本800-01238-06

- NM-8B-S/T — 八埠ISDN BRI網路模組，最低版本800-01237-03

- NM-8B-U — 帶整合NT-1網路模組的八埠ISDN BRI，最低版本800-01239-06

- 數字數據機網路模組(使用以下方法之一：NM-6DM、NM-12DM、NM-18DM、NM-24DM或NM-30DM)

- LAN介面卡

- Cisco IOS®軟體版本12.0(2)XC

有關最低硬體和軟體要求的詳細資訊（例如，部件號和修訂版號），請參閱Cisco 3640路由器文檔中的Modem over ISDN BRI文檔。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

背景理論

此配置使用本地使用者清單確保思科路由器上的訪問安全。

以下是show version命令輸出與Cisco IOS軟體版本和用於實現此配置的數據機韌體版本的相關部分：

Cisco Internetwork Operating System Software IOS (tm) 3600 Software (C3640-I-M), Version 12.0(5)XK1, EARLY DEPLOYMENT RELEASE SOFTWARE (fc1)

System image file is "flash:c3640-i-mz.120-5.XK1"

MICA-6DM Firmware: CP ver 2310 - 6/3/1998, SP ver 2310 - 6/3/1998.

使用show diag EXEC命令確定路由器中安裝的硬體型別。show diag命令會顯示路由器中硬體模組的版本號和部件號。以下是show diag EXEC命令輸出示例的相關部分：

maui-nas-04#show diag

Slot 1:

BRI (U) port adapter, 4 ports

Serial number 17156199 Part number 800-01238-06

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用IOS命令查詢工具

網路圖表

本文檔使用下圖所示的網路設定。

組態

本文檔使用如下所示的配置。

Cisco 3640

maui-nas-04#show run

Building configuration...

Current configuration:

!

! Last configuration change at 10:11:43 CST Thu Apr 13 2000

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

service password-encryption

!

hostname maui-nas-04

!

aaa new-model

AAA authentication login default group tacacs+ local

AAA authentication ppp default if-needed group tacacs+ local

!

enable secret <deleted>

!

username admin privilege 15 password 7 0213100D52050024

!

modem country mica

!-- The country information is mandatory for the configuration to work

!

clock timezone CST -6

clock summer-time CST recurring

!

ip subnet-zero

ip domain-name maui-onions.com

ip name-server 172.22.53.210

!

isdn switch-type basic-ni

! --- Global ISDN switchtype

!

!

process-max-time 200

!

interface Loopback0

ip address 172.22.87.4 255.255.255.0

no ip directed-broadcast

!

interface Loopback1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0

ip address 172.22.80.4 255.255.255.0

no ip directed-broadcast

!

interface Ethernet0/1

no ip address

no ip directed-broadcast

shutdown

!

interface BRI1/0

no ip address

no ip directed-broadcast

shutdown

isdn switch-type basic-ni

!

interface BRI1/1

no ip address

no ip directed-broadcast

shutdown

isdn switch-type basic-ni

!

interface BRI1/2

no ip address

no ip directed-broadcast

shutdown

isdn switch-type basic-ni

!

interface BRI1/3

! --- Active BRI

no ip address

no ip directed-broadcast

isdn switch-type basic-ni

isdn spid1 51255511110101 5551111

isdn spid2 51255522220101 5552222

isdn incoming-voice modem

! --- Direct incoming voice calls to the modems ! --- Add the above command to all BRIs that will accept analog calls

!

interface Group-Async1

ip unnumbered Loopback0

! --- Loopback0 is assigned above

no ip directed-broadcast

encapsulation ppp

async mode interactive

peer default ip address pool default

! --- Use local pool defined below

ppp authentication pap

! --- Use PAP authentication

group-range 65 66

! --- Line range is configured below

!

router eigrp 69

network 172.22.0.0

!

ip local pool default 172.22.84.2 172.22.84.253

! --- IP address pool assignment

ip default-gateway 172.22.80.1

ip classless

ip route 0.0.0.0 0.0.0.0 172.22.80.1

ip http server

ip http authentication local

!

tacacs-server host 172.22.53.201

tacacs-server key <deleted>

!

line con 0

transport input all

line 65 66

! --- This must match the group-range in the Group-Async Interface ! --- Use the show line command to determine which lines are to be configured for dialin

autoselect during-login

autoselect ppp

modem Dialin

line 67 70

line aux 0

line vty 0 4

password

!

ntp clock-period 17179861

ntp server 172.22.255.1 prefer

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具支援某些show命令，該工具允許您檢視show命令輸出的分析。

- show isdn stat — 狀態應為：

layer 1 = active

layer 2 = MULTIPLE_FRAMES_ESTABLISHED

如果第1層處於非活動狀態，則配線介面卡或埠可能損壞或無法插入。如果第2層處於TEI_Assign狀態，則路由器不會與交換機通訊。

- show line — 顯示行的引數。使用show line命令確定需要配置哪些線路才能撥入。

- show users — 顯示線路號、連線名稱、空閒時間和終端位置。

- show diag — 確定路由器中安裝的硬體型別。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

注意：發出debug指令之前，請先參閱有關Debug指令的重要資訊。

- debug modem — 觀察接入伺服器上的數據機線路活動。

- debug modem csm — 調試用於連線數據機呼叫的呼叫狀態機。

- debug isdn Q931 — 在使用者撥入時檢查ISDN連線，以檢視ISDN呼叫發生的情況（例如，如果連線被丟棄）。

相關資訊

- 適用於Cisco 3640路由器的ISDN BRI資料機

- 配置數據機支援和其他非同步功能

- 技術支援 - Cisco Systems