目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

拓撲說明

網路圖表

驗證

疑難排解

纜線錯誤問題

偵測到個別連線埠（按回圈）

介面更改為操作關閉

LACP日誌

相關資訊

簡介

本文檔介紹確定ACI上的虛擬埠通道(vPC)通訊問題所需的命令。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

在以應用為中心的基礎設施(ACI)和對等裝置之間的vPC必須已啟動並正常運行，且沒有配置問題。

設定

拓撲說明

ACI枝葉1：介面乙太網1/1、埠通道5和vPC 343。

ACI枝葉2：介面乙太網1/2、埠通道5和vPC 343。

NX-OS 1：介面Ethernet 1/1和Ethernet 1/2、埠通道14和vPC 45。

連線：

枝葉1 Eth1/1 <-> NX-OS 1 Eth1/1

枝葉2 Eth1/2 <-> NX-OS 1 Eth1/2

網路圖表

驗證

使用本節內容，確認您的組態是否正常運作。

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用Cisco CLI Analyzer檢視show指令輸出的分析。

使用命令show vpc brief vpc x您可以看到vPC的狀態（開啟/關閉）。

LEAF1#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     success     success                100

LEAF2#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     success     success                100

使用命令 show port-channel summary interface port-channel x  您可以看到連線埠通道的狀態（開啟/關閉）、目前旗標和設定它的實體介面。

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/1(P)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SU)     Eth      LACP      Eth1/2(P)

疑難排解

本節提供的資訊用於對組態進行疑難排解。

纜線錯誤問題

在APIC GUI上，您必須看到以下故障：

Fault F0518: A configuration is not consistent with peer node. Misconfigured due to vPC link in the 2 switches connected to different partners.

ACI枝葉1：介面乙太網1/1、埠通道5和vPC 343。

ACI枝葉2：介面乙太網1/2、埠通道5和vPC 343。

NXOS 1：介面Ethernet 1/1和Ethernet 1/2、埠通道14和vPC 45。

連線：

枝葉1 Eth1/1 <-> NXOS 1 Eth1/1

枝葉2 Eth1/2 <-> NXOS 1 Eth1/2

如果遇到此問題，則輸出與範例類似：

LEAF1#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     failed      vpc port               100

channel

mis-config

due to vpc

links in the

2 switches

connected to

different

partners

LEAF2#show vpc brief vpc 343

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                 Active vlans

--   ----   ------ ----------- ------                 ------------

343  Po5    up     failed      vpc port               100

channel

mis-config

due to vpc

links in the

2 switches

connected to

different

partners

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/1(D)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/2(D)

LEAF1# show lacp interface ethernet 1/1 | grep Lag

Lag Id: [ [(7f9b, 0-11-1-aa-aa-aa, 8157, 8000, 10d), (8000, 0-22-2-bb-bb-bb, 65, 8000, 125)] ]

LEAF2# show lacp interface ethernet 1/2 | grep Lag

Lag Id: [ [(7f9b, 0-11-1-aa-aa-aa, 8157, 8000, 10d), (8000, 0-33-3-cc-cc-cc, 65, 8000, 125)] ]

連線的裝置延遲資訊（輸出命令中的第二個向量）在兩個輸出中必須相同。同樣，向量1在兩者上必須相同。

下一步：

如果發生此行為，則必須檢查物理連線，以確保連線未交換在埠上。

偵測到個別連線埠（按回圈）

在APIC GUI上，您必須看到以下故障：

Fault F2705: A vPC interface goes down while peer interface is up.

Fault F2533: A loop was detected by the MCP protocol on ACI.

此問題影響在對等裝置上運行STP協定的vPC拓撲。

ACI枝葉1：介面乙太網1/1和乙太網1/2，埠通道5和vPC 343

NXOS 1：介面Ethernet 1/1、埠通道14和vPC 45

NXOS 2：介面Ethernet 1/2、埠通道14和vPC 45

連線：

枝葉1 Eth1/1 <-> NXOS 1 Eth1/1

枝葉1 Eth1/2 <-> NXOS 2 Eth1/2

在此故障排除步驟中，瞭解MisCabling Protocol(MCP)的概念非常重要。

MCP檢測來自外部源的環路(伺服器、使用STP的外部網路裝置等的不當行為)，並錯誤禁用ACI接收其自身資料包的介面。

要瞭解有關MCP的更多資訊，請參閱：為ACI使用MCP。

如果存在此問題，輸出如下所示：

LEAF2#show mcp internal info interface eth 1/2

------------------------------------------

Interface: Ethernet1/2

Native PI VLAN: 100

Native Encap VLAN: 1

BPDU Guard: disabled

BPDU Filter: disabled

Port State: down

Layer3 Port: false

Switching State: enabled

Mac Address: AA:AA:AA:AA:AA:01

Interface MCP enabled: true

------------------- STP STATS --------------------

MSTP Count: 0

RSTP Count: 4

MSTP TC Count: 0

RSTP TC Count: 4

PVRSTP TC Count: 4

TCN Count: 0

PVID Error BPDU Count: 5

Error Packet Count: 0

BPDU Guard Event Count: 0

--------------- LOOP-DETECTION STATS ---------------

MCP packets sent(Per-vlan): 1278

MCP packets received: 23

MCP invalid packets received: 19

MCP packets received with invalid digest: 0

MCP packets received when switching state is disabled: 0

Interface is a member of port-channel

Number of active VLANs: 1

Number of VLANS in MCP packets are sent: 1

MCP enabled vlans:

628

MCP loop detected at: Tue Jul 19 09:34:46 2022

MCP loop detected in VLAN: 100

-------------- MCP Remote Peer Info --------------

No remote peers exist

註：必須解決環路問題，以避免禁用介面，才能繼續使用vPC。

一旦解決了環路問題，並且物理介面已啟動，但vPC介面會繼續，其中一個介面處於關閉狀態，另一個介面處於單獨狀態：

LEAF1#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/1(I)

LEAF2#show port-channel summary interface port-channel 5

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

5     Po5(SD)     Eth      LACP      Eth1/2(D)

下一步：

確保埠通道配置在兩端正確，且通道捆綁正確。

如果兩端的組態都正確，且循環進行之前運作良好，請嘗試以下操作：

導覽至：

Fabric -> Inventory -> Pod -> Leaf x -> Interfaces -> VPC interfaces -> vpc -> Port-channel interface where is included the physical port 1/x -> right-click and select Disable.

然後等待10秒，按一下右鍵並選擇Enable.

必須在受影響的介面上執行這些步驟，以強制埠通道與對等裝置同步，而且此過程之後必須正常運行。

介面更改為操作關閉

在APIC GUI上，您必須看到以下故障：

Fault F1296: A vPC interface goes down while peer interface is also down.

此範例說明介面必須如何顯示資訊：

Leaf1# show interface port-channel 5

port-channel5 is down (port-channel-members-down)

admin state is up

Hardware: Port-Channel, address: xxxx.xxxx.xx01 (bia xxxx.xxxx.xx01)

MTU 9000 bytes, BW 100000000 Kbit, DLY 1 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, medium is broadcast

Port mode is trunk

full-duplex, 100 Gb/s

Input flow-control is off, output flow-control is off

Auto-mdix is turned on

EtherType is 0x8100

Members in this channel: eth1/1

必須審閱和放棄以下主題：

- 物理問題（收發器和電纜）必須是進行檢查的第一步。

- 兩端配置更改。

- 在枝葉介面上接收到鏈路聚合控制協定(LACP)資訊。

LACP日誌

您可以使用命令show lacp internal event-history interface ethernet 1/x要獲取與LACP狀態相關的事件，如以下示例：

Leaf1#show lacp internal event-history interface ethernet 1/1

Output omitted

...

9) FSM:<Ethernet1/1> Transition at 2022-07-15T08:43:06.121732000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT_II_INDIVIDUAL]

Next state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Output omitted

...

18) FSM:<Ethernet1/1> Transition at 2022-07-15T08:46:24.298022000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT]

Next state: [FSM_ST_NO_CHANGE]

Output omitted

...

23) FSM:<Ethernet1/1> Transition at 2022-07-15T08:46:27.299819000+00:00

Previous state: [LACP_ST_DETACHED_LAG_NOT_DETERMINED]

Triggered event: [LACP_EV_RECEIVE_PARTNER_PDU_TIMED_OUT_II_INDIVIDUAL]

Next state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Output omitted

...

24) FSM:<Ethernet1/1> Transition at 2022-07-15T08:52:25.204611000+00:00

Previous state: [LACP_ST_INDIVIDUAL_OR_DEFAULT]

Triggered event: [LACP_EV_LACP_DOWN_OR_PORT_DOWN]

Next state: [LACP_ST_PORT_IS_DOWN_OR_LACP_IS_DISABLED]

示例日誌顯示，ACI沒有收到來自對等裝置的正確應答，在某些情況下，對等裝置在保持連線計時器過期之前不會傳送PDU/LACP。

下一步：

現在，您需要驗證對等裝置的配置和狀態。

Cisco CLI Analyzer（僅供已註冊客戶使用）支援某些 show 指令。使用Cisco CLI Analyzer檢視show指令輸出的分析。

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

相關資訊

- 技術支援與文件 - Cisco Systems

- ACI中的虛擬連線埠通道(vPC)

- 對ACI使用MCP（MisCabling協定）