目录

简介

本文档介绍在URWB模式下的IW9165和IW9167无线电上配置MPLS参数。

先决条件

要求

Cisco 建议您了解以下主题：

- 基本CLI导航和命令

- 了解IW URWB模式无线电

使用的组件

本文档中的信息基于以下软件和硬件版本：

- IW9165和IW9167无线电

- 工业无线服务

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

MPLS是一种路由技术，它使用标签而不是IP地址将数据从源发送到目的地。

在URWB模式下的IW9165和IW9167无线电上，可以通过工业无线服务和CLI的IoT OD配置多个MPLS参数。

本文档提供了有关配置这些参数的详细说明。

配置

当前配置

要查看设备上的当前MPLS配置，请执行以下操作：

device#show mpls configuration

示例输出：

Configuration for MPLS:

- MPLS tunnels: Tunnel1, Tunnel2

- Unicast flooding: enabled

- Pseudowire formation: meshend

- Cluster ID: cluster1

- ARP limit: rate 100, grace 200, block 300

- ARP unicast flooding: enabled

- Reduce broadcast: enabled

- VBR table: 5 entries

单播泛洪

步骤 1：启用MPLS数据包的单播泛洪。

device#configure mpls unicast enabled

步骤 2：禁用MPLS数据包的单播泛洪。

device#configure mpls unicast disabled

步骤 3：启用来自非私有IP地址的单播泛洪。

device#configure mpls unicast restricted

步骤 4：启用单播数据包的重试限制。

device#configure mpls unicast-flood rate-limit enabled

步骤 5：禁用单播数据包的重试限制。

device#configure mpls unicast-flood rate-limit disabled

伪线形成

步骤 1：使伪线仅能连接到网状端。

device#configure mpls pw-set meshend

步骤 2：启用到所有设备的伪线。

device#configure mpls pw-set all

集群ID

步骤 1：配置集群ID。

device#configure mpls cluster-id set cluster1

步骤 2：删除集群ID。

device#configure mpls cluster-id clear

ARP限制

步骤 1：设置ARP限制速率。

device#configure mpls arp-limit rate N

步骤 2：设置ARP限制宽限值。

device#configure mpls arp-limit grace rate X

步骤 3：设置ARP限制块值。

device#configure mpls arp-limit block Y

ARP单播泛洪

步骤 1：启用ARP单播泛洪。

device#configure mpls arp-unicast enabled

步骤 2：禁用ARP单播泛洪。

device#configure mpls arp-unicast disabled

减少广播

步骤 1：启用减少广播数据包。

device#configure mpls reduce-broadcast enabled

步骤 2：禁用减少广播数据包。

device#configure mpls reduce-broadcast disabled

VBR表

步骤 1：从任何设备清除VBR表。

device#configure mpls vbr clear

步骤 2：向设备添加新路径。

device#configure mpls vbr mac-list add <mac-address> <vlan id>

步骤 3：从设备删除获知的路径。

device#configure mpls vbr mac-list clear <mac-address> <vlan id>

验证

步骤 1：检验MPLS配置。

device#show mpls configuration

说明:此命令显示设备上建立的当前MPLS设置和隧道。

Step 2: Validate VBR table entries

device#show mpls vbr

相关信息

- 思科技术支持和下载

"'