目錄

簡介

背景資訊

縮寫

vPC埠通道故障排除的先決條件

vPC驗證

1. vPC狀態：show vpc

2. vPC角色、vPC系統mac和LAG ID:show vpc role

3. Port-channel Status : show port-channel extended

4. TEP詳細資訊和邏輯對等鏈路狀態：show system internal epm vpc

5. ZMQ連線詳細資訊：顯示系統內部vpcm zmq統計資訊

排除VPC埠通道故障

1.物理埠關閉

2.由LACP暫停

3.由vPC暫停

4. LACP暫停個人

其他錯誤

1. mcp-loop-err-disable

2. bpdu-guard-err-disable

簡介

本文檔介紹如何識別和解決ACI中的vPC可能出現的問題。

背景資訊

虛擬埠通道(vPC)允許物理連線到兩個不同的ACI枝葉節點的鏈路顯示為連線到第三台裝置（即網路交換機、伺服器和支援鏈路聚合技術的任何其他網路裝置）的單個埠通道。vPC包括兩個指定為vPC對等交換機的ACI枝葉交換機。在vPC對等裝置中，一個為主要，另一個為輔助。由交換機構成的系統稱為vPC域

vPC對等體之間沒有專用對等鏈路；相反，交換矩陣本身充當MCT。

·對等可達性協定 — 使用ZMQ代替CFS。

· ZMQ是一個開源的高效能消息庫，使用TCP作為傳輸。

·此庫在交換機上打包為libzmq，並連結到需要與vPC對等體通訊的每個應用程式。

對等體可達性不是通過物理對等鏈路來處理；而是使用路由觸發器來檢測對等體可達性。

· vPC Manager向URIB註冊對等路由通知。

·當ISIS發現到對等體的路由時，URIB會通知vPC管理器，然後嘗試開啟與對等體的ZMQ套接字。

·當對等路由被ISIS撤銷時，vPC管理器將再次被URIB通知，並關閉MCT鏈路。

作為升級最佳實踐的一部分，建議至少在兩個不同的組中升級每個pod中的交換機，以便每個pod中有一半的枝葉和主幹節點在任意給定時間啟動。例如，一個組具有偶數編號的枝葉和主幹節點，另一個組在每個pod中具有奇數編號的枝葉和主幹。通過vPC配置裝置，我們可以將至少一個裝置置於不同的組中，以確保在升級期間至少有一個裝置處於運行狀態。這樣可防止升級期間出現任何故障，因為至少有一個裝置在升級另一個裝置時保持運行。

縮寫

ACI：以應用程序為中心的基礎設施

vPC：虛擬埠通道

MCT：多機箱EtherChannel中繼

CFS：思科交換矩陣服務

ZMQ：零消息隊列

LACP：連結彙總控制通訊協定

PDU：協定資料單元

LAG：鏈路聚合

vPC埠通道故障排除的先決條件

有關vPC配置，請參閱

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/4-x/L2-configuration/Cisco-APIC-Layer2-Configuration-Guide-42x/Cisco-APIC-Layer2-Configuration-Guide-421_chapter_0111.html

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/2-x/L2_config/b_Cisco_APIC_Layer_2_Configuration_Guide/b_Cisco_APIC_Layer_2_Configuration_Guide_chapter_0100.html

vPC驗證

1. vPC狀態：show vpc

FAB3-L1# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    up     success     success                    86

FAB3-L2# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po2    up     success     success                    86

輸出顯示，使用vPC域ID 101形成對等鄰接關係，注意vPC保持活動狀態在ACI中禁用，因為不需要專用鏈路。Po3在活動VLAN 86的vPC中處於UP狀態。請注意，vPC對交換機上的埠通道號可以不同。

2. vPC角色、vPC系統mac和LAG ID:show vpc role

FAB3-L1# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : primary, operational secondary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:81:c4:b1:25:4f

vPC local role-priority         : 101

FAB3-L2# show vpc role

vPC Role status

----------------------------------------------------

vPC role                        : secondary, operational primary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:65

vPC system-priority             : 32667

vPC local system-mac            : 00:5d:73:57:c4:2c

vPC local role-priority         : 102

此命令顯示L1為主路由器，L2為次路由器。

由於終端裝置連線到兩個不同的vPC交換機，因此它們必須有一種機制將vPC對等裝置標識為一個邏輯裝置。這可以通過在對等體之間共用的LAG ID中使用vPC系統MAC來實現。這使終端裝置將vPC對等裝置視為一個邏輯單元。

N3K# show lacp interface ethernet 1/24

Interface Ethernet1/24 is up

Channel group is 1 port channel is Po1

PDUs sent: 31726

PDUs rcvd: 31634

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 4121), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 15d)] ]

Operational as aggregated link since Fri Sep  2 08:05:52 2022

Local Port: Eth1/24   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x15d

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x4121

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x4121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

N3K# show lacp interface ethernet 1/25

Interface Ethernet1/25 is up

Channel group is 1 port channel is Po1

PDUs sent: 31666

PDUs rcvd: 31651

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 0-23-4-ee-be-65, 82ae, 8000, 111), (8000, 0-a6-ca-75-6f-c1, 8000, 8000, 161)] ]

Operational as aggregated link since Fri Sep  2 08:00:34 2022

Local Port: Eth1/25   MAC Address= 0-a6-ca-75-6f-c1

System Identifier=0x8000,  Port Identifier=0x8000,0x161

Operational key=32768

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=61

Actor Oper State=61

Neighbor: 0x111

MAC Address= 0-23-4-ee-be-65

System Identifier=0x7f9b,  Port Identifier=0x8000,0x111

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=IN_SYNC

Collecting=true

Distributing=true

Partner Admin State=61

Partner Oper State=61

Aggregate or Individual(True=1)= 1

輸出顯示LAG ID(7f9b， 0-23-4-ee-be-65, 82ae， 8000, 4121)，它是作為系統ID的優先順序(32667 in Hex)、vPC系統mac(00:23:04:ee:be:65)、操作金鑰(33454 in Hex)和埠識別符號的組合。

3. Port-channel Status : show port-channel extended

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SU)     101-102                  LACP      Eth1/33(P)

Show port-channel extended顯示有關埠通道捆綁所包含的物理鏈路狀態的詳細資訊。

4. TEP詳細資訊和邏輯對等鏈路狀態：show system internal epm vpc

FAB3-L1# show system internal epm vpc

Local TEP IP                  : 10.3.208.64

Peer TEP IP                   : 10.3.208.67

vPC configured                : Yes

vPC VIP                       : 10.3.16.67

MCT link status               : Up

Local vPC version bitmap      : 0x7

Peer vPC version bitmap       : 0x7

Negotiated vPC version        : 3

Peer advertisement received   : Yes

Tunnel to vPC peer            : Up

vPC# 686

if : port-channel3, if index : 0x16000002

local vPC state : MCEC_STATE_UP, peer vPC state : MCEC_STATE_UP

current link state : LOCAL_UP_PEER_UP

vPC fast conv : Off

5. ZMQ連線詳細資訊：顯示系統內部vpcm zmq統計資訊

FAB3-L1# show system internal vpcm zmq statistics

--------------------------------------------

MCECM ZMQ counters

----------------------------------------------

ZMQ server                                        : 1

ZmQ: Registered ZmQ print callback

ZmQ: ====== Start ZMQ statistics printing ======

ZmQ: ZMQ socket type: 5, local ID: 40d0030a

ZmQ:     Socket base 0x1109c3b4, #endpoints 1

ZmQ:     Total 1 I/O pipes, CONNECT CNT: 0, DISCONNECT CNT: 0

ZmQ:     RX CNT: 66, BYTES: 124132, ERRORS: 0

ZmQ:     TX CNT: 66, BYTES: 125096, ERRORS: 0

ZmQ:         Pipe tcp://10.3.208.64:5001 (ID:  FD 54 flag 1 state 0): read 66 (124132 bytes) write 66 (125096 bytes) Peer I/O pipe: read  66 (125096 bytes) write 66 (124132 bytes)

ZmQ:         Stream engine 0xae90049c ZMQ SOCKET 0x1109c3b4 TCP FD: 54 @ 10.3.208.67:58740

ZmQ:             RX CNT: 72 BYTES: 124494 ERRORS: 0 TX CNT: 73 BYTES: 125458 ERRORS: 0

ZmQ:             CONNECT CNT: 0 DISCONNECT CNT: 0

ZmQ: ====== End ZMQ statistics printing ======

ZMQ統計資訊顯示ZMQ會話的狀態、連線和斷開的發生次數以及發生的任何錯誤。

排除VPC埠通道故障

1.物理埠關閉

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  success     success

輸出鞋Po3下降。

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

我們進一步瞭解作為port-channel一部分的介面狀態。這裡Eth1/33處於Down狀態。LACP被配置為繫結協定。

FAB3-L1# show int e1/33

Ethernet1/33 is down (notconnect)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:08:15

Last clearing of "show interface" counters never

9 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 0 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 0 bps, 0 pps

Show interface output提供介面e1/33的更多詳細資訊。我們可以看到E1/33在notconnect狀態下關閉。

建議的操作：

請確保連線埠正確連線且組態正確。

2.由LACP暫停

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

3     Po3(SD)     101-102                  LACP      Eth1/33(s)

輸出顯示Eth1/33處於掛起狀態。接下來，我們檢視show interface Eth1/33以瞭解更多詳細資訊。

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspended-due-to-no-lacp-pdus)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

EEE (efficient-ethernet) : n/a

Last link flapped 00:00:13

Last clearing of "show interface" counters never

12 interface resets

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 1640 bits/sec, 0 packets/sec

Show interface表示連線埠已暫停，因為沒有LACP PDU。我們可以進一步檢視LACP計數器，並確定是否正在傳送和接收LACP PDU。

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       314    264      0      0        0      0        0

FAB3-L1#

FAB3-L1#

FAB3-L1# show lacp counters interface port-channel 3

LACPDUs         Marker      Marker Response    LACPDUs

Port              Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

---------------------------------------------------------------------

port-channel3

Ethernet1/33       315    264      0      0        0      0        0

輸出顯示，計數器僅遞增傳送的LACPDU，Recv計數器保持不變。這表示我們沒有收到來自遠端的LACP PDU。

我們還可以檢視LACP協商引數、計數器等。對於特定介面，請使用「show lacp interface e1/33」。

FAB3-L1# show lacp interface e1/33

Interface Ethernet1/33 is suspended

Channel group is 3 port channel is Po3

PDUs sent: 317

PDUs rcvd: 264   received

Markers sent: 0

Markers rcvd: 0

Marker response sent: 0

Marker response rcvd: 0

Unknown packets rcvd: 0

Illegal packets rcvd: 0

Lag Id: [ [(7f9b, 00-23-04-ee-be-65, 82ae, 8000, 121), (0, 0-0-0-0-0-0, 0, 0, 0)] ]

Operational as aggregated link since  Mon Aug 22 09:29:53 2022

Local Port: Eth1/33   MAC Address= 00-81-c4-b1-25-4f

System Identifier=0x8000,00-81-c4-b1-25-4f

Port Identifier=0x8000,0x121

Operational key=33454

LACP_Activity=active

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner information refresh timeout=Long Timeout (90s)

Actor Admin State=(Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0)

Actor Oper State=Ac-1:To-0:Ag-1:Sy-0:Co-0:Di-0:De-1:Ex-0

Neighbor: 0x0

MAC Address= 0-0-0-0-0-0

System Identifier=0x0,0x0

Port Identifier=0x0,0x0

Operational key=0

LACP_Activity=unknown

LACP_Timeout=Long Timeout (30s)

Synchronization=NOT_IN_SYNC

Collecting=false

Distributing=false

Partner Admin State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Partner Oper State=(Ac-0:To-0:Ag-0:Sy-0:Co-0:Di-0:De-0:Ex-0)

Aggregate or Individual(True=1)= 2

此外，還可以在枝葉上為LACP資料包捕獲資料包，您可以使用特定過濾器過濾出有問題的介面。

tcpdump -vvvi kpm_inb ether proto 0x8809

建議的操作：

確保在遠端端正確配置了LACP，並且裝置在正確的介面上傳送了LACP PDU。

3.由vPC暫停

FAB3-L1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 101

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

686  Po3    down*  failed      vpc port channel

mis-config due to

vpc links in the 2

switches connected

to different

partners

此輸出顯示vPC埠通道因vPC配置錯誤而關閉。現在來進一步瞭解埠通道狀態。

FAB3-L1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

3     Po3(SD)     Eth      LACP      Eth1/33(D)

這裡Eth1/33處於Down狀態，我們進一步檢視「show interface e1/33」以瞭解更多詳細資訊。

FAB3-L1# show int e1/33

Ethernet1/33 is down (suspend-by-vpc)

admin state is up, Dedicated Interface

Belongs to po3

Hardware: 100/1000/10000/auto Ethernet, address: 0081.c4b1.2521 (bia 0081.c4b1.2521)

MTU 9000 bytes, BW 0 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 10 Gb/s

FEC (forward-error-correction) : disable-fec

Beacon is turned off

Auto-Negotiation is turned on

Input flow-control is off, output flow-control is off

Auto-mdix is turned off

Switchport monitor is off

EtherType is 0x8100

vPC使用LAG ID確定vPC對等體是否連線到同一主機，如果LAG ID不匹配，則介面由vPC掛起。

「Show vpc brief」顯示vPC對等體上的埠通道中的物理鏈路未連線到同一遠端裝置。

可以使用「show vpc consistency-parameters interface port-channel 3」檢查LAG ID比較。

FAB3-L1# show vpc consistency-parameters interface port-channel 3

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

lag-id                      1     [(7f9b,                [(7f9b,

0-23-4-ee-be-65, 82ae, 0-23-4-ee-be-68, 82ae,

0, 0), (8000,          0, 0), (8000,

0-a6-ca-75-6f-c1,      0-a6-ca-75-6f-c1,

8000, 0, 0)]           8000, 0, 0)]

mode                        1     active                 active

Speed                       1     10 Gb/s                10 Gb/s

Duplex                      1     full                   full

Port Mode                   1     trunk                  trunk

Native Vlan                 1     0                      0

MTU                         1     9000                   9000

vPC card type               1     Empty                  Empty

Allowed VLANs               -     86                     86

Local suspended VLANs       -     -                      -

如果LAG-ID埠不匹配，將掛起。

建議的操作：

確保port-channel中的物理鏈路連線到同一遠端裝置。

4. LACP暫停個人

LACP將埠設定為掛起狀態（如果它沒有從對等方接收LACP PDU）。這可能會導致某些伺服器無法啟動，因為它們需要LACP來邏輯啟動埠。您可以通過禁用LACP掛起個人將行為調整為單獨使用。為此，請在vPC策略組中建立一個埠通道策略，並在將LACP活動模式設定為後，刪除Suspend Individual Port。現在，vPC中的埠保持活動狀態，並繼續傳送LACP資料包。

FAB3-L1# show port-channel extended

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

b - BFD Session Wait

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-----------------------------------------------------------------------------

Group Port-       BundleGrp                Protocol  Member Ports

Channel

-----------------------------------------------------------------------------

1     Po1(SD)     101-102                  LACP      Eth1/33(I)

輸出顯示，即使刪除LACP Suspend-Individual標誌後，我們沒有在Eth1/33上接收LACP PDU，埠作為單個埠處於UP狀態。請注意，我們仍然通過此配置從ACI枝葉傳送LACP PDU，一旦收到LACP PDU，埠將返回到捆綁模式。

其他錯誤

更多並非特定於vPC但仍適用於vPC介面的介面錯誤。有關詳細資訊，請參閱連結。

1. mcp-loop-err-disable

https://www.cisco.com/c/dam/en/us/solutions/collateral/data-center-virtualization/application-centric-infrastructure/aci-guide-using-mcp-mis-cabling-protocol.pdf

2. bpdu-guard-err-disable

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/aci_virtual_edge/configuration/1-x/b_Virtual_Edge_Config_Guide_1_2_1/b_Virtual_Edge_Config_Guide_1_2_1_chapter_0101.pdf