目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

配置 PLAR OPX 和 Hookflash 中继

网络图

配置

验证与故障排除

相关信息

简介

将 IP 语音 (VoIP) 技术集成到传统专用交换分机 (PBX) 和公共交换电话网 (PSTN) 时，有时需要传输一种名为“Hookflash”的信令。Hookflash是在环路启动中继上环路电流的一个短暂中断，环路启动中继的连接系统不会由于呼叫断开而中断。

一旦PBX或PSTN感觉到Hookflash，它们一般会使当前的呼叫进行保持状态，提供二次拨号音或接入使用其它功能，如进行呼叫转移或呼叫等待。

Hookflash 是通过瞬间按下电话上的支架完成的。一些电话话筒带有名为“flash”或“recall”的按钮，该按钮会发送“计时循环中断”或“校准的闪存”这样的可准确计时的 Hookflash。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco 1750 路由器

- Cisco IOS® 软件版本 12.2.5a

- H.323 版本 2 软件支持是前提条件。Cisco IOS 软件版本 12.05T 及更高版本均提供该软件支持。模拟外部交换站 (FXS) 和外部交换局 (FXO) 的语音端口支持 Hookflash 检测/生成。这些都在以下 Cisco 硬件平台上可用：

- 1750/51/60

- 2600

- 3600

- 3700

- MC3810

- 带有接入网关模块 (AGM) 的 Catalyst 4000

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

许多用户使用FXS和FXO端口组合将电话听筒扩展到IP网络。他们想保留现有PBX的功能，如远程分机上的呼叫转移，无应答时转到语音邮件，转接/保持呼叫到等。早期 Cisco VoIP 软件不提供完全控制功能，因此无法进行透明集成。然而，由于 Cisco IOS 软件版本 12.0.5T 及更高版本都支持 H.323 版本 2，因此现在可以跨 IP 网络监测和传输 Hookflash 信令。

当FXS端口配置了较长的“hookflash in”计时器值（大于500毫秒）时，用户可能会抱怨当他们挂断和立即拿起电话听筒时，呼叫并没有被清除。如果这个值设置得过低，Hookflash可能被解释为挂起，但一个过高的值又意味着电话听筒必须挂起较长时间才能清除呼叫。某些情况下，支架跳动也可能会导致问题。当把话筒挂起，挂钩按钮上的弹簧收紧可能会导致线路上的多个瞬时中断，被称为支架跳动。如果要获得最佳结果，需要仔细调整Hookflash时间值。在这些情况下的一种可能性是使用带有闪存按钮的话筒，它发送一个特定时段的Hookflash。可以设置FXO端口匹配此值，然后FXO端口生成输出的Hookflash。许多 PBX 都有一个 Class of Service (CoS) 选项，称为“校准的闪存”或“计时循环中断”，该选项允许 PBX 识别具有特定持续时间的 Hookflash，忽略其他时间较短或较长的环路中断。这样设置有助于排除错误断开和对PBX生成无效的Hookflash信号。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

配置 PLAR OPX 和 Hookflash 中继

使用此步骤可配置专线、自动振铃 (PLAR ) 外线分机 (OPX) 和 Hookflash 中继。

1. 将 MainSite 路由器上的 FXO 端口配置为 connection plar-opx。

OPX模式允许FXS端口上的远程用户以直接连接的扩展形式出现在中央PBX上。当FXO端口发现PBX的环信号时，路由器向远端FXS端口发送VOIP呼叫设置，但它并不使FXO端口摘机。结果，当拾起RemoteSide路由器FXS端口时，PBX只看到呼叫应答信号。当无应答超时（振铃停止）后，PBX可以结束呼叫，把呼叫转到语音邮件，或转接到其它分机/振铃组。没有 OPX 模式，FXO 端口将在检测到振铃时立即转为摘机状态，这样 PBX 就不能够执行呼叫转移、无应答或转到语音邮件功能。

2. RemoteSite路由器必须配置来感知并传递FXS端口上的Hookflash信号。

由于 Hookflash 只是暂时中断 FXS 端口上的环路电流，且不能作为音频信号发送，因此路由器会通过双音多频 (DTMF) 中继将 Hookflash 信号作为“!” 字符.然后，带有FXO端口的路由器发送一个短环路中断，外部设备将其看作Hookflash。如果要正确传输Hookflash信号，需要为dtmf-relay h245-signal配置VoIP 拨号对端。

3. 物理端口计时器必须进行调整，使之适应 FXS 端口上的电话话筒的特征和 FXO 端口上的 Hookflash 环路中断时长，如下所示：

- FXS语音端口(RemoteSite路由器)使用timing hookflash-out-in msec 命令，这里毫秒是指被解晰为Hookflash的电话听筒的环路中断（以毫秒计）的最大值。大于配置值的环路中断被当视为连接中断，因此呼叫也将中断。低于此值的任何间隔都将导致路由器通过 H.245 信号 DTMF 中继发送“!” 字符。

- FXO语音端口(MainSite路由器)使用 timing hookflash-out msec命令，这里毫秒是指以毫秒为单位的流出循环中断时长。当路由器收到 H.245 信号形式的 DTMF 中继信号时，FXO 端口会产生一个环路中断，时长等于已配置的间隔。

网络图

本文档使用此图所示的网络设置。

配置

本文档使用此处所示的配置。

- 主站点

- 远程站点

主站点

MainSite#show run

Building configuration...

Current configuration : 1121 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname MainSite

!

memory-size iomem 20

ip subnet-zero

!

call rsvp-sync

voice rtp send-recv

!

interface Loopback1

ip address 205.1.1.1 255.255.255.0

!

interface Serial0

bandwidth 1500

ip address 192.168.1.1 255.255.255.252

no fair-queue

clockrate 1300000

ip rtp priority 16384 16383 100

!

router eigrp 1

network 192.168.1.0

network 205.1.1.0

no auto-summary

no eigrp log-neighbor-changes

!

ip classless

no ip http server

ip pim bidir-enable

!

voice-port 1/0

timing hookflash-out 500

!--- Outgoing hookflash is 500 msec.

connection plar opx 200

!--- Use PLAR OPX option on the FXO port.

!

voice-port 1/1

timing hookflash-out 500

!--- Outgoing hookflash is 500 msec.

connection plar opx 201

!--- Use PLAR OPX option on the FXO port.

!

dial-peer voice 100 pots

destination-pattern 100

port 1/0

!

dial-peer voice 101 pots

destination-pattern 101

port 1/1

!

dial-peer voice 200 voip

incoming called-number .

destination-pattern 20.

session target ipv4:200.1.1.1

dtmf-relay h245-signal

!--- H.245-signal to pass hookflash.

ip precedence 5

!

line con 0

line aux 0

line vty 0 4

!

no scheduler allocate

end

远程站点

RemoteSite#show run

Building configuration...

Current configuration : 1096 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname RemoteSite

!

memory-size iomem 25

ip subnet-zero

!

call rsvp-sync

voice rtp send-recv

!

interface Loopback0

ip address 200.1.1.1 255.255.255.0

!

interface Serial0

bandwidth 1500

ip address 192.168.1.2 255.255.255.252

no fair-queue

ip rtp priority 16384 16383 100

!

router eigrp 1

network 192.168.1.0

network 200.1.1.0

no auto-summary

no eigrp log-neighbor-changes

!

ip classless

no ip http server

ip pim bidir-enable

!

!

voice-port 1/0

timing hookflash-in 1000

!--- Interpret loop breaks of up to 1 second.

connection plar 100

!--- PLAR provides dial tone from remote PBX.

!

voice-port 1/1

timing hookflash-in 1000

!--- Interpret loop breaks of up to 1 second.

connection plar 101

!--- PLAR provides dial tone from the remote PBX.

!

dial-peer voice 100 voip

incoming called-number .

destination-pattern 10.

session target ipv4:205.1.1.1

dtmf-relay h245-signal

!--- Use H.245-signal to pass hookflash.

ip precedence 5

!

dial-peer voice 200 pots

destination-pattern 200

port 1/0

!

dial-peer voice 201 pots

destination-pattern 201

port 1/1

!

!

line con 0

line aux 0

line vty 0 4

!

no scheduler allocate

end

验证与故障排除

本部分提供的信息可用于验证配置以及对配置进行故障排除。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- debug h225 {asn1 |事件} — 显示有关H.225注册、准入和状态(RAS)消息的实际内容的其他信息。

asn1

表明只有所有H.225消息中接收和发送的ASN.1内容会显示。

事件

表明当从一个网关向另一个网关发出H.323呼叫时，显示发生的主要Q.931事件。

Hookflash通过TCP作为一个H.245消息传输，因此可以通过使用debug h245 asn1，显示H245信息包来监控信令。

以下是两个 debug 跟踪。第一个显示接收到数字“5”(H.245呼叫信令通过数字和持续时间)。 第二个跟踪显示Hookflash（显示为“！”）。 没有 Hookflash 的持续时间。根据配置的计时Hookflash毫秒值将信号发送出FXO端口。

MainSite#

MainSite#debug h245 asn1

H.245 ASN1 Messages debugging is on

MainSite#

00:52:17: H245 MSC INCOMING ENCODE BUFFER::= 6D 810B66A0 0F9F58AD AF684A00 00

00:52:17:

00:52:17: H245 MSC INCOMING PDU ::=

value MultimediaSystemControlMessage ::= indication : userInput : signal :

{

signalType "5"

!--- Digit relayed is 5.

duration 4000

rtp

{

timestamp 2913953866

logicalChannelNumber 1

}

}

00:52:18: H245 MSC INCOMING ENCODE BUFFER::= 6D 82064001 26000000

00:52:18:

00:52:18: H245 MSC INCOMING PDU ::=

value MultimediaSystemControlMessage ::= indication : userInput : signalUpdate :

{

duration 295

!--- Digit duration was 295 msec.

rtp

{

logicalChannelNumber 1

}

}

MainSite#

!--- This trace from the destination router shows !--- the hookflash passed as the character '!'.

MainSite#

00:52:36: H245 MSC INCOMING ENCODE BUFFER::= 6D 81020420

00:52:36:

00:52:36: H245 MSC INCOMING PDU ::=

value MultimediaSystemControlMessage ::= indication : userInput : signal :

{

signalType "!"

!--- Hookflash is passed as '!'.

}

MainSite#

相关信息

- 为 VoIP 网关配置连接 PLAR

- H.323 版本 2 支持

- 语音技术支持

- 语音和统一通信产品支持

- Cisco IP 电话故障排除

- 技术支持 - Cisco Systems