目錄

簡介

必要條件

需求

採用元件

慣例

組態

相關資訊

簡介

本文檔提供了美國San Jose撥入實驗室中AS5300的當前配置。此伺服器有24個Microcom和60個MICA數據機，可用於測試客戶端數據機的效能。

必要條件

需求

本文件沒有特定需求。

採用元件

運行V.34、V.90和V.92代碼的MICA/Microcom/NextPort數據機。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

組態

這是San Jose撥入實驗中的AS5300配置：

access-3#wr t

Building configuration...

Current configuration:

!

version 11.3

no service pad

service tcp-keepalives-in

service tcp-keepalives-out

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

service linenumber

!

hostname access-3

!

aaa new-model

aaa authentication login default local

aaa authentication login console none

aaa authentication login use-tacacs local tacacs+

aaa authentication enable default enable

aaa authentication ppp default if-needed local tacacs+

aaa authentication arap default local

aaa authorization exec default none

aaa authorization exec console none

aaa authorization network default local

aaa accounting exec default stop-only tacacs+

aaa accounting network default stop-only tacacs+

aaa accounting system default stop-only tacacs+

enable secret 5 $1$oMKx$kPcop1zxkpxa8fkxXBWp21

!

username cisco password *******

username callback callback-dialstring "" password *******

!

modem-pool microcom_v90_dialin

pool-range 1-6

called-number 4085703930 max-conn 6

modem-pool microcom_k56flex_dialin

pool-range 7-12

called-number 4085703931 max-conn 6

modem-pool mica_v90_dialin

pool-range 25-54

called-number 4085703932 max-conn 30

modem-pool mica_k56flex_dialin

pool-range 55-84

called-number 4085703933 max-conn 30

modem-pool microcom_v34_dialin

pool-range 13-24

called-number 4085703934 max-conn 12

modem call-record terse

modem recovery threshold 50

modem buffer-size 250

ip nat pool global_pool 172.16.24.121 172.16.24.126 netmask

255.255.255.240

ip nat inside source list 101 pool global_pool overload

no ip finger

no ip domain-lookup

ip host publinux 172.16.24.117

ip host dialin-test 172.16.24.118

ip domain-name cisco.com

ip name-server 172.16.24.117

multilink virtual-template 1

virtual-profile virtual-template 1

rlogin trusted-remoteuser-source local

rlogin trusted-localuser-source local

appletalk routing

ipx routing 00e0.1e81.636c

isdn switch-type primary-ni

clock timezone PST -8

clock summer-time PDT recurring

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

description 408-570-3930 (666-2300)

!

controller T1 1

shutdown

clock source line secondary

!

controller T1 2

shutdown

clock source internal

!

controller T1 3

shutdown

clock source internal

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.0

ipx network CE2

!

interface Ethernet0

ip address 172.16.24.116 255.255.255.240

ip nat outside

no ip mroute-cache

appletalk cable-range 666-666 666.90

appletalk zone NeverNeverLand

ipx network CE

ipx type-20-propagation

netbios nbf

!

interface Virtual-Template1

ip unnumbered Loopback0

ip helper-address 172.16.24.118

ip tcp header-compression passive

no keepalive

appletalk client-mode

ipx ppp-client Loopback0

ipx update interval rip passive

ipx update interval sap passive

ipx type-20-propagation

peer default ip address pool default

compress mppc

ppp authentication chap pap

ppp multilink

multilink max-links 2

netbios nbf

!

interface Serial0:23

ip unnumbered Loopback0

encapsulation ppp

ip mroute-cache

no keepalive

dialer-group 1

isdn switch-type primary-5ess

isdn incoming-voice modem

no peer default ip address

no fair-queue

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

!

interface FastEthernet0

no ip address

no ip mroute-cache

shutdown

!

interface Group-Async1

description Microcom V.90 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 1 6

hold-queue 10 in

!

interface Group-Async2

description Microcom K56flex modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 7 12

hold-queue 10 in

!

interface Group-Async3

description MICA V.90 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 25 54

!

interface Group-Async4

description MICA K56flex modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 55 84

!

interface Group-Async5

description Microcom V.34 modems

ip unnumbered Loopback0

ip nat inside

encapsulation ppp

async mode interactive

no peer default ip address

no fair-queue

no cdp enable

ppp max-bad-auth 3

ppp authentication chap pap

ppp multilink

group-range 13 24

!

ip local pool default 10.1.1.2 10.1.1.254

ip default-gateway 172.16.24.113

ip classless

no ip forward-protocol udp bootpc

no ip forward-protocol udp tftp

no ip forward-protocol udp nameserver

no ip forward-protocol udp domain

no ip forward-protocol udp time

no ip forward-protocol udp tacacs

ip route 0.0.0.0 0.0.0.0 172.16.24.113

ip http server

!

no logging buffered

no logging console

access-list 1 permit 171.68.0.0 0.3.255.255

access-list 101 permit ip 10.0.0.0 0.255.255.255 172.16.24.112

0.0.0.15

dialer-list 1 protocol ip permit

!

!

!

!

tacacs-server host 172.16.24.117

tacacs-server key cisco

banner motd ^CC

Welcome! Please login with username cisco, password

cisco, and type the appropriate commands for your test:

ppp  -  to start ppp

slip -  to start slip

arap -  to start arap

Please e-mail comments about this service to dpeng@cisco.com.

^C

privilege exec level 0 modem at-mode

privilege exec level 0 modem

privilege exec level 0 arap

privilege exec level 0 telnet

privilege exec level 0 rlogin

privilege exec level 0 ppp negotiate

privilege exec level 0 ppp default

privilege exec level 0 ppp

privilege exec level 0 slip negotiate

privilege exec level 0 slip default

privilege exec level 0 slip

privilege exec level 0 terminal monitor

privilege exec level 0 terminal

privilege exec level 0 show line

privilege exec level 0 show isdn status

privilege exec level 0 show isdn service

privilege exec level 0 show isdn

privilege exec level 0 show modem connect-speeds

privilege exec level 0 show modem log

privilege exec level 0 show modem operational-status

privilege exec level 0 show modem configuration

privilege exec level 0 show modem csm

privilege exec level 0 show modem summary

privilege exec level 0 show modem version

privilege exec level 0 show modem call-stats

privilege exec level 0 show modem

privilege exec level 0 show version

privilege exec level 0 show controllers t1

privilege exec level 0 show controllers

privilege exec level 0 show users

privilege exec level 0 show interfaces

privilege exec level 0 show

privilege exec level 0 debug dhcp

privilege exec level 0 debug radius

privilege exec level 0 debug callback

privilege exec level 0 debug vtemplate

privilege exec level 0 debug isdn q931

privilege exec level 0 debug isdn

privilege exec level 0 debug tacacs

privilege exec level 0 debug ppp cbcp

privilege exec level 0 debug ppp authentication

privilege exec level 0 debug ppp mppc

privilege exec level 0 debug ppp error

privilege exec level 0 debug ppp negotiation

privilege exec level 0 debug ppp multilink fragments

privilege exec level 0 debug ppp multilink

privilege exec level 0 debug ppp

privilege exec level 0 debug ip icmp

privilege exec level 0 debug ip

privilege exec level 0 debug aaa per-user

privilege exec level 0 debug aaa accounting

privilege exec level 0 debug aaa authorization

privilege exec level 0 debug aaa authentication

privilege exec level 0 debug aaa

privilege exec level 0 debug modem csm

privilege exec level 0 debug modem

privilege exec level 0 debug

!

line con 0

exec-timeout 0 0

authorization exec console

login authentication console

transport input none

line 1 24

access-class 1 in

autoselect arap

autoselect during-login

autoselect ppp

arap enable

modem InOut

rotary 1

transport input all

escape-character BREAK

line 25 84

access-class 1 in

autoselect arap

autoselect during-login

autoselect ppp

arap enable

modem InOut

rotary 2

transport input all

escape-character BREAK

line aux 0

line vty 0 4

exec-timeout 60 0

access-class 1 in

line vty 5 19

exec-timeout 60 0

access-class 1 in

!

end

相關資訊

- 在San Jose撥入實驗室中測試非同步DDR

- 客戶撥入實驗室（美國，聖何塞）

- 撥號連線故障排除

- 網關RAS實施

- 數據機路由器連線指南

- 技術支援與文件 - Cisco Systems