目录

简介

先决条件

要求

使用的组件

配置

ATM模式

EFM模式

验证

故障排除

相关信息

简介

本文档介绍在两个EHWIC-4SHDSL-EA模块之间实施背对背多速率对称高速数字用户线路(G.SHDSL)连接所需的配置步骤。

您必须在中心办公室(CO)模式下配置连接的一端，在客户端设备(CPE)模式下配置连接的另一端，以启用SHDSL连接。这种背对背SHDSL连接设置通常在园区网络中实现，以便在两栋建筑之间提供连接，而无需在两个DSL路由器之间设置数字用户线路接入复用器(DSLAM)。

先决条件

要求

Cisco 建议您了解以下主题：

- EHWIC-4SHDSL-EA模块

- 固定集成多业务路由器(ISR)G2路由器（如C888EA-K9）在Cisco IOS®软件15.2(2)T2及更高版本的CO和CPE模式下均可工作

使用的组件

本文档不限于特定的软件和硬件版本。

但是，设置是使用以下设备构建的：

- 加载了Cisco IOS® 15.4.3M2的两台ISR第2代路由器(CISCO2901/K9)

- 两台ISR G2路由器上都安装了两个EHWIC-4SHDSL-EA模块

- ANSI/TIA/EIA-568-B电缆，两端均带RJ-45连接器

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

在此设置中，您将使用安装了EHWIC-4SHDSL-EA模块的相同路由器。名为CO_Router的设备配置了SHDSL控制器以在CO模式下运行，而名为CPE_Router的设备配置了SHDSL控制器以在CPE模式下运行。

EHWIC-4SHDSL-EA模块可以配置为第一英里(EFM)以太网和异步传输模式(ATM)以太网。 本文档说明如何在EFM和ATM模式下设置背对背SHDSL连接。

此处的示例显示如何在ATM模式下设置背对背SHDSL连接。

ATM模式

在配置背对背SHDSL连接时，可以实施IP over ATM(IPoA)或PPP over ATM(PPPoA)解决方案。

1. IPoA解决方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1624 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

redundancy

!

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.1 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1538 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

voice-card 0

!

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.2 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

2. PPPoA解决方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1779 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

control-plane

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1693 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

3.基于ATM的PPPoE解决方案

- CO路由器：

CO_Router#show running-configuration

Building configuration...

Current configuration : 2299 bytes

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot-end-marker

!

no aaa new-model

!

username cisco password 0 cisco

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

bba-group pppoe global

virtual-template 1

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

protocol pppoe group global

!

!

interface Virtual-Template1

ip unnumbered Loopback0

ip mtu 1492

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 10.1.1.2 10.1.1.254

!

line con 0

line aux 0

line vty 0 4

login

transport input all

end

CO_Router#

Verification:

CO_Router#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi1.1          -          10.1.1.2        -               -               in

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 2554 bytes

!

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/2

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

pppoe-client dial-pool-number 1

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco

ppp chap password 0 cisco

!

!

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CPE_Router#

Verification:

CPE_Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Embedded-Service-Engine0/0 unassigned      YES NVRAM  administratively down down

ATM0/1/0                   unassigned      YES unset  up                    up

ATM0/1/0.1                 unassigned      YES unset  up                    up

Dialer1                    10.1.1.2        YES IPCP   up                    up

Virtual-Access1            unassigned      YES unset  up                    up

CPE_Router#

EFM模式

在配置背对背SHDSL连接时，可以实施IPoE或PPPoE解决方案。

1. IPoE解决方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 2194 bytes

!

! Last configuration change at 14:56:53 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

cts logging verbose

!

!

redundancy

!

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

ip address 1.1.1.1 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1646 bytes

!

! Last configuration change at 14:50:55 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

redundancy

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

2. PPPoE解决方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1851 bytes

!

! Last configuration change at 15:00:06 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

bba-group pppoe global

virtual-template 1

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

pppoe enable group global

!

interface Virtual-Template1

mtu 1492

ip unnumbered Ethernet0/3/0

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 1.1.1.1

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 2310 bytes

!

! Last configuration change at 15:10:04 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

!

!

!

!

cts logging verbose

!

!

voice-card 0

!

!

!

!

!

redundancy

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

!

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

!

!

control-plane

!

!

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

验证

使用本部分可确认配置能否正常运行。

1.要验证路由器是否处于CO模式，请运行show命令。输出中的CO终止行（示例中粗体）表示路由器处于CO模式。默认模式为CPE。为简单起见，有些输出不显示在此处。

CO# show controllers shdSL 0/1/0

Controller SHDSL 0/1/0 is UP

Hardware is EHWIC-4SHDSL-EA, rev 0 on slot 0, hwic slot 1

Capabilities: EFM: 2-wire, EFM-Bond, Annex A, B, F & G

ATM: 2-wire, Mpair, IMA, Annex A, B, F & G

- CO终止：

cdb=0x3CF085F0, plugin=0x21C33C1C, ds=0x21C33C68 base=0x10200000

FPGA Version is A14

NPU Source: System

NPU Firmware version: SHDSL_EA_FW_20130116053038

Vendor: Infineon, Chipset: SOCRATES-4e

PHY Source: System

IDC Firmware version: 1.7.5.0

DFE Firmware version: 1.1-1.7.5__002

Firmware reload mode: Auto

<Output abbreviated due to space constraints>

2.对于EFM模式，请运行show controllers ethernet命令进行验证。

3.对于ATM模式，请运行show controllers atm命令进行验证。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 有关排除SHDSL连接故障的详细信息，请参阅在Cisco路由器中配置Cisco G.SHDSL EFM/ATM EHWIC

- 有关PPP相关故障排除，请参阅PPP故障排除流程图

- 技术支持和文档 - Cisco Systems