目录

简介

先决条件

要求

使用的组件

规则

背景信息

计时

配置

网络图

配置

验证

在路由器 asj3640-1 上

在路由器 asj3640-2 上

故障排除

相关信息

简介

本文档提供连接和测试含两个背对背 Cisco 3640 路由器的 T1 连接的示例配置。

在此示例配置中，我们配置了 Cisco 路由器，将含时钟源的 j3640-1 设置为内部。这表示服务提供商或电话公司 (telco) 不提供时钟，因此 T1 需要在内部获取时钟，并且在这种情况下是“主设备”。我们还需要配置直接连接至此 T1 的所有其他设备，以便从主设备（Cisco 路由器 asj3640-1）获取时钟并作为“从属设备”运行。 在我们的设置中，从属设备是 Cisco 路由器 asj3640-2。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- asj3640-1上的Cisco IOS®软件版本11.3(10)T。此处使用NM-1CT1-CSU网络模块。

- asj3640-2上的Cisco IOS软件版本12.2(1)。我们在此处使用NM-2CT1-CSU网络模块。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

计时

计时是 T1 网络中的一个重要功能。计时是指 T1 载波的定时和同步。定时在传输的数据信号内编码，并用于确保网络中的同步。在典型情况下，T1 的一端提供主时钟，另一端是主时钟的从属设备。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

图1 – 网络图

配置

本文档使用以下配置：

- asj3640-1

- asj3640-2

asj3640-1

asj3640-1#show running-config

Building configuration...

Current configuration:

!

version 11.3

!

hostname asj3640-1

!

!

controller T1 1/0

framing esf

clock source internal

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

!

interface Serial1/0:1

ip address 10.10.10.1 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.116 255.255.255.240

!

!

line con 0

transport input none

line aux 0

line vty 0 4

exec-timeout 60 0

login

!

end

asj3640-2

asj3640-2#show running-config

Building configuration...

!

version 12.2

!

hostname asj3640-2

!

!

controller T1 1/0

framing esf

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

controller T1 1/1

shutdown

!

interface Serial1/0:1

ip address 10.10.10.2 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.117 255.255.255.240

!

!

line con 0

transport input none

line 1 18

line aux 0

line vty 0 4

login

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show interfaces serial — 显示关于串行接口的信息。

- show controllers — 显示关于物理端口设备的信息。

- show diag — 显示环境统计信息和开机诊断状态。

图1所示为在设备上输入的这些命令的输出。此输出显示网络工作正常。

在路由器 asj3640-1 上

asj3640-1#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.1/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set, keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:02, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/2 (size/max/drops); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

56408 packets input, 3194092 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

52431 packets output, 1988028 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-1#show controllers t1

T1 1/0 is up.

T1 with CSU interface.

Cable Length is LONG, Rcv gain is 36 db and Tx gain is 0 db.

No alarms detected.

Framing is ESF, Line Code is B8ZS, Clock Source is Internal.

Data in current interval (765 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

asj3640-1#show diag

Slot 1:

CT1 (CSU) port adapter, 1 port

Port adapter is analyzed

Port adapter insertion time unknown

Hardware revision 1.1           Board revision A0

Serial number     5706080       Part number    800-01228-03

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 26 01 01 00 57 11 60 50 04 CC 03 00 00 00 00

0x30: 50 00 00 00 97 10 11 17 FF FF FF FF FF FF FF FF

在路由器 asj3640-2 上

asj3640-2#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.2/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:03, output 04:23:19, output hang never

Last clearing of "show interface" counters 1d20h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 8

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 48 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34363 packets input, 1305984 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

37049 packets output, 2090260 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-2#show controllers t1

T1 1/0 is up.

Applique type is Channelized T1

Cablelength is long gain36 0db

No alarms detected.

alarm-trigger is not set

Framing is ESF, Line Code is B8ZS, Clock Source is Line.

Data in current interval (557 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 1 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 1 Severely Err Secs, 0 Unavail Secs

asj3640-2#show diag

Slot 1:

CT1 (CSU) Port adapter, 2 ports

Port adapter is analyzed

Port adapter insertion time unknown

EEPROM contents at hardware discovery:

Hardware revision 1.1           Board revision B0

Serial number     16809907      Part number    800-01229-04

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 27 01 01 01 00 7F B3 50 04 CD 04 00 00 00 00

0x30: 58 00 00 00 99 11 02 00 FF FF FF FF FF FF FF FF

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 接入技术支持页面

- 技术支持 - Cisco Systems