目錄

簡介

拓撲

必要條件

需求

採用元件

設定

在2台枝葉交換機之間設定vPC

讓FEX聯機

在FEX上配置主機介面

選項1:將介面新增到每個FEX配置檔案，並將它們對映到同一個vPC策略組。

選項2：分配兩個FEX的相同FEX配置檔案並新增接入埠選擇器。

簡介

本文檔介紹在以應用為中心的基礎設施(ACI)環境中配置從主機到這些FEX的交換矩陣外部器(FEX)和虛擬埠通道(vPC)所使用的配置步驟。

拓撲

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據以下硬體和軟體版本：

- ACI交換矩陣，由兩個主幹交換機和兩個枝葉交換機組成

- 2個受支援的Cisco FEX，每個插入自己的枝葉

- 應用程式原則基礎架構控制器(APIC)

- 連線到每個FEX的主機

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

在2台枝葉交換機之間設定vPC

此配置將引導您在ACI中的2台枝葉交換機之間設定vPC域。本節中使用的枝葉交換機標籤為「101」和「102」

導航到Fabric > Access Policies > Switch Policies > Policies > Virtual Port-Channel default，然後點選「Explicit VPC Protection Groups」旁邊的「+」。 輸入名稱、要在其間使用vPC的2台枝葉交換機以及「邏輯對ID」（傳統Nexus作業系統中的「域ID」）。

我們現在可在CLI上驗證是否已配置vPC域。 SSH（安全殼層）連線到其中一個交換機並運行「show vpc brief」

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 10

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 4

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

在ACI中，keepalive狀態是禁用的，因為我們在內部使用主幹 — 枝葉連線作為「對等鏈路」。

讓FEX聯機

現在，我們可以在每台枝葉交換機上註冊FEX。 我們不支援FEX和2台枝葉交換機之間的vPC連線，因此每個FEX只能連線到1台枝葉交換機。

導航到Fabric > Access Policies > Quick Start，然後按一下「Configure an interface， PC， and VPC」。按一下綠色的「+」新增交換機。 選擇「高級」單選按鈕。 輸入連線到第一個FEX的枝葉的交換機ID。輸入交換機配置檔案的名稱並新增FEX型別和編號。 最後，輸入FEX連線到的枝葉上的埠。

更新，所有欄位，儲存一次並提交。 此時，您應該從交換機CLI看到FEX聯機。如果映像不同，它將從枝葉下載正確的映像。

fab1-leaf1# show fex detail

FEX: 101  Description: FEX0101   state: Online

FEX version: 11.1(1o) [Switch version: 11.1(1o)]

FEX Interim version: 11.1(1o)

Switch Interim version: 11.1(1o)

Extender Model: N2K-C2232PP-10GE,  Extender Serial: SSI1350063T

Part No: 68-3547-03

Card Id: 82, Mac Addr: 00:0d:ec:fa:4b, Num Macs: 75

Module Sw Gen: 22  [Switch Sw Gen: 21]

pinning-mode: static    Max-links: 1

Fabric port for control traffic: Eth1/36

Fabric interface state:

Eth1/36 - Interface Up. State: Active

Po5 - Interface Up. State: Active

對第二台FEX和枝葉交換機重複相同的過程。

附註： 檢視枝葉上的埠通道或物理介面（連線到FEX）時，您會看到「輸入丟棄數」遞增。 這是正常的，應該忽略。 由於具有鏈路層控制資料包的Broadcom ASIC（第1代Nexus 9000交換機）存在限制，因此會引發輸入丟棄。 在正常操作下，您將看到輸入丟棄消息，因此可能需要禁用這些介面的監控。

在FEX上配置主機介面

有兩種方法可以將每個FEX上的主機介面配置到vPC中。

1)將介面新增到每個FEX配置檔案，並將它們對映到同一個vPC策略組。

2)為兩個FEX分配相同的FEX配置檔案並新增接入埠選擇器。

完成嚮導後，您將看到每個FEX的「FEX」配置檔案和「介面選擇器」。

「FEX配置檔案」是FEX也將關聯的配置檔案。 FEX配置檔案類似於「交換機配置檔案」，它將介面連結到FEX。

Interface Selector是為連線到FEX的枝葉介面建立的策略。

選項1:將介面新增到每個FEX配置檔案，並將它們對映到同一個vPC策略組。

導航到Fabric > Access Policies > Interface Policies > Profiles，然後點選FEX 101的FEX配置檔案。按一下右鍵並選擇「Create Access Port Selector」。 在本例中，主機插入兩個FEX的埠10。

為選擇器命名，輸入介面ID以及要將介面對映到的vPC策略組：

對枝葉102介面選擇器完成相同操作，並確保使用介面策略組，以便兩者都捆綁到vPC中。

然後，您可以通過從枝葉CLI運行命令「show port-channel summary」和「show vpc brief」來驗證介面是否捆綁在兩台交換機上。每台交換機可能有自己的PC編號，但是它們應對映到相同的vPC ID:

fab1-leaf1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/16(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SD)     Eth      NONE      Eth1/48(D)

5     Po5(SU)     Eth      LACP      Eth1/4(P)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth101/1/10(P)

fab1-leaf3# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/4(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SU)     Eth      LACP      Eth1/16(P)

4     Po4(SD)     Eth      NONE      Eth1/48(D)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth102/1/10(P)

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

fab1-leaf3# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

選項2:分配兩個FEX的相同FEX配置檔案並新增接入埠選擇器。

如果要配置多台vPC，配置可能會變得繁瑣，需要進入每個單獨的FEX配置檔案並新增介面。 為了簡化配置，您可以分配多個FEX的相同FEX配置檔案，然後使用該配置檔案在每個FEX上部署接入埠。

為此，請導航到Fabric > Access Policies > Interface Policies > Profiles，按一下右鍵並選擇「Create FEX Profile」。 將其命名並點選提交：

現在我們已經定義了FEX配置檔案，我們需要將FEX 101和102對映到此唯一配置檔案。 如果展開FEX介面選擇器，您將看到可以從下拉選單中選擇FEX配置檔案的位置，請確保選擇建立的配置檔案（本示例中為101-102）：

對FEX 102介面選擇器重複相同操作。

然後，我們可以將接入埠塊新增到「101-102」FEX配置檔案中，以便在兩個FEX上同時部署這些介面。

按一下右鍵"101-102" FEX配置檔案，然後選擇「建立接入埠選擇器」。 命名它，並選擇介面和策略組，如上節所示：

然後，您可以通過從枝葉CLI運行命令「show port-channel summary」和「show vpc brief」來驗證介面是否捆綁在兩台交換機上。每台交換機可能有自己的PC編號，但是它們應對映到相同的vPC ID:

fab1-leaf1# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/16(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SD)     Eth      NONE      Eth1/48(D)

5     Po5(SU)     Eth      LACP      Eth1/4(P)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth101/1/10(P)

fab1-leaf3# show port-channel summary

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

F - Configuration failed

-------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

-------------------------------------------------------------------------------

1     Po1(SU)     Eth      LACP      Eth1/4(P)

2     Po2(SU)     Eth      LACP      Eth1/17(P)

3     Po3(SU)     Eth      LACP      Eth1/16(P)

4     Po4(SD)     Eth      NONE      Eth1/48(D)

6     Po6(SU)     Eth      NONE      Eth1/36(P)

7     Po7(SU)     Eth      NONE      Eth102/1/10(P)

fab1-leaf1# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -

fab1-leaf3# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 13

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : Disabled

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 5

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

Operational Layer3 Peer           : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1           up     -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

2    Po7    up     success     success                    -