目錄

簡介

必要條件

需求

採用元件

案例

2個EP位於同一EPG/相同枝葉 — 交換幀中

拓撲

伊拉姆語

不同EPG/相同枝葉中的2個EP — 路由資料包

拓撲

伊拉姆語

不同EPG/不同枝葉中的2個EP — 路由資料包

拓撲

伊拉姆語

1 EP —> L3輸出 — 路由流

拓撲

伊拉姆語

1 EP —>遠端EP或SVI — 主幹驗證

拓撲

邏輯

合成IP

光纖模組ELAM

額外方案：獲取不在「hal internal-port pi」輸出中的Ovector

拓撲

邏輯

簡介

本文檔介紹在應用中心基礎設施(ACI)中使用基於「EX」的ACI交換機的不同轉發方案。它將說明如何驗證硬體是否已正確程式設計，以及我們正在將資料包轉發到相應終端組(EPG)中的正確目標終端(EP)。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據以下硬體和軟體版本：

- ACI交換矩陣，包括使用EX硬體的兩個主幹交換機和兩個枝葉交換機

- 一台帶有兩個上行鏈路的ESXi主機，分別連線到每台枝葉交換機

- 充當路由器的Nexus 5000裝置。

- 用於初始設定的應用策略基礎設施控制器(APIC)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

案例

2個EP位於同一EPG/相同枝葉 — 交換幀中

拓撲

根據此拓撲，從EP1到EP2的流是L2流，應在源流量進入的任何枝葉上本地交換。 要檢查第2層(L2)資料流，首先要檢查mac地址表，以確定交換機是否接收幀以及在何處收到幀：

leaf4# show mac address-table | grep fccc

* 30       0050.56a5.fccc    dynamic      -       F    F    po3

leaf4# show mac address-table | grep 6794

* 30       0050.56a5.6794    dynamic      -       F    F    po4

若要檢視封裝VLAN，您還可以檢查EP資料庫：

leaf4# show endpoint mac 0050.56a5.fccc

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

30                                        vlan-2268    0050.56a5.fccc LV                        po3

Joey-Tenant:Joey-Internal                 vlan-2268      192.168.20.2 LV                        po3

calo2-leaf4# show endpoint mac 0050.56a5.6794

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

30                                        vlan-2268    0050.56a5.6794 LV                        po4

Joey-Tenant:Joey-Internal                 vlan-2268      192.168.20.3 LV                        po4

我們知道FD_VLAN 30匹配，但我們可以始終在軟體中驗證對映：

leaf4# show vlan extended | grep 2268

30   enet  CE         vlan-2268

當然，我們可以檢查硬體，以確保VLAN 30對映到作為前面板封裝的VLAN 2268。

leaf4# vsh_lc

module-1# show system internal eltmc info vlan 30

vlan_id:             30   :::      hw_vlan_id:             22

vlan_type:        FD_VLAN   :::         bd_vlan:             28

access_encap_type:         802.1q   :::    access_encap:           2268

fabric_encap_type:          VXLAN   :::    fabric_encap:          11960

sclass:          32778   :::           scope:             11

untagged:              0

acess_encap_hex:          0x8dc   :::  fabric_enc_hex:         0x2eb8

pd_vlan_ft_mask:            0x8

fd_learn_disable:              0

qos_class_id:              0   :::      qos_pap_id:              0

qq_met_ptr:             25   :::      ipmc_index:              0

ingressBdAclLabel:              0   ::: ingBdAclLblMask:              0

egressBdAclLabel:              0   ::: egrBdAclLblMask:              0

qos_map_idx:              0   :::     qos_map_pri:              0

qos_map_dscp:              0   :::      qos_map_tc:              0

vlan_ft_mask:          0xe30

hw_bd_idx:              0   :::      hw_epg_idx:          11267

intf_count:              2   ::: glbl_scp_if_cnt:              2

<SNIPPED>

鑑於已經從軟體中學習了電子產品，我們還可以驗證硬體是否也對這些電子產品的二級資訊進行程式設計。 在新硬體中，硬體抽象層(HAL)是硬體的軟體狀態。 HAL的工作是接受軟體程式設計請求，並將其推送到硬體上。

為了檢視有關終端的L2硬體資訊，我們可以檢視HAL中給定mac地址的L2表：

leaf4# vsh_lc

module-1# show platform internal hal ep l2 mac 0050.56a5.fccc

LEGEND:

-------

BDId:              BD Id                                                   BD Name:        BD Name

T:                 EP Type (Pl: Physical Vl: Virtual Xr: Remote            EP Mac:         Mac

L2 IfId:           L2 Interface                                            L2 IfName:      L2 IfName

FDId:              FD Id                                                   FD Name:        FD Name

S Class:           S Class                                                 Age Intvl:      Age Interval

P A:               Packet Action (F: Forward, T: Trap to CPU,

L: Log & Forward, D: Drop, N: None)

S T:               Static Ep                                               S E:            Secure EP

L D:               Learn Disable                                           B N D:          Bind Notify Disable

E N D:             Epg Notify Disable                                      B E:            Bounce Enable

I D L:             IVxlan Dont Learn                                       SPI:            Source Policy Incomplete

DPI:               Dest Policy Incomplete                                  SPA:            Source Policy Applied

DPA:               Dest Policy Applied                                     DSS:            Dest Shared Service

IL:                Is Local                                                VUB:            Vnid Use Bd

SO:                SA Only

L2 EP Count: 1

======================================================================================================================

B E   I S D S D D   V

BD           EP                L2       L2               FD        S     Age   P S S L N N B D P P P P S I U S

BdId Name      T  Mac               IfId     Ifname      FDId Name      Class Intvl A T E D D D E L I I A A S L B O

======================================================================================================================

1c   BD-28     Pl 00:50:56:a5:fc:cc 16000002 Po3         1e   FD-30     800a  29f   F 0 0 0 1 0 0 0 0 0 0 0 0 1 0 0

module-1# show platform internal hal ep l2 mac 0050.56a5.6794

======================================================================================================================

B E   I S D S D D   V

BD           EP                L2       L2               FD        S     Age   P S S L N N B D P P P P S I U S

BdId Name      T  Mac               IfId     Ifname      FDId Name      Class Intvl A T E D D D E L I I A A S L B O

======================================================================================================================

1c   BD-28     Pl 00:50:56:a5:67:94 16000003 Po4         1e   FD-30     800a  29f   F 0 0 0 1 0 0 0 0 0 0 0 0 1 0 0

現在我們已經規劃了硬體，讓我們來執行ELAM並檢視資料包應該傳送到哪裡。

伊拉姆語

leaf4# vsh_lc

module-1# debug platform internal tah elam asic 0

module-1(DBG-TAH-elam)# trigger reset

module-1(DBG-TAH-elam)# trigger init in-select 6 out-select 0

module-1(DBG-TAH-elam-insel6)# set outer l2 src_mac 0050.56a5.fccc dst_mac 0050.56a5.6794

module-1(DBG-TAH-elam-insel6)# start

module-1(DBG-TAH-elam-insel6)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Triggered

module-1(DBG-TAH-elam-insel6)# report | grep ovec

sug_elam_out_sidebnd_no_spare_vec.ovector_idx: 0x9E

很好，因此Leaf4在Asic 0片1上收到該幀。在新硬體上使用ELAM時，出現了一個在故障排除時非常重要的新的欄位：ovector_idx。 此索引是轉發幀/資料包時應使用的物理埠索引。 收到ovector_idx後，我們可以使用此命令查詢它對映到的埠：

module-1(DBG-TAH-elam-insel6)# show platform internal hal l2 port gpd

Legend:

-------

IfId:       Interface Id                                    IfName:      Interface Name

I P:        Is PC Mbr                                       IfId:           Interface Id

Uc PC Cfg:      UcPcCfg Idx                                 Uc PC MbrId:    Uc Pc Mbr Id

As:             Asic                                        AP:             Asic Port

Sl:             Slice                                       Sp:             Slice Port

Ss:             Slice SrcId                                 Ovec:           Ovector (slice | srcid)

L S:            Local Slot                                  Reprogram:

L3:             Is L3

P:    PifTable                                          Xla Idx:        Xlate Idx

RP:   Rw PifTable                                       Ovx Idx:        OXlate Idx

IP:   If Profile Table                                  N L3:           Num. of L3 Ifs

RS:   Rw SrcId Table                                    NI L3:          Num. of Infra L3 Ifs

DP:   DPort Table                                       Vif Tid:        Vif Tid

SP:   SrcPortState Table                                RwV Tid:        RwVif Tid

RSP:  RwSrcPortstate Table                              Ing Lbl:        Ingress Acl Label

UC:   UCPcCfg                                           Egr Lbl:        Egress Acl Label

UM:   UCPcMbr                                           Reprogram:

PROF ID:        Lport Profile Id

VS:   VifStateTable                                     HI:             LportProfile Hw Install

RV:   Rw VifTable

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Port Count: 8

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1a004000 Eth1/5      1 0    1d    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a005000 Eth1/6      1 0    b     0  e  0  d  1a 1a   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a006000 Eth1/7      0 26   5     0  f  0  e  1c 1c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-256  -      800  0      0 1   e    0

1a007000 Eth1/8      0 2e   7     0  10 0  f  1e 1e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-84   -      800  0      0 1   30   0

1a01e000 Eth1/31     1 0    2d    0  37 1  e  1c 9c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a01f000 Eth1/32     1 0    3d    0  38 1  f  1e 9e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a030000 Eth1/49     0 2    1     0  49 1  20 38 b8   1   0 0 0 0 0 0  0  0 0 0   1 8   6   2  2  D-24d  -      400  0      0 0   1    0

1a031000 Eth1/50     0 3    3     0  29 1  0  0  80   1   0 0 0 0 0 0  0  0 0 0   1 9   7   2  2  D-350  -      400  0      0 0   1    0

交換器認為封包應該從介面Ethernet 1/32轉送。是在得知MAC位址的PO4嗎？

leaf4# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/5(P)

2     Po2(SU)     Eth      LACP      Eth1/6(P)

3     Po3(SU)     Eth      LACP      Eth1/31(P)

4     Po4(SU)     Eth      LACP      Eth1/32(P)

會，因此封包會從介面1/32轉送到目的地主機。

不同EPG/相同枝葉中的2個EP — 路由資料包

拓撲

在本示例中，我們將跟蹤資料包從EP1到EP2的流量，其中資料包存在於同一個vPC枝葉對中。 兩個EP使用不同的BD位於不同的EPG中。

首先要始終檢查EP資料庫，看我們是否學習了EP:

leaf4# show endpoint ip 192.168.20.2

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

30                                        vlan-2268    0050.56a5.fccc LV                        po3

Joey-Tenant:Joey-Internal                 vlan-2268      192.168.20.2 LV                        po3

calo2-leaf4# show endpoint ip 192.168.21.2

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

8                                         vlan-2200    0050.56a5.0c11 LV                        po4

Joey-Tenant:Joey-Internal                 vlan-2200      192.168.21.2 LV                        po4

由於我們已經學習了EP並瞭解了IP資訊，因此我們應當能夠檢視硬體中的EP學習資訊：

leaf4# vsh_lc

module-1# show platform internal hal ep l3 all

LEGEND:

-------

VrfName:           Vrf Name                                                T:              Type (Pl: Physical, Vl: Virtual, Xr: Remote)

EP IP:             Endpoint IP

S Class:           S Class                                                 Age Intvl:      Age Interval

S T:               Static Ep                                               S E:            Secure EP

L D:               Learn Disable                                           B N D:          Bind Notify Disable

E N D:             Epg Notify Disable                                      B E:            Bounce Enable

I D L:             IVxlan Dont Learn                                       SPI:            Source Policy Incomplete

DPI:               Dest Policy Incomplete                                  SPA:            Source Policy Applied

DPA:               Dest Policy Applied                                     DSS:            Dest Shared Service

IL:                Is Local                                                VUB:            Vnid Use Bd

SO:                SA Only                                                 EP NH L3IfName: EP Next Hop L3 If Name

NHT:               Next Hop Type (L2: L2 Entry L3: L3 Next Hop)            BD Name:        L2 NH BD Name

EP Mac:            EP Mac                                                  L3 IfName:      L3 NH If Name

L2 IfName:         L2 If Name                                              FD Name:        L2 Entry FD Name

IP:                L3 NH IP

L3 EP Count: 12

===========================================================================================================================================================================================

B E   I S D S D D   V   EP-NH        N  |

Vrf              EP                              S     Age   S S L N N B D P P P P S I U S L3           H  | BD        EP                L3           L2          FD

Name          T  IP                              Class Intvl T E D D D E L I I A A S L B O IfName       T  | Name      Mac               IfName       Ifname      Name      IP

===========================================================================================================================================================================================

common*rewall Pl 10.6.112.1                      1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*rewall Pl 10.6.114.1                      1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*rewall Pl 10.6.114.129                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*efault Pl 100.100.101.1                   1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.1.1                     1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Xr 192.168.1.100                   8013  128   0 0 0 1 0 0 0 0 0 0 0 0 0 1 0 -            L3   -         00:0c:0c:0c:0c:0c Tunnel2      Tunnel2     -         0.0.0.0

Joey-T*ernal2 Pl 192.168.3.1                     1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.20.1                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.20.2                    800a  0     0 0 0 0 0 0 0 0 0 0 0 0 1 0 0 -            L2   BD-28     00:50:56:a5:fc:cc -            Po3         FD-30     -

Joey-T*ternal Pl 192.168.21.1                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.21.2                    800c  0     0 0 0 0 0 0 0 0 0 0 0 0 1 0 0 -            L2   BD-7      00:50:56:a5:0c:11 -            Po4         FD-8      -

Joey-T*ternal Pl 2001:0:0:100::1                 1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

HAL第3層(l3)表非常有用，因為它為我們提供了第3層獲知EP的VLAN/埠資訊。 我們知道目的地是Po4，因此應該將封包從Po4中的任何連線埠轉送。

我們運行一個ELAM並檢視結果！

伊拉姆語

leaf4# vsh_lc

module-1# debug platform internal tah elam asic 0

module-1(DBG-TAH-elam)# trigger init in-select 6 out-select 0

module-1(DBG-TAH-elam-insel6)# set outer ipv4 src_ip 192.168.20.2 dst_ip 192.168.21.2

module-1(DBG-TAH-elam-insel6)# start

module-1(DBG-TAH-elam-insel6)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Armed

module-1(DBG-TAH-elam-insel6)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Triggered

module-1(DBG-TAH-elam-insel6)# report | grep ovec

sug_elam_out_sidebnd_no_spare_vec.ovector_idx: 0x9E

很好，所以我們觸發了資料包，我們發現「ovector_idx」是0x9E。ovector索引是應該將資料包轉發出來的傳出物理介面索引。 讓我們看看哪個連線埠具有此索引：

module-1(DBG-TAH-elam-insel6)# show platform internal hal l2 port gpd

Legend:

-------

IfId:       Interface Id                                    IfName:      Interface Name

I P:        Is PC Mbr                                       IfId:           Interface Id

Uc PC Cfg:      UcPcCfg Idx                                 Uc PC MbrId:    Uc Pc Mbr Id

As:             Asic                                        AP:             Asic Port

Sl:             Slice                                       Sp:             Slice Port

Ss:             Slice SrcId                                 Ovec:           Ovector (slice | srcid)

L S:            Local Slot                                  Reprogram:

L3:             Is L3

P:    PifTable                                          Xla Idx:        Xlate Idx

RP:   Rw PifTable                                       Ovx Idx:        OXlate Idx

IP:   If Profile Table                                  N L3:           Num. of L3 Ifs

RS:   Rw SrcId Table                                    NI L3:          Num. of Infra L3 Ifs

DP:   DPort Table                                       Vif Tid:        Vif Tid

SP:   SrcPortState Table                                RwV Tid:        RwVif Tid

RSP:  RwSrcPortstate Table                              Ing Lbl:        Ingress Acl Label

UC:   UCPcCfg                                           Egr Lbl:        Egress Acl Label

UM:   UCPcMbr                                           Reprogram:

PROF ID:        Lport Profile Id

VS:   VifStateTable                                     HI:             LportProfile Hw Install

RV:   Rw VifTable

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Port Count: 8

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1a004000 Eth1/5      1 0    1d    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a005000 Eth1/6      1 0    b     0  e  0  d  1a 1a   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a006000 Eth1/7      0 26   5     0  f  0  e  1c 1c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-256  -      800  0      0 1   c    0

1a007000 Eth1/8      0 2f   7     0  10 0  f  1e 1e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-199  -      800  0      0 1   2e   0

1a01e000 Eth1/31     1 0    2d    0  37 1  e  1c 9c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a01f000 Eth1/32     1 0    3d    0  38 1  f  1e 9e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a030000 Eth1/49     0 2    1     0  49 1  20 38 b8   1   0 0 0 0 0 0  0  0 0 0   1 6   4   2  2  D-24d  -      400  0      0 0   1    0

1a031000 Eth1/50     0 3    3     0  29 1  0  0  80   1   0 0 0 0 0 0  0  0 0 0   1 5   3   2  2  D-350  -      400  0      0 0   1    0

似乎應該從埠1/32傳送它，對嗎？

leaf4# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/5(P)

2     Po2(SU)     Eth      LACP      Eth1/6(P)

3     Po3(SU)     Eth      LACP      Eth1/31(P)

4     Po4(SU)     Eth      LACP      Eth1/32(P)

是的，這是正確的。

不同EPG/不同枝葉中的2個EP — 路由資料包

拓撲

在本示例中，我們將跟蹤資料包從EP1到EP2的資料包流，其中EP1存在於EX vPC對上，EP2存在於遠端第1代vPC枝葉對上。 兩個EP使用不同的BD位於不同的EPG中。

再來，我們看看環保部門從哪裡學到：

leaf4# show endpoint ip 192.168.20.2

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

30                                        vlan-2268    0050.56a5.fccc LV                        po3

Joey-Tenant:Joey-Internal                 vlan-2268      192.168.20.2 LV                        po3

calo2-leaf4# show endpoint ip 192.168.1.100

Legend:

O - peer-attached    H - vtep             a - locally-aged     S - static

V - vpc-attached     p - peer-aged        L - local            M - span

s - static-arp       B - bounce

+-----------------------------------+---------------+-----------------+--------------+-------------+

VLAN/                           Encap           MAC Address       MAC Info/       Interface

Domain                          VLAN            IP Address        IP Info

+-----------------------------------+---------------+-----------------+--------------+-------------+

Joey-Tenant:Joey-Internal                               192.168.1.100                       tunnel2

現在，讓我們驗證硬體已程式設計：

leaf4# vsh_lc

module-1# show platform internal hal ep l3 all

LEGEND:

-------

VrfName:           Vrf Name                                                T:              Type (Pl: Physical, Vl: Virtual, Xr: Remote)

EP IP:             Endpoint IP

S Class:           S Class                                                 Age Intvl:      Age Interval

S T:               Static Ep                                               S E:            Secure EP

L D:               Learn Disable                                           B N D:          Bind Notify Disable

E N D:             Epg Notify Disable                                      B E:            Bounce Enable

I D L:             IVxlan Dont Learn                                       SPI:            Source Policy Incomplete

DPI:               Dest Policy Incomplete                                  SPA:            Source Policy Applied

DPA:               Dest Policy Applied                                     DSS:            Dest Shared Service

IL:                Is Local                                                VUB:            Vnid Use Bd

SO:                SA Only                                                 EP NH L3IfName: EP Next Hop L3 If Name

NHT:               Next Hop Type (L2: L2 Entry L3: L3 Next Hop)            BD Name:        L2 NH BD Name

EP Mac:            EP Mac                                                  L3 IfName:      L3 NH If Name

L2 IfName:         L2 If Name                                              FD Name:        L2 Entry FD Name

IP:                L3 NH IP

L3 EP Count: 12

===========================================================================================================================================================================================

B E   I S D S D D   V   EP-NH        N  |

Vrf              EP                              S     Age   S S L N N B D P P P P S I U S L3           H  | BD        EP                L3           L2          FD

Name          T  IP                              Class Intvl T E D D D E L I I A A S L B O IfName       T  | Name      Mac               IfName       Ifname      Name      IP

===========================================================================================================================================================================================

common*rewall Pl 10.6.112.1                      1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*rewall Pl 10.6.114.1                      1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*rewall Pl 10.6.114.129                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

common*efault Pl 100.100.101.1                   1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.1.1                     1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Xr 192.168.1.100                   8013  128   0 0 0 1 0 0 0 0 0 0 0 0 0 1 0 -            L3   -         00:0c:0c:0c:0c:0c Tunnel2      Tunnel2     -         0.0.0.0

Joey-T*ernal2 Pl 192.168.3.1                     1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.20.1                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.20.2                    800a  0     0 0 0 0 0 0 0 0 0 0 0 0 1 0 0 -            L2   BD-28     00:50:56:a5:fc:cc -            Po3         FD-30     -

Joey-T*ternal Pl 192.168.21.1                    1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

Joey-T*ternal Pl 192.168.21.2                    800c  0     0 0 0 0 0 0 0 0 0 0 0 0 1 0 0 -            L2   BD-7      00:50:56:a5:0c:11 -            Po4         FD-8      -

Joey-T*ternal Pl 2001:0:0:100::1                 1     0     1 0 0 0 0 0 1 1 0 0 0 0 1 0 0 -            L3   -         00:00:00:00:00:00 -            -           -         0.0.0.0

硬體認為EP存在於通道2上。通道2的目的地是什麼？

module-1# show system internal eltmc info interface tunnel2

IfInfo:

interface:        Tunnel2   :::         ifindex:      402718722

iod:             66   :::           state:             up

Mod:              0   :::            Port:              0

Tunnel Index:              0   :::   Tunnel Dst ip:     0xc0a87843

Tunnel Encap:         ivxlan   ::: Tunnel VPC Peer:              0

Tunnel Dst ip str: 192.168.120.67   :::      Tunnel ept:            0x1

[SDK Info]:

tunnl_name:

vrf_id:              2   :::        if_index:     0x18010002

hwencapidx:              0   :::       encaptype:              1

mac_proxy:              0   :::        v4_proxy:              0

v6_proxy:              0   :::    ip_addr_type:              0

ipv4_address:     0xc0a87843

[SDB INFO]:

iod:             66

pc_if_index:              0

fab_if_index:              0

sv_if:              0

src_idx:              0

int_vlan:              0

encap_vlan:              0

mod_port_status:     0x41620003

v6_tbl_id:     0x80000002

v4_tbl_id:            0x2

router_mac:00.00.00.00.00.00

unnumbered:              0

trunk_id:              0

tunnel_mod:              0

tunnel_port:              0

tep_ip:     0xc0a87843

ip_if_mode:              0

sdk_vrf_id:              2

mtu:           9366   :::        ipmtu_id:              0

is_fex_fabric:              0

由於目標位於vPC之外，因此該目標IP應該是遠端枝葉的vPC虛擬IP。 讓我們檢查遠端枝葉並檢視：

leaf1# show system internal epm vpc

Local TEP IP                  : 192.168.160.95

Peer TEP IP                   : 192.168.160.93

vPC configured                : Yes

vPC VIP                       : 192.168.120.67

MCT link status               : Up

Local vPC version bitmap      : 0x7

Peer vPC version bitmap       : 0x7

Negotiated vPC version        : 3

Peer advertisement received   : Yes

Tunnel to vPC peer            : Up

非常好，因此它從遠端vPC對獲取了目標EP。 我們來看看ELAM看到什麼並驗證我們是否正確轉發資料包：

伊拉姆語

module-1# debug platform internal tah elam asic 0

module-1(DBG-TAH-elam)# trigger init in-select 6 out-select 0

module-1(DBG-TAH-elam-insel6)# set outer ipv4 src_ip 192.168.20.2 dst_ip 192.168.1.100

module-1(DBG-TAH-elam-insel6)# start

module-1(DBG-TAH-elam-insel6)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Triggered

現在，對於EX硬體上的遠端目標，有2個ELAM值在排除資料包流故障時非常重要。 與之前類似的ovector_idx和encap_idx:

module-1(DBG-TAH-elam-insel6)# report | grep ovec

sug_elam_out_sidebnd_no_spare_vec.ovector_idx: 0xB8

module-1(DBG-TAH-elam-insel6)# report | grep encap

sug_lurw_vec.encap_l2_idx: 0x0

sug_lurw_vec.encap_pcid: 0x0

sug_lurw_vec.encap_idx: 0x6

sug_lurw_vec.encap_vld: 0x1

在EX硬體上，我們確實能夠驅動應轉發資料包的目的埠。 以前，我們通常只檢查封裝idx並驗證目標idx是否是正確的隧道。 在此我們可以驗證哪些埠對映到8B:

module-1(DBG-TAH-elam-insel6)# show platform internal hal l2 port gpd

Legend:

-------

IfId:       Interface Id                                    IfName:      Interface Name

I P:        Is PC Mbr                                       IfId:           Interface Id

Uc PC Cfg:      UcPcCfg Idx                                 Uc PC MbrId:    Uc Pc Mbr Id

As:             Asic                                        AP:             Asic Port

Sl:             Slice                                       Sp:             Slice Port

Ss:             Slice SrcId                                 Ovec:           Ovector (slice | srcid)

L S:            Local Slot                                  Reprogram:

L3:             Is L3

P:    PifTable                                          Xla Idx:        Xlate Idx

RP:   Rw PifTable                                       Ovx Idx:        OXlate Idx

IP:   If Profile Table                                  N L3:           Num. of L3 Ifs

RS:   Rw SrcId Table                                    NI L3:          Num. of Infra L3 Ifs

DP:   DPort Table                                       Vif Tid:        Vif Tid

SP:   SrcPortState Table                                RwV Tid:        RwVif Tid

RSP:  RwSrcPortstate Table                              Ing Lbl:        Ingress Acl Label

UC:   UCPcCfg                                           Egr Lbl:        Egress Acl Label

UM:   UCPcMbr                                           Reprogram:

PROF ID:        Lport Profile Id

VS:   VifStateTable                                     HI:             LportProfile Hw Install

RV:   Rw VifTable

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Port Count: 8

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1a004000 Eth1/5      1 0    1d    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a005000 Eth1/6      1 0    b     0  e  0  d  1a 1a   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      800  0      0 1   0    0

1a006000 Eth1/7      0 26   5     0  f  0  e  1c 1c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-256  -      800  0      0 1   c    0

1a007000 Eth1/8      0 2f   7     0  10 0  f  1e 1e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-199  -      800  0      0 1   2e   0

1a01e000 Eth1/31     1 0    2d    0  37 1  e  1c 9c   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a01f000 Eth1/32     1 0    3d    0  38 1  f  1e 9e   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 1   0    0

1a030000 Eth1/49     0 2    1     0  49 1  20 38 b8   1   0 0 0 0 0 0  0  0 0 0   1 6   4   2  2  D-24d  -      400  0      0 0   1    0

1a031000 Eth1/50     0 3    3     0  29 1  0  0  80   1   0 0 0 0 0 0  0  0 0 0   1 5   3   2  2  D-350  -      400  0      0 0   1    0

Switch認為它應該將其轉發到介面Eth1/49上的主幹。但我們如何驗證封裝是否正確？

我們首先需要檢視有關隧道的硬體資訊。 可通過運行以下HAL命令執行此操作：

module-1(DBG-TAH-elam-insel6)# show platform internal hal tunnel rtep pi

Non-Sandbox Mode

LEGEND:

-------

Tun Ifid:  Tunnel Ifid                                             IfName:     Tunnel If Name

Lid:       Logical Id                                              ET:        Encap Type V: Vxlan I: IVxlan N: NVGRE

VrfId:     Vrf Id                                                  Vrf Name: Vrf Name

IP:        Tunnel's IP

Hw Enc:    Hw Encap Idx                                            IVP:        Is VPC Peer

IL:        Is Local                                                P4:         Proxy for v4

P6:        Proxy for V6                                            PM:         Proxy for Mac

II:        Is Ingress Only                                         IC:         Is Copy Service

C OBd:     Copy Service Outer Bd                                   U D:        Use DF

NBT:       Next Base Type E: ECMP N: Next-Hop                      NB Id:      Next Base Id

NH cnt:    Next Hop Count                                          VrfId:      Vrf Id

Vrf Name:  Vrf Name                                                IP:         IP Address

Mac:       Mac                                                     L3 IfId:    L3 IfId

L3IfName:  L3 If Name                                              L2 IfId:    L2 IfId

L2IfName:  L2 If Name

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Remote Tep Count: 15

================================================================================================================================================================================================

=======

I                   N N          |

E             Vrf                        Hw   V I P P P I I C   U B B      NH  |        Vrf                                          L3       L3           L2       L2

IfId     Ifname       T Lid  VrfId  Name         IP            Enc  P L 4 6 M I C OBd D T Id     Cnt | VrfId  Name         IP            Mac               IfId     IfName       IfId     IfName

================================================================================================================================================================================================

=======

18010002 Tunnel2      I 3005 2      overlay-1    192.168.120.670    0 0 0 0 0 0 0 1   0 E 2      2     2      overlay-1    0.0.0.0       0d:0d:0d:0d:0d:00 1a030001 Eth1/49.1    1a030000 Eth1/4

9

2      overlay-1    0.0.0.0       0d:0d:0d:0d:0d:00 1a031002 Eth1/50.2    1a031000 Eth1/5

0

此輸出提供我們關心的幾個值：

IfId — 分配給通道的介面ID

IP — 目的地的IP。 這應該與ELTMC相符。

L3 IfId — 交換器可用來轉送到適當目的地的第3層介面。

得知IfId後，我們可以驗證在群組中取得的封包是否與通道目的地相符：

module-1(DBG-TAH-elam-insel9)# show platform internal hal tunnel rtep apd

Non-Sandbox Mode

LEGEND:

-------

ifId:        Interface Id                                   IP:           IP address

HwVrfId:     Hardware Vrf Id                                SrcTepIdx:    Source Tep Index

BDXlate:     Egress BDXlate                                 DstInfoIdx:   Destination info index

RwEncapIdx:  Rw Encap Index                                 ECMPIdx:      ECMP Index

Num:         Number of hops                                 ECMPMbrIdx:   ECMP member Index

L2 Index:    L2 Index                                       RwDmacIdx:    Rw Dmax Index

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Remote Tep Count: 15

==============================================================================================================================

ifId     IP             HwVrfId BDXlate SrcTepIdx DstInfoIdx RwEncapIdx ECMPIdx  ECMPMbrIdx Num     L2Index  RwDmacIdx

==============================================================================================================================

18010002 192.168.120.67 2       1       3a9a      3005       6          0        0          2       1a030000 0         <---- RwEncapIdx is 6!  Same as the "encap_idx" in the ELAM Report.

1a031000 1

此隧道的RwEncapIdx（重寫封裝索引）為6，這是在elam中顯示的內容。

1 EP —> L3輸出 — 路由流

拓撲

在本示例中，我們將跟蹤資料包的流量，該資料包從EP1傳送ICMP到運行OSPF的N5K上的環回。N5K通過同一對EX交換機上的L3Out連線。

由於我們已經在本文檔開頭驗證了本地EP程式設計，因此假定在硬體中正確學習了EP，然後繼續路由驗證。

首先檢查OSPF狀態和路由表：

leaf6# show ip ospf neighbors vrf jr:sb

OSPF Process ID default VRF jr:sb

Total number of neighbors: 2

Neighbor ID     Pri State            Up Time  Address         Interface

27.27.27.1        1 FULL/BDR         00:22:39 10.10.27.1      Vlan28   <---- Leaf5

27.27.27.3        1 FULL/DROTHER     00:22:37 10.10.27.3      Vlan28   <----  N5K

leaf6# show ip route vrf jr:sb 100.100.100.100

IP Route Table for VRF "jr:sb"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

100.100.100.100/32, ubest/mbest: 1/0

*via 10.10.27.3, vlan28, [110/5], 00:16:58, ospf-default, intra

因此，我們知道路由表在10.10.27.3上將下一跳顯示為5K。這算是良好的開端，但我們如何驗證哪些硬體有呢？

首先檢查硬體中的鄰接表，確保ARP解析為10.10.27.3，並且已使用正確的介面進行程式設計：

leaf6# vsh_lc

module-1# show forwarding adjacency

IPv4 adjacency information, adjacency count 20

next-hop        rewrite info   interface       phy i/f

--------------  -------------- --------------- ---------------

10.10.27.1      0022.bdf8.19ff Vlan28          Tunnel3

10.10.27.3      8c60.4f02.88fc Vlan28          port-channel5

MAC地址與5K:

ACI-5548-B# show interface vlan 3117

Vlan3117 is up, line protocol is up

Hardware is EtherSVI, address is  8c60.4f02.88fc

Internet Address is 10.10.27.3/29

MTU 1500 bytes, BW 1000000 Kbit, DLY 10 usec

在EX平台上，有一個分配給VRF的「hw_vrf_idx」。在我們驗證硬體程式設計時，將引用此索引。 讓我們找到索引：

module-1# show system internal eltmc info vrf jr:sb

VRF-TABLE: jr:sb

vrf_type:         tenant   :::      context_id:              6

overlay_index:              0   :::            vnid:        2129921

scope:              5   :::          sclass:          16386

v4_table_id:            0x5   :::     v6_table_id:     0x80000005

intf_count:              5   :::   intrn_vlan_id:              0

VRF Intf:         Vlan11   ::: src_plcy_incomp:              0

vnid_hex:       0x208001   :::  ingress_policy:            0x1

vrf_intf_list: Vlan28,Vlan16,Vlan9,Vlan11,loopback2,

hw_vrf_idx:           4612   ::: nb_egr_outer_bd:              0

sb_egr_outer_bd:              0

vrf_bd_list: 28,16,11,9,

sb_egr_outer_bd:              0   :::      sdk_vrf_id:              5

[SDK Info]:

vrf_name:          jr:sb

vrf_id:              5   :::      hw_vrf_idx:           4612

vrf_vnid:        2129921   :::        is_infra:              0

tornbinfrahwbd:              0   :::  torsbinfrahwbd:              0

ingressBdAclLabel:              0   ::: ingBdAclLblMask:              0

egressBdAclLabel:              0   ::: egrBdAclLblMask:              0

sg_label:              5   :::          sclass:          16386

sp_incomplete:              1   :::      sclassprio:              3

[SDB INFO]:

v4 table

vrf type:              1

vrf id:              5

vnid:        2129921

internal infra vlan:              0

external router mac:00:22:bd:f8:19:ff

v6 table

vrf type:              1

vrf id:              5

vnid:        2129921

internal infra vlan:              0

external router mac:00:22:bd:f8:19:ff

::::

在檢測到鄰接關係後，HAL應該對路由進行程式設計。 我們可以使用以下命令檢查這一點：

module-1# show platform internal hal l3 routes | head

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

LEGEND:                                                                                                                                                                                        |

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

LID: Logical ID           RID: Route ID               PID: Physical ID       NB-ID:Next-Base ID       HIT IDX: Next-Hop HitIndex   CLP : Class Priority       TBI: Trie Base Index             |

SC : Sup-Copy             SSR: Src Sup-Redirect       DSR: Dst Sup-Redirect  TDD  :TTL Disable        NB: NextBaseType             SDC : Src Direct Connect   TRO: Trie Offset                 |

SPI: Src Policy Inc       DPI: Dst Policy Inc         DR : Default Route     LE   :Learn Enable        [E:Ecmp/A:Adj]              ILL : Is Link Local        ISS: Is Shared Services          |

RT : Route Type           FWD: Forwarding             HR : Host Routes       EP   :Ext Prefixes       DLR: Default Lpm Route       CLSS: Class Id             RDEL: Route in Deletion          |

BNE: Bind Notify Enable   SNE: Sclass Notify Enable   BE : Bounce Enable     IDL  :Ivxlan DoNotLearn  DL : Dest Local              SA  : Src Only             AI : Age Interval                |

SF : Static Flag          SH : Src Hit                DH: Dest Hit                                                                                                                             |

module-1# show platform internal hal l3 routes

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

LEGEND:                                                                                                                                                                                        |

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

LID: Logical ID           RID: Route ID               PID: Physical ID       NB-ID:Next-Base ID       HIT IDX: Next-Hop HitIndex   CLP : Class Priority       TBI: Trie Base Index             |

SC : Sup-Copy             SSR: Src Sup-Redirect       DSR: Dst Sup-Redirect  TDD  :TTL Disable        NB: NextBaseType             SDC : Src Direct Connect   TRO: Trie Offset                 |

SPI: Src Policy Inc       DPI: Dst Policy Inc         DR : Default Route     LE   :Learn Enable        [E:Ecmp/A:Adj]              ILL : Is Link Local        ISS: Is Shared Services          |

RT : Route Type           FWD: Forwarding             HR : Host Routes       EP   :Ext Prefixes       DLR: Default Lpm Route       CLSS: Class Id             RDEL: Route in Deletion          |

BNE: Bind Notify Enable   SNE: Sclass Notify Enable   BE : Bounce Enable     IDL  :Ivxlan DoNotLearn  DL : Dest Local              SA  : Src Only             AI : Age Interval                |

SF : Static Flag          SH : Src Hit                DH: Dest Hit                                                                                                                             |

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

|     |                                           |   |     |          | LID |<------------------ Trie ------------->|<Dleft Trie>|                                                            |

| VRF |                 Prefix/Len                | RT| RID |    LID   | Type| PID | FPID/| HIT |N|  NB-ID  |  NB Hw | PID | FPID/|   TBI   |TRO|Ifindex|CLSS|CLP| AI |SH|DH| Flags            |

|-----|-------------------------------------------|---|-----|----------|-----|     | TID  | IDX |B|         |  Idx   |     |  TID |---------|---|-------|----|---|----|--|--|------------------|

|-----|-------------------------------------------|---|-----|----------|-----|<------------------ DLEFT ------------>|-----|------|---------|---|-------|----|---|----|--|--|------------------|

|     |                                           |   |     |          |     | PID | FPID/| HIT |N|  NB-ID  |  NB Hw |     |      |         |   |       |    |   |    |  |  |                  |

|     |                                           |   |     |          |     |     |  TID | IDX |B|         |  Idx   |     |      |         |   |       |    |   |    |  |  |                  |

|     |                                           |   |     |          |     |<------------------ TCAM ------------->|     |      |         |   |       |    |   |    |  |  |                  |

|     |                                           |   |     |          |     | PID | TCAM | HIT |N|  NB-ID  |  NB Hw |     |      |         |   |       |    |   |    |  |  |                  |

|     |                                           |   |     |          |     |     |  ID  | IDX |B|         |  Idx   |     |      |         |   |       |    |   |    |  |  |                  |

------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

|Sandbox_ID: 0  Asic Bitmap: 0x0

--------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

module-1# show platform internal hal l3 routes | egrep 100.100.100.100

| 4612|                        100.100.100.100/ 32| UC|   e4|      4a04| TRIE|   10| 5/  0| 6010|A|     7567|    802e| 186a| 1/  2|       10|  0|      0|   f|  3|   0| 0| 0|spi,dpi

此輸出提供下一跳路由的相關資訊。 4612是jr:sb VRF的hw_vrf_idx。為了驗證下一跳，我們將使用TCAM中的「NB硬體Idx」來驗證下一表：

module-1# show platform internal hal l3 nexthops

Non-Sandbox Mode

LEGEND:

-------

NHOP ID       : Nhop Identifier (Hex)             CONS          : H/W S/W info Consistency

TYPE          : Nexthop Type                      ACTN          : Nexthop Action

Vrf           : L3 Vrf of the Nhop                L3 INTF       : L3 interface index (Hex)

L2 INTF       : L2 interface index (Hex)          BDID Or RwVRF : Bridge Domain Id Or Rewrite Vrfid (Hex)

INFR          : ACI Infra valid                   PVRF          : Preserve VRF

LRN           : Learn Enabled                     VRFR          : VRF Rewrite

PID           : Physical ID                       FPID          : FP of this nexthop

TLID          : Tile Id within FP                 HIT IDX       : Location of this Nhop (Hex)

Mac Entry:

TYP         : Type                      INTF        : Interface related Info (Hex)

LRN         : Learn Info                DL          : Destination Local

MLD         : Unused                    VNB         : Vnid use BD

DFL         : Default Entry             VLD         : MacKey Valid

FT          : FID Type                  FV          : FID Valid

FID         : FID value (Hex)           Mac         : L2 MAC Address

L2 Ifabric Info:

CLSS        : Source Class                        CLP         : Source Class Priority

EPG         : EndPoint Group                      BNE         : Bind Notification Enabled

SNE         : Source Address Notification Enabled CNE         : Source class Notification Enabled

DL          : iVxlan DL                           SPI         : Source Policy Incomplete

DPI         : Dest Policy Incomplete

IP Address  : IP address

Sandbox_ID: 0  Asic Bitmap: 0x0

Summary info for 31 L3 Nexthop objects

C T A                       BDID  I P   V         T    |---------------------Mac Entry-------------------|----L2 Ifabric Info----|

NHOP    O Y C         L3       L2    Or   N V L R         L HIT|T        L   M V D V|--------------Mac Key-------|     C      B S C   S D|

ID     N P T        INTF     INTF  RwVRF F R R F      FP I IDX|Y  INTF  R D L N F L|F F  FID                    |     L      N N N D P P|

(Hex)   S E N Vrf    (H)       (H)   (H)  R F N R PID  ID D (H)|P  (H)   N L D B L D|T V  (H)       Mac          |CLSS P EPG  E E E L I I| IP Address

--------+-+-+-+----+--------+--------+----+-+-+-+-+----+--+-+----+-+------+-+-+-+-+-+-+-+-+------+-----------------+----+-+----+-+-+-+-+-+-+-----------------------------

module-1# show platform internal hal l3 nexthops | grep 802e

7567 N I F    5  901001c 16000004   1c 0 0 0 0   2e  9 0 802e 0     22 0 0 0 0 0 1 1 1   1214 8c:60:4f:02:88:fc    0 0 2c0d 0 0 0 0 0 0 10.10.27.3

這裡，我們選擇「NB硬體IDX」並將其對映到「HIT IDX」。這將向我們顯示與下一跳MAC/IP對應的條目。這相當於檢視第1代ACI枝葉交換機上Broadcom中的「l3 defip show」和「l3 egress show」。

我們可以看到，該表包含正確的資訊：

L2 INTF:0x16000004 —> Port-channel 5的ifIndex

命中IDX: Hal l3路由中Nb硬體IDX驅動的索引

MAC:8c:60:4f:02:88:fc —> 5K上下一跳SVI的MAC

EPG: L3 EPG的SCLASS

IP 位址:10.10.27.3 —> 5K上SVI的下一跳IP

伊拉姆語

leaf6# pwd

/var/sysmgr/tmp_logs

leaf6# cat elam_report.txt | grep ip.da

sug_pr_lu_vec_l3v.ip.da: 0x0000000000000000064646464

leaf6# cat elam_report.txt | grep ip.sa

sug_pr_lu_vec_l3v.ip.sa: 0x00000000000000000C0A8140A

leaf6# cat elam_report.txt | grep adj

sug_lurw_vec.dst_addr.adj: 0x8C604F0288FC

sug_lurw_vec.dst_addr.adj.padfield: 0x04F0288FC

sug_lurw_vec.dst_addr.adj.idx: 0x2318

sug_lurw_vec.adj_vld: 0x0

leaf6# cat elam_report.txt | grep macdarslt.hit_idx

sug_fpc_lookup_vec.fplu_vec.rslt.macdarslt.hit_idx: 0x802E

1 EP —>遠端EP或SVI — 主幹驗證

拓撲

邏輯

在本示例中，我們將跟蹤從EP1發往遠端BD交換虛擬介面(SVI)的資料包流。本示例的目的是驗證主幹轉發，以確保將該資料包傳送到正確的枝葉。 讓我們假設封包已傳送到輸入枝葉上的主幹代理。

在骨幹上，我們首先驗證目的地IP的Council of Oracles Protocol(COOP)，因為封包已傳送到骨幹代理進行查詢：

calo1-spine1# show coop internal info ip-db | grep -A 10 192.168.20.1

IP address : 192.168.20.1

Vrf : 2129921

Flags : 0

EP vrf vnid : 2129921

EP IP :  192.168.20.1

Publisher Id : 10.0.224.88

Record timestamp : 11 04 2016 16:41:16 422062712

Publish timestamp : 11 04 2016 16:41:16 424633605

Seq No: 0

Remote publish timestamp: 01 01 1970 00:00:00 0

URIB Tunnel Info

Num tunnels : 1

Tunnel address : 10.0.224.88    <---- REMOTE LEAF

Tunnel ref count : 1

讓我們驗證哪個枝葉具有該TEP地址：

spine1# acidiag fnvread | grep 10.0.224.88

105        1          calo1-leaf5      FDO20160TPS     10.0.224.88/32    leaf         active   0

由於我們知道資料包進入模組2上的骨幹（埠6），因此我們可以連線到模組2並檢視埠佈局。

spine1# vsh

Cisco iNX-OS Debug Shell

This shell should only be used for internal commands and exists

for legacy reasons. User should use ibash infrastructure as this

will be deprecated.

calo1-spine1# attach module 2

Attaching to module 2 ...

To exit type 'exit', to abort type '$.'

No directory, logging in with HOME=/

Bad terminal type: "xterm-256color". Will assume vt100.

Cisco iNX-OS Debug Shell

This shell should only be used for internal commands and exists

for legacy reasons. User should use ibash infrastructure as this

will be deprecated.

Loading parse tree (LC). Please be patient...

module-2#

module-2# show platform internal hal l2 port gpd

Legend:

-------

IfId:       Interface Id                                    IfName:      Interface Name

I P:        Is PC Mbr                                       IfId:           Interface Id

Uc PC Cfg:      UcPcCfg Idx                                 Uc PC MbrId:    Uc Pc Mbr Id

As:             Asic                                        AP:             Asic Port

Sl:             Slice                                       Sp:             Slice Port

Ss:             Slice SrcId                                 Ovec:           Ovector (slice | srcid)

L S:            Local Slot                                  Reprogram:

L3:             Is L3

P:    PifTable                                          Xla Idx:        Xlate Idx

RP:   Rw PifTable                                       Ovx Idx:        OXlate Idx

IP:   If Profile Table                                  N L3:           Num. of L3 Ifs

RS:   Rw SrcId Table                                    NI L3:          Num. of Infra L3 Ifs

DP:   DPort Table                                       Vif Tid:        Vif Tid

SP:   SrcPortState Table                                RwV Tid:        RwVif Tid

RSP:  RwSrcPortstate Table                              Ing Lbl:        Ingress Acl Label

UC:   UCPcCfg                                           Egr Lbl:        Egress Acl Label

UM:   UCPcMbr                                           Reprogram:

PROF ID:        Lport Profile Id

VS:   VifStateTable                                     HI:             LportProfile Hw Install

RV:   Rw VifTable

Num. of Sandboxes: 1

Sandbox_ID: 0, BMP: 0x0

Port Count: 7

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1f5      SpInBndMgmt 0 9de  1a    0  0  0  0  0  0    0   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-2d4  D-3e1  0    0      0 0   1    0

1a080000 Eth2/1      0 9a   1c    0  11 0  10 20 20   1   0 0 0 0 0 0  0  0 0 0   1 b   b   1  1  D-f3   D-61   100  0      0 0   1    0

1a081000 Eth2/2      0 9b   22    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   1 c   c   1  1  D-1ee  D-30b  100  0      0 0   1    0

1a084000 Eth2/5      0 9e   1e    0  3d 1  14 28 a8   1   0 0 0 0 0 0  0  0 0 0   1 1   1   1  1  D-19a  D-2ee  100  0      0 0   1    0

1a085000 Eth2/6      0 9f   24    0  39 1  10 20 a0   1   0 0 0 0 0 0  0  0 0 0   1 e   e   1  1  D-87   D-184  100  0      0 0   1    0

1a086000 Eth2/7      0 a0   26    0  35 1  c  18 98   1   0 0 0 0 0 0  0  0 0 0   1 d   d   1  1  D-1d0  D-357  100  0      0 0   1    0

1a088000 Eth2/9      0 a2   20    1  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-3ea  D-1a9  100  0      0 0   1    0

Ethernet 2/6是連線到枝葉6的介面位於ASIC 0 SLICE 1上

現在我們知道哪個ASIC運行我們的ELAM。 ASIC 0.

module-2# debug platform internal tah elam asic 0

module-2(DBG-TAH-elam)# trigger reset

module-2(DBG-TAH-elam)# trigger init in-select 13 out-select 0

module-2(DBG-TAH-elam-insel13)# set inner ipv4 src_ip 10.100.17.11 dst_ip 192.168.20.1

module-2(DBG-TAH-elam-insel13)# start

stat

module-2(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Armed

module-2(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Triggered   <---- Packet triggered from FM

Asic 0 Slice 1 Status Triggered   <---- Packet triggered from Front Panel

通過ELAM可以找到向量索引：

Front Panel ELAM drove sug_elam_out_sidebnd_no_spare_vec.ovector_idx: 0xB8

現在，如何將0xb8對映到埠？ 由於我們知道資料包應該傳送到交換矩陣模組(FM)進行查詢，因此我們可以檢視內部埠對映以查詢目的FM:

module-2# show platform internal hal l2 internal-port pi

Num. of Sandboxes: 1

Legend:

-------

IfId:      Interface Id                IfName:     Interface Name

As:        Asic                        AP:         Asic Port

Sl:        Slice                       SP:         Slice Port

Ss:        Slice SrcId                 Ovec:       Ovector

UcPcCfgId: Uc Pc CfgId                 Lb Mbrid:   LB MbrId

Sandbox_ID: 0, BMP: 0x0

Internal Port Count: 32

======================================================================

UcPc  Lb

IfId     IfName                      As AP Sl SP Ss Ovec CfgId MbrId

======================================================================

7d       -                           0  21 0  20 38 38   0     4

7e       -                           0  29 1  0  0  80   0     8

7f       -                           1  21 0  20 38 38   0     c

80       -                           1  29 1  0  0  80   0     10

81       -                           2  21 0  20 38 38   0     14

82       -                           2  29 1  0  0  80   0     18

83       -                           3  21 0  20 38 38   0     1c

84       -                           3  29 1  0  0  80   0     20

95       -                           0  19 0  18 30 30   0     3

96       -                           0  49 1  20 38 b8   0     7

97       -                           1  19 0  18 30 30   0     b

98       -                           1  49 1  20 38 b8   0     f

99       -                           2  19 0  18 30 30   0     13

9a       -                           2  49 1  20 38 b8   0     17

9b       -                           3  19 0  18 30 30   0     1b

9c       -                           3  49 1  20 38 b8   0     1f

ad       -                           0  25 0  24 40 40   0     1

ae       -                           0  41 1  18 30 b0   0     6

af       -                           1  25 0  24 40 40   0     9

b0       -                           1  41 1  18 30 b0   0     e

b1       -                           2  25 0  24 40 40   0     11

b2       -                           2  41 1  18 30 b0   0     16

b3       -                           3  25 0  24 40 40   0     19

b4       -                           3  41 1  18 30 b0   0     1e

dd       -                           0  15 0  14 28 28   0     2

de       -                           0  4d 1  24 40 c0   0     5

df       -                           1  15 0  14 28 28   0     a

e0       -                           1  4d 1  24 40 c0   0     d

e1       -                           2  15 0  14 28 28   0     12

e2       -                           2  4d 1  24 40 c0   0     15

e3       -                           3  15 0  14 28 28   0     1a

e4       -                           3  4d 1  24 40 c0   0     1d

使用ASIC0/Ovc B8時，我們得到MbrId 0x7,Slice並不重要。

此MbrId是USD上對映到FM上的介面的介面。  請記住，此MbrId以十六進位制表示，必須轉換為十進位制。

通過檢視USD介面並檢查埠7，我們可以找到哪個FM:

module-2# show platform internal usd port info | grep -A 3 "Int 7"(if the interface has multiple digits, will be "Int##" with no space)

Port  73.0 (Int 7)    : Admin UP   Link UP   Remote slot22.asic0

slice:1 slice port:32 lcl srcid:56 gbl srcid:184

asic mrl:0xd07c010, mac mrl:0x12c84010, mac:16, chan:0

speed 106G serdes: 0x328 0x329 0x32a 0x32b

「slot」以0為基礎，而FM編號以1為基礎，因此我們需要將1新增到此處列出的數字中。 這意味著資料包應傳送到FM 23。

合成IP

與Alpine一樣，有一個合成IP用作外部IP地址，用於確定COOP查詢的雜湊。 若要尋找此內容，您需要對內部DST IP運行此命令和grep:

module-2(DBG-TAH-elam-insel7)# show forwarding route synthetic vrf all | grep 192.168.20.1

SYNTH-88        1.203.211.185/32    0x208001          192.168.20.1

這表明1.203.211.185是我們的合成IP。基於此，我們還可以將FM鏈路上的「外部DST IP」設定為此。 我們應該在FM上觸發：

光纖模組ELAM

module-23(DBG-TAH-elam-insel7)# trigger reset

module-23(DBG-TAH-elam)# trigger init in-select 13 out-select 0

module-23(DBG-TAH-elam-insel13)# set outer ipv4 dst_ip 1.203.211.185   <----- DST IP IS THE SYNTHETIC IP

module-23(DBG-TAH-elam-insel13)# set inner ipv4 src_ip 10.100.17.11 dst_ip 192.168.20.1

module-23(DBG-TAH-elam-insel13)# start

stat

module-23(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Armed

Asic 0 Slice 2 Status Armed

Asic 0 Slice 3 Status Armed

Asic 0 Slice 4 Status Armed

Asic 0 Slice 5 Status Armed

module-23(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Armed

Asic 0 Slice 2 Status Triggered    <---- Triggered on SLICE 2

Asic 0 Slice 3 Status Armed

Asic 0 Slice 4 Status Armed

Asic 0 Slice 5 Status Armed

顯然，請轉儲完整的報告，但讓我們看一下我們觸發的此資料包的ovector_idx:

lac_elam_out_sidebnd_no_spare_vec.ovector_idx:0x20 <以下-----令中使用的向量索引

我們如何確定哪個介面具有此向量？ 在FM上運行以下命令：

**錯誤CSCvf42796 ，附加所有FM命令，並加上「|不更多」。 否則，某些表條目可能不會顯示在最終輸出中。

module-23(DBG-TAH-elam-insel13)# show platform internal hal l2 port gpd | no-more

Legend:

-------

IfId:       Interface Id                                    IfName:      Interface Name

I P:        Is PC Mbr                                       IfId:           Interface Id

Uc PC Cfg:      UcPcCfg Idx                                 Uc PC MbrId:    Uc Pc Mbr Id

As:             Asic                                        AP:             Asic Port

Sl:             Slice                                       Sp:             Slice Port

Ss:             Slice SrcId                                 Ovec:           Ovector (slice | srcid)

L S:            Local Slot                                  Reprogram:

L3:             Is L3

P:    PifTable                                          Xla Idx:        Xlate Idx

RP:   Rw PifTable                                       Ovx Idx:        OXlate Idx

IP:   If Profile Table                                  N L3:           Num. of L3 Ifs

RS:   Rw SrcId Table                                    NI L3:          Num. of Infra L3 Ifs

DP:   DPort Table                                       Vif Tid:        Vif Tid

SP:   SrcPortState Table                                RwV Tid:        RwVif Tid

RSP:  RwSrcPortstate Table                              Ing Lbl:        Ingress Acl Label

UC:   UCPcCfg                                           Egr Lbl:        Egress Acl Label

UM:   UCPcMbr                                           Reprogram:

PROF ID:        Lport Profile Id

VS:   VifStateTable                                     HI:             LportProfile Hw Install

RV:   Rw VifTable

Num. of Sandboxes: 1

Sandbox_ID: 1, BMP: 0x1

Port Count: 8

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

ae       fc0-lc1:0-0 1 0    3     0  11 0  10 20 20   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

af       fc0-lc1:0-1 1 0    4     0  3d 2  c  18 98   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

b0       fc0-lc1:1-0 1 0    13    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

b1       fc0-lc1:1-1 1 0    14    0  39 2  8  10 90   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

b2       fc0-lc1:2-0 1 0    23    0  5d 3  14 28 e8   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

b3       fc0-lc1:2-1 1 0    24    0  21 1  8  10 50   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

b4       fc0-lc1:3-0 1 0    33    0  51 3  8  10 d0   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  -      -      0    0      0 0   0    0

該向量對映到ASIC 0/SLICE 0上的LC1（插槽2中的線卡，因為它基於0）。我們從最初在LC上運行的ELAM中得知，我們在此片上觸發：

module-2# debug platform internal tah elam asic 0

module-2(DBG-TAH-elam)# trigger reset

module-2(DBG-TAH-elam)# trigger init in-select 13 out-select 0

module-2(DBG-TAH-elam-insel13)# set inner ipv4 src_ip 10.100.17.11 dst_ip 192.168.20.1

module-2(DBG-TAH-elam-insel13)# start

stat

module-2(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Armed

Asic 0 Slice 1 Status Armed

module-2(DBG-TAH-elam-insel13)# stat

ELAM STATUS

===========

Asic 0 Slice 0 Status Triggered   <---- Packet triggered from FM

Asic 0 Slice 1 Status Triggered   <---- Packet triggered from Front Panel

此ELAM上的向量是sug_elam_out_sidebnd_no_spare_vec.ovector_idx:0x98(我們通過「hal l2埠gpd」得知)對映到LC上的正確介面：

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1f5      SpInBndMgmt 0 9de  1a    0  0  0  0  0  0    0   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-2d4  D-3e1  0    0      0 0   1    0

1a080000 Eth2/1      0 9a   1c    0  11 0  10 20 20   1   0 0 0 0 0 0  0  0 0 0   1 b   b   1  1  D-f3   D-61   100  0      0 0   1    0

1a081000 Eth2/2      0 9b   22    0  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   1 c   c   1  1  D-1ee  D-30b  100  0      0 0   1    0

1a084000 Eth2/5      0 9e   1e    0  3d 1  14 28 a8   1   0 0 0 0 0 0  0  0 0 0   1 1   1   1  1  D-19a  D-2ee  100  0      0 0   1    0

1a085000 Eth2/6      0 9f   24    0  39 1  10 20 a0   1   0 0 0 0 0 0  0  0 0 0   1 e   e   1  1  D-87   D-184  100  0      0 0   1    0

1a086000 Eth2/7      0 a0   26    0  35 1  c  18 98   1   0 0 0 0 0 0  0  0 0 0   1 d   d   1  1  D-1d0  D-357  100  0      0 0   1    0

1a088000 Eth2/9      0 a2   20    1  d  0  c  18 18   1   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-3ea  D-1a9  100  0      0 0   1    0

Ethernet 2/7是連線到枝葉5的介面。

額外方案：獲取不在「hal internal-port pi」輸出中的Ovector

拓撲

邏輯

在某些情況下，我們會在「show platform internal hal2 internal-port pi」表中捕獲沒有Ovector的資料包。  在下面的場景中，我們實際上捕獲的是從FM傳回的資料包，因此我們需要檢視不同的表格，以檢視資料包選擇的前面板埠。

請注意，上面的拓撲是學習傳輸流量的完全不同的環境（無代理路由）。   模組是N9K-X9732C-EX。

@module-1# debug platform internal tah elam asic 3

@module-1(DBG-elam)# trigger reset

@module-1(DBG-elam)# trigg init in-select 13 out-select 0

@module-1(DBG-elam-insel13)# set inner ipv4 src_ip 192.85.1.2 dst_ip 192.85.2.67

@module-1(DBG-elam-insel13)# star

@module-1(DBG-elam-insel13)# stat

ELAM STATUS

===========

Asic 3 Slice 0 Status Armed

Asic 3 Slice 1 Status Triggered

@module-1(DBG-elam-insel13)# report | grep ovector

sug_elam_out_sidebnd_no_spare_vec.ovector_idx: 0xA0    <<<<<<<<<<<<<<<<<  now we look for this in the "hal internal-port pi" command

@module-1# show platform internal hal l2 internal-port pi

No sandboxes exist

Num. of Sandboxes: 1

Legend:

-------

IfId:      Interface Id                IfName:     Interface Name

As:        Asic                        AP:         Asic Port

Sl:        Slice                       SP:         Slice Port

Ss:        Slice SrcId                 Ovec:       Ovector

UcPcCfgId: Uc Pc CfgId                 Lb Mbrid:   LB MbrId

Sandbox_ID: 0, BMP: 0x0

Internal Port Count: 24

======================================================================

UcPc  Lb

IfId     IfName                      As AP Sl SP Ss Ovec CfgId MbrId

======================================================================

7d       -                           0  21 0  20 38 38   0     4

7e       -                           0  29 1  0  0  80   0     8

7f       -                           1  21 0  20 38 38   0     c

80       -                           1  29 1  0  0  80   0     10

81       -                           2  21 0  20 38 38   0     14

82       -                           2  29 1  0  0  80   0     18

83       -                           3  21 0  20 38 38   0     1c

84       -                           3  29 1  0  0  80   0     20

ad       -                           0  25 0  24 40 40   0     1

ae       -                           0  41 1  18 30 b0   0     6

af       -                           1  25 0  24 40 40   0     9

b0       -                           1  41 1  18 30 b0   0     e

b1       -                           2  25 0  24 40 40   0     11

b2       -                           2  41 1  18 30 b0   0     16

b3       -                           3  25 0  24 40 40   0     19

b4       -                           3  41 1  18 30 b0   0     1e

dd       -                           0  15 0  14 28 28   0     2

de       -                           0  4d 1  24 40 c0   0     5

df       -                           1  15 0  14 28 28   0     a

e0       -                           1  4d 1  24 40 c0   0     d

e1       -                           2  15 0  14 28 28   0     12

e2       -                           2  4d 1  24 40 c0   0     15

e3       -                           3  15 0  14 28 28   0     1a

e4       -                           3  4d 1  24 40 c0   0     1d  <<<<<<<  we cant find an entry that matches 0xA0

@module-1# show platform internal hal l2 port gpd

Legend:

-------

<snip>

Sandbox_ID: 0, BMP: 0x0

Port Count: 6

============================================================================================================================================

Uc   Uc                          |       Reprogram       |                                         | Rep |

I PC   Pc                        L |   R I R D    R  U U X | L Xla Ovx N  NI Vif    RwV    Ing  Egr  | V R | PROF H

IfId     Ifname      P Cfg  MbrID As AP Sl Sp Ss Ovec S | P P P S P Sp Sp C M L | 3 Idx Idx L3 L3 Tid    Tid    Lbl  Lbl  | S V | ID   I

=============================================================================================================================================

1f5      SpInBndMgmt 0 9de  1a    0  0  0  0  0  0    0   0 0 0 0 0 0  0  0 0 0   0 0   0   0  0  D-2d4  D-3e1  0    0      0 0   1    0

1a000000 Eth1/1      0 1b   1c    0  11 0  10 20 20   1   0 0 0 0 0 0  0  0 0 0   1 1   1   1  1  D-13b  D-33b  500  0      1 0   3    0

1a01c000 Eth1/29     0 37   1e    3  3d 1  14 28 a8   1   0 0 0 0 0 0  0  0 0 0   1 8   8   1  1  D-3f2  D-7a   100  0      0 0   2    0

1a01d000 Eth1/30     0 38   20    3  39 1  10 20 a0   1   0 0 0 0 0 0  0  0 0 0   1 5   5   1  1  D-36e  D-362  100  0      0 0   2    0

1a01e000 Eth1/31     0 39   22    3  35 1  c  18 98   1   0 0 0 0 0 0  0  0 0 0   1 9   9   1  1  D-273  D-8    100  0      0 0   2    0

1a01f000 Eth1/32     0 3a   24    3  31 1  8  10 90   1   0 0 0 0 0 0  0  0 0 0   1 a   a   1  1  D-154  D-5d   100  0      0 0   2    0

1/30是連線到枝葉102的phy介面，由拓撲、ASIC 3、片1驗證