目錄

簡介

使用Internet Explorer時，為什麼按一下系統的Telnet圖示會給我顯示「Web page cannot be displayed（無法顯示網頁）」錯誤？

相關資訊

簡介

本文涉及Cisco TelePresence Management Suite。

問：使用Internet Explorer時，為什麼按一下系統的Telnet圖示會給我一個「Web page cannot be displayed（無法顯示網頁）」錯誤？

A. Microsoft已禁用在Internet Explorer中開啟Telnet URL的功能，使得在使用Internet Explorer作為TMS的Web瀏覽器時，此功能不可用。

相關資訊

- 技術支援與文件 - Cisco Systems