目錄

簡介

必要條件

需求

採用元件

設定

對於init.d

對於Systemd

驗證

對於init.d

對於Systemd

疑難排解

簡介

本文檔介紹如何為ParStream歷史資料庫的init.d或Systemd建立服務檔案。

必要條件

需求

思科建議您應具備Linux相關知識。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

邊緣霧處理模組(EFM)安裝套件不包含現成的init.d或Systemd服務檔案。

您可以在此處找到建立服務檔案的簡單範例。

對於init.d

[root@cen7 ~]# cat /etc/init.d/parstream

#!/bin/bash

# parstream init script.

export PARSTREAM_HOME=/opt/cisco/kinetic/parstream/

export LD_LIBRARY_PATH=$PARSTREAM_HOME/lib:$LD_LIBRARY_PATH

PARSTREAM_SERVERNAME="parstream1"

PARSTREAM_USER="EFM"

case "$1" in

'start')

echo "Starting ParStream daemon $PARSTREAM_SERVERNAME as $PARSTREAM_USER"

sleep 2

su -c "cd $PARSTREAM_HOME;$PARSTREAM_HOME/bin/start.sh $PARSTREAM_SERVERNAME" $PARSTREAM_USER

;;

'stop')

echo "Stopping ParStream daemons for user $PARSTREAM_USER"

stopstatus=$(pkill -c -U $PARSTREAM_USER -15 parstream-serv)

echo "$stopstatus processes stopped"

;;

*)

# usage

echo "usage: $0 start|stop"

exit 1

;;

esac

確保調整環境變數以符合您的環境：PARSTREAM_HOME、PARSTREAM_SERVERNAME和PARSTREAM_USER。

建立檔案後，請確定檔案已標示為可執行檔。

對於Systemd

root@cen7 ~]# cat /etc/systemd/system/parstream.service

[Unit]

Description=ParStream

After=network.target

[Service]

Type=simple

User=EFM

Environment=LD_LIBRARY_PATH=/opt/cisco/kinetic/parstream/lib:$LD_LIBRARY_PATH

WorkingDirectory=/opt/cisco/kinetic/parstream/

ExecStart=/opt/cisco/kinetic/parstream/bin/parstream-server parstream1 --confdir=/opt/cisco/kinetic/parstream/conf/

Restart=on-failure

[Install]

WantedBy=multi-user.target

確保調整配置變數，以便與ExecStart行上的User=和servername環境相匹配。

建立服務檔案之後，請確定您已更新systemd中的常駐程式檔案：

[root@cen7 ~]# systemctl daemon-reload

驗證

使用本節內容，確認您的組態是否正常運作。

若要驗證指令碼/服務檔案是否如預期般運作，您可以嘗試啟動和停止服務。

對於init.d

[root@cen7 ~]# /etc/init.d/parstream start

Starting ParStream daemon parstream1 as EFM

Server Process ID: 5056

Output is written to: /var/log/parstream/server-5054-20180423-1648.log

[root@cen7 ~]# ps aux |grep 5056

EFM        5056  0.8  0.7 1235292 27200 ?       Sl   16:48   0:00 /opt/cisco/kinetic/parstream//bin/parstream-server parstream1

...

[root@cen7 ~]# /etc/init.d/parstream stop

Stopping ParStream daemons for user EFM

1 processes stopped

對於Systemd

[root@cen7 ~]# systemctl start parstream

[root@cen7 ~]# systemctl status parstream

● parstream.service - ParStream

Loaded: loaded (/etc/systemd/system/parstream.service; disabled; vendor preset: disabled)

Active: active (running) since Mon 2018-04-23 16:49:30 CEST; 3s ago

Main PID: 5186 (parstream-serve)

CGroup: /system.slice/parstream.service

└─5186 /opt/cisco/kinetic/parstream/bin/parstream-server parstream1 --confdir=/opt/cisco/kinetic/parstream/conf/

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30]:unknown-000000:PROT-77086: **** PID:         5186 (host: cen7)

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30]:unknown-000000:PROT-71005: **** config file: "/opt/cisco/kinetic/parstream/conf/parstream.ini"

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30]:unknown-000000:WARNING-77082: Number of maximum file descriptors (1024) is lower than recommended value 98304

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30]:unknown-000000:WARNING-77113: Maximum number of mmap'ed areas (65530) is lower than recommended value 1966080.

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30.273380]:parstream1-164930:PROT-77045: Source Revision: 717e27f507aab73fdc0c3f9d4377ff658726c270

Apr 23 16:49:30 cen7 parstream-server[5186]: Local Changes:

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30.278632]:parstream1-164930:PROT-77018: cluster node config: ClusterNodeConfig(clusterId = 'localCluster', claimLeadershipInitT...geInterval = 0

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30.280474]:parstream1-164930:PROT-77018: channel instance created for accept on port: 23460

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30.281084]:parstream1-164930:PROT-77134: Entering state ClaimLeadershipState, got event InitialEvent

Apr 23 16:49:30 cen7 parstream-server[5186]: [2018-04-23T16:49:30.281243]:parstream1-164930:PROT-77065: Running cluster leader detection (limited until 2018-Apr-23 16:51:30)

Hint: Some lines were ellipsized, use -l to show in full.

[root@cen7 ~]# systemctl stop parstream

如您所見，ParStream進程在您在服務檔案中定義的使用者下啟動，在您請求停止服務之後，所有內容都將得到清理。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

如果啟動時遇到問題，請檢查以下項：

- init.d或Systemd服務檔案中的可配置引數（使用者、路徑、ParStream伺服器名稱）

- 檢查ParStream的日誌檔輸出（位於/var/log/parstream）

- 對於SystemD：systemctl status parstream的輸出

- journalctl —unit=parstream的輸出