目錄

簡介

背景資訊

縮寫

MoP的工作流程

UltraM安裝中的主幹交換機

必備條件

運行狀況檢查

交換機更換過程

驗證更換的主幹交換機

簡介

本文檔介紹在Ultra-M設定中更換故障主幹交換機(Nexus 9236C)所需的步驟。

此過程適用於通過NEWTON版本的Openstack環境，其中ESC不管理Cisco Prime Access Registrar(CPAR)，而CPAR直接安裝在Openstack上部署的VM上。

背景資訊

Ultra-M是經過預打包和驗證的虛擬化移動資料包核心解決方案，旨在簡化VNF的部署。Ultra-M設定中的伺服器連線到三種不同型別的交換機：

- Catalyst交換器

- 枝葉交換機

- 主幹交換機

此圖顯示Ultra-M安裝程式的網路拓撲：

附註：網路拓撲只是一個表示形式，交換機之間的連線可能略有不同，具體取決於所部署的解決方案。

本文檔面向熟悉Cisco Ultra-M設定和Catalyst交換機操作的思科人員。

縮寫

VNF

虛擬網路功能

骨幹

作為主幹的Nexus 9236C交換器

澳門幣

程式方法

LAN

區域網

FTP

檔案傳輸通訊協定

TFTP

簡單式檔案傳輸通訊協定

CIMC

思科整合式管理控制器

MoP的工作流程

此圖顯示了替換過程的高級工作流。

UltraM安裝中的主幹交換機

必備條件

在交換器更換之前，請先透過FTP/TFTP從主幹交換器備份組態檔。

AL03-N9236c-POD2-spine1# copy running-config sftp:

Enter destination filename: [AL03-N9236c-POD2-spine1-running-config] backup-spine-cfg-2

Enter vrf (If no input, current vrf 'default' is considered): management

Enter hostname for the sftp server: 10.1.1.1

Enter username: root

The authenticity of host '10.1.1.1 (10.1.1.1)' can't be established.

ECDSA key fingerprint is SHA256:dnHSXQ6fyYX5v8DU87oqVkCoA8CSPW7CpT+o2qilNI4.

Are you sure you want to continue connecting (yes/no)? yes

Warning: Permanently added '10.1.1.1' (ECDSA) to the list of known hosts.

root@10.1.1.1's password:

Connected to 10.1.1.1.

sftp> put /var/tmp/vsh/backup-spine-cfg-2 backup-spine-cfg-2

Uploading /var/tmp/vsh/backup-spine-cfg-2 to /root/backup-spine-cfg-2

/var/tmp/vsh/backup-spine-cfg-2 0% 0 0.0KB/s --:-- ETA /var/tmp/vsh/backup-spine-cfg-2 100% 11KB 11.2KB/s 00:00

sftp> exit

Copy complete, now saving to disk (please wait)...

Copy complete.

運行狀況檢查

步驟1.檢查交換器中執行的目前軟體版本，並記下它。

AL03-N9236c-POD2-spine1# show ver

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (C) 2002-2018, Cisco and/or its affiliates.

All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under their own

licenses, such as open source. This software is provided "as is," and unless

otherwise stated, there is no warranty, express or implied, including but not

limited to warranties of merchantability and fitness for a particular purpose.

Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or

GNU General Public License (GPL) version 3.0 or the GNU

Lesser General Public License (LGPL) Version 2.1 or

Lesser General Public License (LGPL) Version 2.0.

A copy of each such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://opensource.org/licenses/gpl-3.0.html and

http://www.opensource.org/licenses/lgpl-2.1.php and

http://www.gnu.org/licenses/old-licenses/library.txt.

Software

BIOS: version 07.59

NXOS: version 7.0(3)I7(3)

BIOS compile time: 08/26/2016

NXOS image file is: bootflash:///nxos.7.0.3.I7.3.bin

NXOS compile time: 2/12/2018 13:00:00 [02/12/2018 19:13:48]

Hardware

cisco Nexus9000 C9236C chassis

Intel(R) Xeon(R) CPU @ 1.80GHz with 16400560 kB of memory.

Processor Board ID FDO211613CA

Device name: AL03-N9236c-POD2-spine1

bootflash: 53298520 kB

Kernel uptime is 134 day(s), 14 hour(s), 48 minute(s), 25 second(s)

Last reset at 705173 usecs after Fri Mar 2 17:56:31 2018

Reason: Reset due to upgrade

System version: 7.0(3)I5(2)

Service:

plugin

--More-- Core Plugin, Ethernet Plugin

Active Package(s):

步驟2.檢查當前的許可證使用情況。

AL03-N9236c-POD2-spine1# show license uasgesage

Feature Ins Lic Status Expiry Date Comments

Count

--------------------------------------------------------------------------------

N9K_LIC_1G No - Unused -

VPN_FABRIC No - Unused -

FCOE_NPV_PKG No - Unused -

SECURITY_PKG No 0 Unused -

N9K_UPG_EX_10G No - Unused -

TP_SERVICES_PKG No - Unused -

NXOS_ADVANTAGE_GF No - Unused -

NXOS_ADVANTAGE_M4 No - Unused -

NXOS_ADVANTAGE_XF No - Unused -

NXOS_ESSENTIALS_GF No - Unused -

NXOS_ESSENTIALS_M4 No - Unused -

NXOS_ESSENTIALS_XF No - Unused -

SAN_ENTERPRISE_PKG No - Unused -

PORT_ACTIVATION_PKG No 0 Unused -

NETWORK_SERVICES_PKG No - Unused -

NXOS_ADVANTAGE_M8-16 No - Unused -

NXOS_ESSENTIALS_M8-16 No - Unused -

FC_PORT_ACTIVATION_PKG No 0 Unused -

LAN_ENTERPRISE_SERVICES_PKG Yes - In use Never -

--------------------------------------------------------------------------------

步驟3.確保連線到交換機埠通道、Vlan以及埠狀態的物理電纜完好無損。

AL03-N9236c-POD2-spine1# show interface status | grep connected

mgmt0 -- connected routed full 100 --

Eth1/1 Connected to leaf1 connected trunk full 100G QSFP-100G-AOC5M

Eth1/2 Connected to leaf1 connected trunk full 100G QSFP-100G-AOC5M

Eth1/4 Connected to leaf2 connected trunk full 100G QSFP-100G-AOC5M

Eth1/5 Connected to leaf2 connected trunk full 100G QSFP-100G-AOC5M

Eth1/7 Connected to Leaf3 connected trunk full 100G QSFP-100G-AOC5M

Eth1/8 Connected to Leaf3 connected trunk full 100G QSFP-100G-AOC5M

Eth1/10 connect leaf4 connected trunk full 100G QSFP-100G-AOC5M

Eth1/11 connect leaf4 connected trunk full 100G QSFP-100G-AOC5M

Eth1/21/1 Connected to NMNET connected 101 full 10G QSFP-40G-SR4

Eth1/29 Connected to AL04- connected trunk full 100G QSFP-100G-AOC5M

Eth1/30 Connected to AL04- connected trunk full 100G QSFP-100G-AOC5M

Eth1/36/1 connected to ARG | connected routed full 10G QSFP-40G-SR4

Eth1/36/2 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Eth1/36/3 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Eth1/36/4 connected to ARG | disabled routed auto auto QSFP-40G-SR4

Po10 -- connected routed full 10G --

Po10.3101 -- connected routed full 10G --

Po10.3109 -- connected routed full 10G --

Po18 -- connected trunk full 100G --

Po21 -- connected trunk full 100G --

Po22 -- connected trunk full 100G --

Po25 -- connected trunk full 100G --

Po26 -- connected trunk full 100G --

Lo1 -- connected routed auto auto --

Vlan101 -- connected routed auto auto --

Vlan1025 vPCRF 1 and vPCRF connected routed auto auto --

Vlan1026 Replication for vP connected routed auto auto --

Vlan1031 External Traffic v connected routed auto auto --

Vlan1032 External External connected routed auto auto --

Vlan1033 External Traffic connected routed auto auto --

Vlan1034 External Traffic v connected routed auto auto --

Vlan1035 External Traffic v connected routed auto auto --

Vlan1036 External Traffic v connected routed auto auto --

Vlan1041 External Traffic A connected routed auto auto --

Vlan1042 External Traffic A connected routed auto auto --

Vlan1043 External Traffic A connected routed auto auto --

Vlan2601 Global Interchassi connected routed auto auto --

Vlan2602 NMNET Interchassis connected routed auto auto --

步驟4.確保BGP鄰居已啟動。

AL03-N9236c-POD2-spine1# show ip bgp summary vrf all

BGP summary information for VRF NMNET, address family IPv4 Unicast

BGP router identifier 10.225.247.201, local AS number 65361

BGP table version is 2, IPv4 Unicast config peers 2, capable peers 1

0 network entries and 0 paths using 0 bytes of memory

BGP attribute entries [0/0], BGP AS path entries [0/0]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

10.0.100.6 4 65361 193834 193833 2 0 0 19w1d 0

10.250.180.185 4 65137 0 0 0 0 0 19w1d Idle

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 10.0.200.1, local AS number 65361

BGP table version is 161, IPv4 Unicast config peers 2, capable peers 2

18 network entries and 29 paths using 5700 bytes of memory

BGP attribute entries [3/480], BGP AS path entries [1/6]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

10.0.100.2 4 65361 3868481 3868419 161 0 0 19w1d 12

10.163.140.225 4 65137 3868521 3868365 161 0 0 19w1d 5

AL03-N9236c-POD2-spine1# show ipv6 bgp summary vrf all

步驟5.確保BFD鄰居狀態為開啟。

AL03-N9236c-POD2-spine1# show bfd neighbors vrf all

OurAddr NeighAddr LD/RD RH/RS Holdown(mult) State Int Vrf

10.163.140.226 10.163.140.225 1090519042/1090519042 Up 107(3) Up Po10.3101 default

AL03-N9236c-POD2-spine1# show bfd ipv6 neighbor vrf all

交換機更換過程

步驟1.將新交換機安裝到機架中，並將電纜連線到交換機，如前所述。交換機的安裝步驟可以在以下連結中找到：  骨幹Nexus 236C NX-OS模式交換機硬體安裝指南

步驟2.檢查Nexus主幹交換機的軟體版本，並根據給定連結升級/降級至軟體版本：  Cisco Nexus 9000系列NX-OS軟體升級和降級指南7.x版

步驟3.將配置備份傳輸到新交換機，並將該配置複製到啟動配置。

server-backup$ sftp admin@10.1.1.1

The authenticity of host '10.1.1.1 (10.1.1.1)' can't be established.

RSA key fingerprint is SHA256:fnbUmd2mL5yE94zxrRoKAlvYfQbheXJfQox7m3XfpIU.

Are you sure you want to continue connecting (yes/no)? yes

Warning: Permanently added '10.1.1.1' (RSA) to the list of known hosts.

User Access Verification

Password:

Password:

Connected to 10.1.1.1.

sftp> ls

20170607_193430_poap_15489_1.log     20170607_193430_poap_15489_2.log     20170607_193430_poap_15489_init.log  backup-spine-cfg-2                   backup-spine.cfg

backup_run_02152018                  bios_daemon.dbg                      cfg-july25th                         cfg-july25th-spine1                  flash:

flash:cfg-aug8th-ybattina-afterNSO   flash:cfg-jul28th                    home                                 l3-cfg-aug10th                       license_FDO211406K1_16.lic

lost+found                           nxos.7.0.3.I4.4.bin                  nxos.7.0.3.I5.2.bin                  nxos.7.0.3.I7.3.bin                  platform-sdk.cmd

scripts                              spine-config-bkp                     starat                               virtual-instance                     vlan.dat                                                                                                                                                                  100%   33KB  21.7KB/s   00:01

sftp> put backup-spine-cfg-2

Uploading backup-spine-cfg-2 to /backup-spine-cfg-2

backup-spine-cfg-2                                                                                                                                      100%   33KB  23.5KB/s   00:01

sftp> bye

AL03-N9236c-POD2-spine1# copy bootflash:///backup-spine-cfg-2 startup-config

Copy progress 100% 33KB

Copy complete, now saving to disk (please wait)...

Copy complete.

步驟4.載入備份組態後，重新載入交換器。

AL03-N9236c-POD2-spine1#reload

驗證更換的主幹交換機

交換機可供訪問後，通過主幹交換機上的這些命令執行運行狀況檢查，以驗證更換的交換機是否處於預期狀態。

AL03-N9236c-POD2-spine1# show port-channel summary

AL03-N9236c-POD2-spine1# show ip bgp summary vrf all

AL03-N9236c-POD2-spine1# show ipv6 bgp summary vrf all

AL03-N9236c-POD2-spine1# show bfd neighbor vrf all

AL03-N9236c-POD2-spine1# show bfd ipv6 neighbor vrf all