目录

简介

在系统中配置的邻居状态

运行状况检查CLI

排除CLI故障

SNMP 陷阱

简介

本文档介绍边界网关协议(BGP)运行状况检查以及如何排除CLI故障。

ASR 5000/ASR 5500/虚拟数据包核心支持BGP，该BGP是AS间路由协议。BGP也可用作机箱间会话恢复(ICSR)的监控机制。

在系统中配置的邻居状态

这些CLI示例显示如何检查系统中配置的BGP邻居状态。系统中存在的每个情景都有独立的路由表；因此，要检查运营商必须处于要检查的所需环境中的BGP路由信息。

下面是情景感知CLI。

- BGP邻居信息show ip bgp summary

此处的示例显示情景gn下的IPv4和IPv6邻居条目。在上例中，四个邻居在ECMP模式下运行，为系统提供更高的吞吐量和可靠性。  可以在Up/Down和State列下检查对等体的稳定性。

[gn]asr5500# show ip bgp summary

BGP Address-Family : IPv4

BGP router identifier 10.10.1.100, local AS number 2

BGP table version is 2

2 BGP AS-PATH entries

Neighbor      V AS MsgRcvd MsgSent TblVer Up/Down State/PfxRcd

192.168.2.1  4 65021 1362115 1666073 2    12w5d12h   1

192.168.3.1  4 65021 1362137 1666216 2    12w5d12h   1

192.168.4.1  4 65021 1362115 1665912 2    12w5d12h   1

192.168.5.1  4 65021 1362137 1666148 2    12w5d12h   1

BGP Address-Family : IPv6

BGP router identifier 10.10.1.100, local AS number 2

BGP table version is 2

2 BGP AS-PATH entries

Neighbor                      V AS    MsgRcvd MsgSent TblVer Up/Down State/PfxRcd

2000:4000:1:aa01:a0:100:0:a1  4 65021 1362115 1666009 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:b1  4 65021 1362137 1666175 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:a2  4 65021 1362115 1666051 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:b2  4 65021 1362137 1666199 2      12w5d12h  1

- 显示详细的BGP邻居信息 show ip bgp neighbors

[gn]asr5500# show ip bgp neighbors

BGP neighbor is 192.168.2.1, remote AS 1, local AS 2, external link

BGP version 4, remote router ID 10.1.1.1

BGP state = Established,up for 00:08:50

Hold time is 90 seconds, keepalive interval is 30 seconds

Configured Hold time is 90 seconds, keepalive interval is 30 seconds

Connect Interval is 20 seconds

Neighbor capabilities:

Route refresh: advertised and received (old and new)

Address family IPv4 Unicast: advertised and received

Received 23 messages, 0 notifications, 0 in queue

Sent 25 messages, 0 notifications, 0 in queue

Route refresh request: received 0, sent 0

Minimum time between advertisement runs is 30 seconds

For address family: IPv4 Unicast

AF-dependant capabilities:

Graceful restart: advertised

0 accepted prefixes, maximum limit 40960

Threshold for warning message 75(%)

3 announced prefixes

For address family: VPNv4 Unicast

0 accepted prefixes

0 announced prefixes

For address family: IPv6 Unicast

0 accepted prefixes

0 announced prefixes

For address family: VPNv6 Unicast

0 accepted prefixes

0 announced prefixes

Connections established 1; dropped 0

Local host: 192.168.2.2, Local port: 38190

Foreign host: 192.168.2.1, Foreign port: 179

Next hop: 192.168.2.2

Next hop global: fe80::5:47ff:fe30:4fd8

运行状况检查CLI

以下是情景感知CLI。这些命令必须从正确的上下文运行。

- show ip interface summary

- show ipv6 interface summary

- show ip bgp

- show ip bgp summary

- show ip bgp neighbors

- show ip bgp neighbors <IP Address> accepted-routes

- show ip bgp neighbors <IP Address> advertised-routes

- show ip bgp neighbors <IP Address> received-routes

- ping <BGP邻居IPV4> src <IPv4 Loopback>

- ping6 <BGP邻居IPv6> src <IPv6 Loopback>

排除CLI故障

- show snmp trap history verbose | grep -i bgp

- show logs | grep -i bgp

- show srp monitor all（如果使用ICSR）

这些命令应仅在思科支持部门提出建议时执行，因为过高的日志记录可能会对系统造成风险压力并影响用户。

- logging filter active facility bgp level

- logging filter active facility level debug

- 日志记录活动

- no logging active

- Wireshark跟踪

SNMP 陷阱

显示与BGP相关的SNMP陷阱

show snmp trap history verbose | grep -i bgp

此处的示例显示情景中的IPv6邻居已关闭并恢复。

Mon Jan 11 07:14:18 2021 Internal trap notification 1289 (BGPPeerSessionIPv6Down) vpn gn ipaddr 2000:4000:1:aa01:a0:100:0:a1

Mon Jan 11 09:03:06 2021 Internal trap notification 1288 (BGPPeerSessionIPv6Up) vpn gn ipaddr 2000:4000:1:aa01:a0:100:0:a1

- BGPPeerSessionDown

描述:到指定IP地址的BGP对等会话不再运行。

可能原因：BGP对等体不运行；节点和BGP对等体之间的网络发生故障。要采取的操作：验证BGP对等体是否运行正常；检验与BGP对等体的网络连接。

- BGPPeerSessionUp

描述:到指定IP地址的BGP对等会话可以运行。这可能表示新对等体的初始配置、系统重新启动后的初始连接或BGPPeerSessionDown事件后的连接恢复。

要采取的操作：无所需操作

- BGPPeerSessionIPv6Down

描述:到指定IPv6地址的BGP对等会话不再运行。

可能原因：BGP对等体不运行；节点和BGP对等体之间的网络发生故障。

要采取的操作：验证BGP对等体是否运行正常；检验与BGP对等体的网络连接。

- BGPPeerSessionIPv6Up

描述:到指定IPv6地址的BGP对等会话可以运行。这可能表示新对等体的初始配置、系统重新启动后的初始连接，或starBGNPeerSessionDown事件后的连接恢复。

要采取的操作：无所需操作