目录

简介

问题

解决方案

相关信息

简介

本文档介绍新的CLI，它跟踪拨号器接口上点对点协议(PPP)会话的存在。

问题

拨号器接口在数字用户线路(DSL)世界中广泛使用，在不同类型的部署中，如以太网点对点协议(PPPoE)、异步传输模式点对点协议(PPPoA)等。拨号器接口始终处于打开状态，而不管其顶部的PPP会话处于打开或关闭状态。此行为的一个已知问题是，在您有多个传出连接的情况下，它会在路由中造成黑洞，除非您使用一些其他功能(如互联网协议服务级别协议(IP SLA)跟踪)来检查拨号器接口的可达性。

解决方案

最新IOS版本中引入了新的CLI dialer down-with-vInterface，当PPP会话关闭时，该CLI拨号器接口将关闭。

来自DSL路由器的配置片段：

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco@cisco.com

ppp chap password 0 cisco

即使PPPoE会话关闭，拨号器接口也处于打开状态。

Router#show pppoe session

1 client session

Uniq ID  PPPoE  RemMAC          Port                    VT  VA         State

SID  LocMAC                                      VA-st      Type

N/A     58  00c1.64d5.41d1  Gi0/1                   Di1 N/A        PADISNT

0006.f657.67b1

Router#show interface dialer1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:49:48

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

CLIENT(config-if)

您可以在拨号器接口配置下添加新的CLI，如下所示：

Router(config)#int dialer1

Router(config-if)# dialer down-with-vInterface

在输入dialer down-with-vInterface CLI后，当PPP会话处于down状态时，dialer interface将变为down状态，如示例所示：

Router#show interface dialer1

Dialer1 is down, line protocol is down (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:50:36

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

这有助于避免使用拨号器接口时路由故障切换所需的额外配置（如IP SLA、跟踪等）。

相关信息

- PPPoE配置指南