目錄

簡介

必要條件

需求

採用元件

背景資訊

拓撲

驗證

疑難排解

相關資訊

簡介

本文檔介紹對Nexus 9000中採用IPv6的虛擬路由器冗餘協定版本3 (VRRPv3)進行故障排除的步驟。

必要條件

需求

Cisco NXOS®建議您瞭解以下主題：

- VRRP

- Ethanalyzer

- IPv6

- 第一躍點備援通訊協定(FHRP)

採用元件

本文檔僅限於特定硬體，如Nexus 9000。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

VRRP版本2僅支援IPv4地址系列，但VRRP版本3 (VRRP3)同時支援IPv4和IPv6地址系列。在NX-OS上，不能在同一裝置上同時啟用VRRP和VRRPv3。如果Nexus交換機上已啟用功能VRRP，則啟用功能VRRPv3將顯示一條錯誤消息，說明已啟用VRRPv2。因此，必須執行從VRRP到VRRPv3的遷移，這樣對服務的影響最小。

拓撲

注意：無虛擬埠通道(VPC)環境。

驗證

1)檢驗兩端配置是否匹配。

交換機1：

Switch1# show run interface vlan 209

interface Vlan209

no shutdown

no ip redirects

ipv6 address X:X:X:X::70a/125

vrrpv3 1 address-family ipv6

priority 200

address X::X:X:X:297 primary

Switch1#

交換機2：

Switch2# show run interface vlan 209

interface Vlan209

no shutdown

no ip redirects

ipv6 address X:X:X:X::70c/125

no ipv6 redirects

vrrpv3 1 address-family ipv6

address X::X:X:X:297 primary

Switch2#

2)驗證MAC地址表是否已正確填充。

交換機1：

Switch1# show mac address-table vlan 209

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link,

(T) - True, (F) - False, C - ControlPlane MAC, ~ - vsan

VLAN MAC Address Type age Secure NTFY Ports

---------+-----------------+--------+---------+------+----+------------------

G 209 0000.5e00.0201 static - F F sup-eth1(R)

G 209 689e.0baa.dea7 static - F F sup-eth1(R)

Switch1#

module-1# show hardware internal tah rmac

Instance : 0

====================================

Mac-Address Vlan Flag

------------------------------------

68:9e:0b:aa:de:a7 0 SYSTEM

00:00:5e:00:02:01 209 VRMAC

module-1#

交換機2：

Switch2# show mac address-table vlan 209

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link,

(T) - True, (F) - False, C - ControlPlane MAC, ~ - vsan

VLAN MAC Address Type age Secure NTFY Ports

---------+-----------------+--------+---------+------+----+------------------

* 209 0000.5e00.0201 dynamic 0 F F Eth1/51

G 209 689e.0baa.de07 static - F F sup-eth1(R)

Switch2#

Switch2# show hardware mac address-table 1 address 0000.5e00.0201

FE | VLAN | MAC | Dynamic | Port |Location Index|

| | | | | |

---+------+---------------+---------+---------+--------------+

0 209 0000.5e00.0201 dynamic Eth1/51

Switch2#

module-1# show hardware internal tah rmac

Instance : 0

====================================

Mac-Address Vlan Flag

------------------------------------

68:9e:0b:aa:de:07 0 SYSTEM

module-1#

3)驗證參與組的裝置的狀態。

交換機1：

Switch1# show vrrpv3 vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 15 hours 43 mins 44 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 813 msec)

Primary Down interval is unknown

Switch1#

交換機2：

Switch2# show vrrpv3 vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is BACKUP

State duration 3 mins 57.928 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:dea7, priority is 200

Primary Advertisement interval is 1000 msec (learned)

Primary Down interval is 3609 msec (expires in 3422 msec)

Switch2#

疑難排解

中斷的場景。

1) show vrrpv3 brief命令選項顯示與組相關的簡要資訊，如組編號、地址系列、優先順序、搶佔、狀態、主地址和組地址（即虛擬組IP）。在本例中，如上所述，兩台交換機都是主交換機，但兩者都不正確。

交換機1：

Switch1# show vrrpv3 brief

Interface Grp A-F Pri Time Own Pre State Primary addr/Group addr

Vlan209 1 IPv6 200 0 N Y Primary X::X:X:X:dea7(local) X::X:X:X:297

Switch1#

交換機2：

Switch2# show vrrpv3 brief

Interface Grp A-F Pri Time Own Pre State Primary addr/Group addr

Vlan209 1 IPv6 100 0 N Y Primary X::X:X:X:de07(local) X::X:X:X:297

Switch2#

2) show vrrpv3 detail命令可顯示其他資訊，如傳送和接收的有關VRRPv3的通告、虛擬MAC地址以及其他與錯誤和轉換狀態相關的統計資訊。例如，收到的VRRPv3通告不會增加。

交換機1：

Switch1# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 47 mins 40 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 284 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 57138 (errors 2) - rcvd 177       <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 4 (Last change Thu Apr 11 01:01:46.418 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 01:01:49.637 UTC)

Primary to backup: 0

Primary to init: 3 (Last change Thu Apr 11 00:57:37.107 UTC)

Backup to init: 0

Switch1#

Switch1# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 51 mins 29 secs

Virtual IP address is fX::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 667 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 57393 (errors 2) - rcvd 177         <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 4 (Last change Thu Apr 11 01:01:46.418 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 01:01:49.637 UTC)

Primary to backup: 0

Primary to init: 3 (Last change Thu Apr 11 00:57:37.107 UTC)

Backup to init: 0

Switch1#

交換機2：

Switch2# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 51 mins 49 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:de07 (local), priority is 100

Primary Advertisement interval is 1000 msec (expires in 412 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 51764 (errors 0) - rcvd 6032          <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 1 (Last change Wed Apr 10 23:21:09.604 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 00:57:40.229 UTC)

Primary to backup: 3 (Last change Thu Apr 11 00:54:11.758 UTC)

Primary to init: 0

Backup to init: 0

Switch2#

Switch2# show vrrpv3 detail vlan 209

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 12 hours 55 mins 38 secs

Virtual IP address is fX::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:de07 (local), priority is 100

Primary Advertisement interval is 1000 msec (expires in 479 msec)

Primary Down interval is unknown

VRRPv3 Advertisements: sent 52019 (errors 0) - rcvd 6032       <--------

VRRPv2 Advertisements: sent 0 (errors 0) - rcvd 0

Group Discarded Packets: 0

VRRPv2 incompatibility: 0

IP Address Owner conflicts: 0

Invalid address count: 0

IP address configuration mismatch : 0

Invalid Advert Interval: 0

Adverts received in Init state: 0

Invalid group other reason: 0

Group State transition:

Init to Primary: 0

Init to backup: 1 (Last change Wed Apr 10 23:21:09.604 UTC)

Backup to Primary: 4 (Last change Thu Apr 11 00:57:40.229 UTC)

Primary to backup: 3 (Last change Thu Apr 11 00:54:11.758 UTC)

Primary to init: 0

Backup to init: 0

Switch2#

3) show vrrpv3 internal event-history debugs命令顯示有關VRRPv3參與者經歷的不同階段的資訊。

交換機1：

Switch1# show vrrpv3 internal event-history debugs

2024 Apr 11 01:01:49.642985: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Active Wait', NewState='Active'

2024 Apr 11 01:01:49.642974: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Ack Active, CurrentState=Active Wait

2024 Apr 11 01:01:49.642963: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:49.642952: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Notifying Pathway MAC Of Async Event: Event='Ack Active', ErrStr='SUCCESS'

2024 Apr 11 01:01:49.642941: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: L2fm Alloc Response For MAC: MAC=0000.5e00.0201, Status=0x0, ErrStr='SUCCESS'

2024 Apr 11 01:01:49.642898: E_DEBUG vrrpv3 [23795]: VRRP-MTS: L2fm Alloc Response: RRToken=0x2f9a22, NumMessages=1, OverallStatus=0x0

2024 Apr 11 01:01:49.637478: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Installing ICMPv6 Entry For: VIP=X::X:X:X:297, Flag=0x3

2024 Apr 11 01:01:49.637453: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Activating VIP6, That Was In State: VIP=X::X:X:X:297, State='Inactive'

2024 Apr 11 01:01:49.637367: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Standby', NewState='Active Wait'

2024 Apr 11 01:01:49.637306: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Request Active, CurrentState=Standby

2024 Apr 11 01:01:49.637295: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:47.421619: E_DEBUG vrrpv3 [23795]: VRRP-MTS: Handling IPv6 Change 7: Ifindex=0x90100d1, OldIP=0::/0, NewIP=X:X:X:X::70a/125

2024 Apr 11 01:01:46.421957: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='', NewState='Standby'

2024 Apr 11 01:01:46.421950: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Ack Standby, CurrentState=

2024 Apr 11 01:01:46.421944: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

2024 Apr 11 01:01:46.421938: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Notifying Pathway MAC Of Async Event: Event='Ack Standby', ErrStr='SUCCESS'

2024 Apr 11 01:01:46.421932: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: L2fm Alloc Response For MAC: MAC=0000.5e00.0201, Status=0x0, ErrStr='SUCCESS'

2024 Apr 11 01:01:46.421911: E_DEBUG vrrpv3 [23795]: VRRP-MTS: L2fm Alloc Response: RRToken=0x2f99cd, NumMessages=1, OverallStatus=0x0

2024 Apr 11 01:01:46.419597: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Installing ICMPv6 Entry For: VIP=X::X:X:X:297, Flag=0x3

2024 Apr 11 01:01:46.419574: E_DEBUG vrrpv3 [23795]: VRRS Vlan209: [vrrpVlan209v61 tag] Deactivating VIP6, That Was In State: VIP=X::X:X:X:297, State='Shutdown'

2024 Apr 11 01:01:46.419515: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Change: MAC=0000.5e00.0201, OldState='Reserved', NewState=''

2024 Apr 11 01:01:46.419463: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Current MAC State Event: MAC=0000.5e00.0201, Event=Request Standby, CurrentState=Reserved

2024 Apr 11 01:01:46.419454: E_DEBUG vrrpv3 [23795]: VRRS Vlan209 [vrrpVlan209v61 tag]: Pathway MAC Event: PathwayID=983043

Switch1#

交換機2：

Switch2# show vrrpv3 internal event-history debugs

2024 Apr 11 00:57:40.234767: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active Wait -> Active

2024 Apr 11 00:57:40.234752: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Active, Current state Active Wait

2024 Apr 11 00:57:40.234744: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:57:40.234736: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Active, status SUCCESS

2024 Apr 11 00:57:40.234728: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:57:40.234694: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3ba768, msgs 1, overall status 0

2024 Apr 11 00:57:40.229355: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:57:40.229329: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] activating vip6 X::X:X:X:297, that was in 'Inactive' state

2024 Apr 11 00:57:40.229251: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Standby -> Active Wait

2024 Apr 11 00:57:40.229195: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Active, Current state Standby

2024 Apr 11 00:57:40.229184: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:57:36.813093: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(down) for 0x1a006400

2024 Apr 11 00:54:11.763596: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: -> Standby

2024 Apr 11 00:54:11.763587: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Standby, Current state

2024 Apr 11 00:54:11.763580: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:54:11.763572: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Standby, status SUCCESS

2024 Apr 11 00:54:11.763564: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:54:11.763533: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3b791e, msgs 1, overall status 0

2024 Apr 11 00:54:11.758782: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:54:11.758757: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] de-activating vip6 X::X:X:X:297, that was in 'Active' state

2024 Apr 11 00:54:11.758685: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active ->

2024 Apr 11 00:54:11.758637: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Standby, Current state Active

2024 Apr 11 00:54:11.758626: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:54:06.643584: E_DEBUG VRRP-MTS: L2_PROTO_CHANGE: intf 0x1a006400 entering L2

2024 Apr 11 00:54:06.616851: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(up) for 0x1a006400

2024 Apr 11 00:52:11.216190: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Active Wait -> Active

2024 Apr 11 00:52:11.216182: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Ack Active, Current state Active Wait

2024 Apr 11 00:52:11.216174: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:52:11.216167: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Notifying pathway mac of async event: Ack Active, status SUCCESS

2024 Apr 11 00:52:11.216159: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] fx_macdb_handle_l2fm_alloc :: Alloc response for MAC 0000.5e00.0201 status = 0 error(SUCCESS)

2024 Apr 11 00:52:11.216125: E_DEBUG VRRP-MTS: L2FM alloc resp: rrtoken 0x3b3bc5, msgs 1, overall status 0

2024 Apr 11 00:52:11.210932: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] installing icmpv6 entry for vip X::X:X:X:297 flag 0x3

2024 Apr 11 00:52:11.210906: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] activating vip6 X::X:X:X:297, that was in 'Inactive' state

2024 Apr 11 00:52:11.210828: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 state change: Standby -> Active Wait

2024 Apr 11 00:52:11.210773: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] Current MAC 0000.5e00.0201 State event Request Active, Current state Standby

2024 Apr 11 00:52:11.210762: E_DEBUG VRRS Vlan209 [vrrpVlan209v61 tag] pw id val is(983043)

2024 Apr 11 00:52:08.025681: E_DEBUG VRRP-MTS: Received IM_PHY_LINK_STATE_CHANGE(down) for 0x1a006400

Switch2#

4) Ethanalyzer顯示VRRP公告。VRRP通告僅由主交換機完成。VRRPv3的組播地址為ff02：：12。

交換機1：

Switch1# ethanalyzer local interface inband display-filter "vrrp.adver_int" limit-captured-frames 0

Capturing on inband

2024-04-11 14:07:50.050745 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:50.967333 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:51.861690 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:52.809845 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:53.700778 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:54.693008 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch1#

交換機2：

Switch2# ethanalyzer local interface inband display-filter "vrrp.adver_int" limit-captured-frames 0

Capturing on inband

2024-04-11 14:07:49.946663 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:50.829985 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:51.728800 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:52.720034 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:53.571038 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:07:54.386109 X::X:X:X:de07 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch2#

根據上述輸出，兩台交換機都傳送自己的通告（dea7和de07）。這表示參與同一VRRPv3組的兩台交換機之間沒有連線。

深入檢視VRRPv3生成的資料包，可以找到有關MAC地址、優先順序、版本和IP的詳細資訊。

交換機1：

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Frame 206: 82 bytes on wire (656 bits), 82 bytes captured (656 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Internet Protocol Version 6, Src: X::X:X:X:dea7, Dst: ff02::12

Virtual Router Redundancy Protocol

Version 3, Packet type 1 (Advertisement)

Virtual Rtr ID: 1

Priority: 200 (Default priority for a backup VRRP router)

Addr Count: 1

0000 .... = Reserved: 0

.... 0000 0110 0100 = Adver Int: 100

Checksum: 0xb912 [correct]

[Checksum Status: Good]

IPv6 Address: X::X:X:X:297

交換機2：

Frame 82: 78 bytes on wire (624 bits), 78 bytes captured (624 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Frame 82: 78 bytes on wire (624 bits), 78 bytes captured (624 bits)

Ethernet II, Src: ICANNIAN_00:02:01 (00:00:5e:00:02:01), Dst: IPv6mcast_12 (33:33:00:00:00:12)

Internet Protocol Version 6, Src: X::X:X:X:de07, Dst: ff02::12

Virtual Router Redundancy Protocol

Version 3, Packet type 1 (Advertisement)

Virtual Rtr ID: 1

Priority: 100 (Default priority for a backup VRRP router)

Addr Count: 1

0000 .... = Reserved: 0

.... 0000 0110 0100 = Adver Int: 100

Checksum: 0xb912 [correct]

[Checksum Status: Good]

IPv6 Address: X::X:X:X:297

5)一旦解決了連線問題（在本例中即使SVI處於打開狀態，第2層介面也處於關閉狀態），交換機現在必須顯示正確的狀態（分別為主交換機和備用），並且只有主交換機傳送通告。

交換機1：

Switch1# show vrrpv3

Vlan209 - Group 1 - Address-Family IPv6

State is Primary

State duration 13 hours 42 mins 46 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 200, (Configured 200)

Primary Router is X::X:X:X:dea7 (local), priority is 200

Primary Advertisement interval is 1000 msec (expires in 118 msec)

Primary Down interval is unknown

Switch1#

Switch1#

Switch1# ethanalyzer local interface inband display-filter "vrrp" limit-captured-frames 0

Capturing on inband

2024-04-11 14:48:48.125754 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:48.125794 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.002998 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.003035 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.983749 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.983782 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

6 packets captured

Switch1#

當指向VRRPv3的組播地址時，主交換機上會觸發顯示正確MAC地址的ELAM：

Switch1(TAH-elam-insel6)# set outer ipv6 src_ip fe80::6a9e:bff:feaa:dea7 dst_ip ff02::12

Switch1(TAH-elam-insel6)# start

Switch1(TAH-elam-insel6)# report

HOMEWOOD ELAM REPORT SUMMARY

slot - 1, asic - 0, slice - 0

============================

Incoming Interface: sup-eth

Src Idx : 0x0, Src BD : 209

Outgoing Interface Info: met_ptr 0

Packet Type: IPv6

Dst MAC address: 33:33:00:00:00:12

Src MAC address: 00:00:5E:00:02:01

Dst IPv6 address: FF02:0000:0000:0000:0000:0000:0000:0012

Src IPv6 address: FE80:0000:0000:0000:6A9E:0BFF:FEAA:DEA7

Ver = 6, Pkt len = 40, Payload_length = 4

L4 Protocol : 112

Drop Info:

----------

LUA:

LUB:

LUC:

LUD:

Final Drops:

vntag:

vntag_valid : 0

vntag_vir : 0

vntag_svif : 0

Switch1(TAH-elam-insel6)#

交換機2：

Switch2# show vrrpv3

Vlan209 - Group 1 - Address-Family IPv6

State is BACKUP

State duration 1.538 secs

Virtual IP address is X::X:X:X:297

Virtual MAC address is 0000.5e00.0201

Advertisement interval is 1000 msec

Preemption enabled

Priority is 100, (Configured 100)

Primary Router is X::X:X:X:dea7, priority is 200

Primary Advertisement interval is 1000 msec (learned)

Primary Down interval is 3609 msec (expires in 2886 msec)

Switch2#

Switch2# ethanalyzer local interface inband display-filter "vrrp" limit-captured-frames 0

Capturing on inband

2024-04-11 14:48:48.082516 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:48.959735 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

2024-04-11 14:48:49.940504 X::X:X:X:dea7 -> ff02::12 VRRP Announcement (v3)

3 packets captured

Switch2#

運行ELAM時，可以在備份裝置上看到通告。通告來自主交換機(X：：X：X：X：dea7)，並在正確的傳入介面（即ethernet 1/51）中接收

Switch2# show hardware internal tah interface e1/51

#########################################

IfIndex: 0x1a006400

DstIndex: 5944

IfType: 26

Asic: 0

Asic: 0

AsicPort: 60

SrcId: 120

Slice: 0

PortOnSlice: 60

Table entries for interface Ethernet1/51

Switch2(TAH-elam)# trigger init asic 0 slice 0 in-select 6 out-select 0 use-src-id 120

Switch2(TAH-elam-insel6)# set outer ipv6 src_ip X::X:X:X:dea7

Switch2(TAH-elam-insel6)# start

Switch2(TAH-elam-insel6)# report

HOMEWOOD ELAM REPORT SUMMARY

slot - 1, asic - 0, slice - 0

============================

Incoming Interface: Eth1/51

Src Idx : 0xc9, Src BD : 209

Outgoing Interface Info: met_ptr 0

Packet Type: IPv6

Dst MAC address: 33:33:00:00:00:12

Src MAC address: 00:00:5E:00:02:01

.1q Tag0 VLAN: 209, cos = 0x6

Sup hit: 1, Sup Idx: 3344

Dst IPv6 address: FF02:0000:0000:0000:0000:0000:0000:0012

Src IPv6 address: X:X:X:X:X:X:X:DEA7

Ver = 6, Pkt len = 24, Payload_length = 4

L4 Protocol : 112

Drop Info:

----------

LUA:

LUB:

LUC:

LUD:

Final Drops:

vntag:

vntag_valid : 0

vntag_vir : 0

vntag_svif : 0

Switch2(TAH-elam-insel6)#

相關資訊

配置VRRPv3

Ethanalyzer