目錄

簡介

什麼是Cisco uBR7200系列電纜介面的基本示例配置？

Cisco uBR7100系列電纜介面的基本示例配置是什麼？

如何將CMTS配置為同時運行每日時間(ToD)、簡單檔案傳輸協定(TFTP)和動態主機配置協定(DHCP)?

能否將Cisco CMTS配置為網橋？

Cisco CMTS是否支援PPPoE?

如何在DOCSIS 1.0中配置基線隱私？

如何在Cisco CMTS上配置捆綁？

相關資訊

簡介

本文回答有關纜線資料機終端系統(CMTS)的一些常見問題。

問：Cisco uBR7200系列上電纜介面的基本示例配置是什麼？

A.以下是組態範例：

interface Cable4/0

ip address 10.1.1.1 255.255.0.0

!--- For the cm to talk to the CMTS. Usually this address is private.

!

ip address 200.1.1.1 255.255.0.0 secondary

!--- For the PCs to talk to the CMTS. Usually this address is public so !--- that the PCs can go to the Internet.

!

load-interval 30

no ip directed-broadcast

cable helper-address 200.1.162.170

!--- Specify the IP address of the DHCP server.

no keepalive

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- This is cosmetic on uBR7200 but must match the upconverter for the !--- uBR7200 platforms so that you know the exact value on the upconverter.

Cable upstream 0 power-level 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port Upstream 0. Enter this command to turn the port on.

Cable upstream 0 frequency 37008000

!--- Upstream frequency. Make sure that this frequency is set to a clean !--- part of the spectrum and is set after careful analysis of your cable !--- plant.

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

問：Cisco uBR7100系列上電纜介面的基本示例配置是什麼？

A.以下是組態範例：

interface Cable1/0

ip address 111.111.111.111 255.255.255.0 secondary

!--- For the PCs to communicate with the CMTS. Usually this address !--- is public so that the PCs can go to the Internet.

ip address 10.4.1.1 255.255.255.0

!--- For the cm to talk to the CMTS. Usually this address is private.

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- Needs to be set to the center frequency of the downstream channel.

no cable downstream rf-shutdown

!--- Enables the integrated upconverter.

cable downstream rf-power 51

!--- Sets the RF power output level on the integrated upconverter !--- (default=50dBmV).

cable upstream 0 frequency 32000000

!--- Upstream frequency, you need to make sure that this frequency is set !--- to a clean part of the spectrum and is set after careful analysis !--- of your cable plant.

cable upstream 0 power-level 0

!--- Default.

cable upstream 0 timing-adjust threshold 0

!--- Default.

cable upstream 0 timing-adjust continue 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port upstream 0. Must enter this command to turn the port on.

Cable upstream 1 timing-adjust threshold 0

cable upstream 1 timing-adjust continue 0

cable upstream 1 shutdown

cable upstream 2 timing-adjust threshold 0

cable upstream 2 timing-adjust continue 0

cable upstream 2 shutdown

cable upstream 3 timing-adjust threshold 0

cable upstream 3 timing-adjust continue 0

cable upstream 3 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

!

問：如何將CMTS配置為同時運行每日時間(ToD)、簡單檔案傳輸協定(TFTP)和動態主機配置協定(DHCP)?

A.首先，使用本節中的配置時，請確保您具有最新的12.x EC版本。

您的配置中不需要使用cable helper address語句，因為不需要將DISCOVER資料包「幫助」到另一台電腦。DISCOVER資料包駐留在CMTS上。

以下是在uBR7200的配置內建立的兩個配置檔案。一個配置檔案稱為platinum.cm，另一個檔案稱為disable.cm。如果您在CMTS中建立DOCSIS配置檔案，則無需將檔案複製到快閃記憶體或使用TFTP。使用此配置，您不需要外部docsis配置檔案。

cable config-file disable.cm

access-denied

service-class 1 max-upstream 1

service-class 1 max-downstream 1600

cpe max 1

timestamp

!

cable config-file platinum.cm

service-class 1 max-upstream 128

service-class 1 guaranteed-upstream 10

service-class 1 max-downstream 10000

service-class 1 max-burst 1600

cpe max 10

timestamp

注意：如果介面下面的IP helper address命令指向已配置的外部DHCP伺服器，則纜線數據機將從外部DHCP伺服器獲取配置。

以下是用於動態拉動platinum.cm組態檔的電纜資料機的原則：

ip dhcp pool cm-platinum

network 10.1.4.0 255.255.255.0

bootfile platinum.cm

next-server 10.1.4.1

default-router 10.1.4.1

option 7 ip 10.1.4.1

option 4 ip 10.1.4.1

option 2 hex ffff.8f80

lease 7 0 10

以下是PC獲取地址的策略：

ip dhcp pool pcs-c4

network 172.16.29.0 255.255.255.224

next-server 172.16.29.1

default-router 172.16.29.1

dns-server 172.16.30.2

domain-name cisco.com

lease 7 0 10

以下是對應到disable.cm的特定纜線資料機的MAC位址的靜態繫結：

ip dhcp pool cm-0010.7bed.9b45

host 10.1.4.65 255.255.255.0

client-identifier 0100.107b.ed9b.45

bootfile disable.cm

以下是對映到快閃記憶體中的silver.cm配置檔案的特定纜線資料機MAC地址的靜態繫結：

ip dhcp pool cm-0010.7bed.9b23

host 10.1.4.66 255.255.255.0

client-identifier 0100.107b.ed9b.23

bootfile silver.cm

當.cm檔案位於快閃記憶體中而不位於TFTP伺服器上時，請使用tftp server slot0:silver.cm alias silver.cm語句。

完成以下步驟，以便將DOCSIS配置檔案放在uBR72xx的快閃記憶體中：

1. 在uBR7200上鍵入copy tftp slot:0:命令並按ENTER鍵。解析器會提示您輸入遠端主機的名稱。

2. 指定.cm檔案所在的TFTP伺服器的地址。解析器會提示您輸入源檔名。

3. 鍵入.cm檔名並按ENTER鍵。

4. 輸入show slot0:命令以驗證DOCSIS配置檔案是否存在，並檢查其大小是否與TFTP伺服器中的大小相匹配。

問：是否可以將Cisco CMTS配置為網橋？

A.不能將uBR72xx系列配置為網橋。但是，專為酒店行業設計的uBR7100系列支援橋接，因此，如果您要在筆記型電腦上使用靜態IP地址，則可以在出差時連線到Internet。有關詳細資訊，請參閱在網橋模式下配置UBR 7100。

問：Cisco CMTS是否支援PPPoE?

A. Cisco uBR7200系列路由器支援乙太網點對點協定(PPPoE)終止，但不支援PPPoE轉發。PPPoE終端目前在Cisco IOS®軟體版本12.1(5)T中可用。

PPPoE允許直接連線到電纜介面。PPPoE提供服務提供者數位使用者線路(DSL)支援。思科uBR7200系列路由器的電纜介面支援PPPoE，使電纜數據機後的客戶端裝置(CPE)能夠使用PPP作為獲取IP地址並將其用於所有後續資料流量的機制，就像撥號PPP客戶端一樣。在PPP撥號會話中，對PPPoE會話進行身份驗證，並在PPPoE客戶端和伺服器之間協商IP地址。伺服器可以是Cisco uBR7200系列路由器或家庭網關。如需詳細資訊，請參閱使用L2TP通道在uBR7100 CMTS上設定PPPoE終端。

問：如何在DOCSIS 1.0中配置基線隱私？

答：這樣配置的先決條件如下：

- CM和CMTS上必須有K1映像。

- 您必須具有配置檔案編輯器。

完成以下步驟，在配置檔案編輯器上啟用基線隱私：

1. 開啟CPE DOCSIS配置器。

2. 如果使用版本V2.0.4或版本3.0.a，請編輯DOCSIS配置檔案，在Baseline Privacy Enable欄位中將值從0更改為1。0是預設值，表示未啟用「基線隱私」。

請記住以下幾點：

- DOCSIS配置檔案必須位於tftpboot目錄中。

- tftpboot目錄位於TFTP伺服器上。

- TFTP伺服器連線到CMTS的FE埠或CMTS的LAN中。

CM重新啟動後，CM會載入您新建立的DOCSIS配置檔案引數。CM與CMTS協商基線隱私介面(BPI)。如果您發出show cable modem命令，則CM顯示為已註冊：online(PT)，而不是完全在線的。如果您沒有看到(PT)，則需要仔細檢查是否確實在CM和CMTS上有K1映像，並且啟用了Class-of-Service Privacy為= 1。有關如何使用CPE配置器V3.2工具的更多資訊，請參閱使用Cisco DOCSIS配置器構建DOCSIS 1.0配置檔案(僅限註冊客戶)。

問：如何在Cisco CMTS上配置捆綁？

A.以下是基本捆綁配置：

hostname 7246VXR

!

interface Ethernet2/0

ip address 172.16.135.11 255.255.255.128

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.30.1 255.255.255.0

!--- IP address configured.

ip helper-address 172.16.135.20

!--- IP address of DHCP server.

no ip route-cache cef

no keepalive

cable bundle 1 master

!--- Master interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!

interface Cable5/0

no ip address

load-interval 30

no keepalive

cable bundle 1

!--- Slave interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

cable upstream 0 channel-width 1600000 3200000

no cable upstream 0 shutdown

no cable upstream 1 shutdown

no cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

有關如何驗證和排除此配置的詳細資訊，請參閱捆綁電纜介面示例配置和驗證。

相關資訊

- 技術支援與文件 - Cisco Systems