Contents

Introduction

开始使用前

Conventions

Prerequisites

Components Used

请使用shutdown命令

请使用Windows NT关闭用户接口

Related Information

Introduction

本文描述如何关闭或重新启动运行微软Windows NT的Cisco智能联络管理(ICM)远程系统通过使用shutdown命令或Windows NT关闭用户接口。

Note: 您应该遵从此程序，只有当提示由Cisco技术支持中心(TAC)工程师，或者，当提示由Cisco ICM技术提示。

开始使用前

Conventions

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

Prerequisites

本文读者应具备以下方面的知识：

- Cisco ICM

- Microsoft Windows Networking

Components Used

本文档中的信息基于以下软件和硬件版本。

- Cisco ICM的所有版本

本文档中的信息都是基于特定实验室环境中的设备创建的。All of the devices used in this document started with a cleared (default) configuration.如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

请使用shutdown命令

您在远程登录会话上能使用shutdown命令关闭Cisco ICM远程系统。

Note: 在定期维护窗口期间，请使用shutdown命令。

下面的输出解释选项可用为shutdown命令。

C:\>shutdown /?

Usage: SHUTDOWN [machine] [/M:message] [/D:delay] [/Force] [/Reboot] [/Cancel]

------------------------------------------------------------------------------

where:  machine is the network name of the computer to shutdown

message is displayed in the shutdown dialog

delay is the amount of time to wait before shutting down

/Force  Forcibly closes all applications

/Reboot Restarts the machine immediately after shutdown

/Cancel Cancels an existing shutdown order

在以下示例中， shutdown命令关闭和重新启动称为“geociscolgra的”机器。

C:\>shutdown \\geociscolgra /force /reboot

请使用Windows NT关闭用户接口

使用微软Windows NT关闭用户接口，要重新启动您的计算机，请点击开始>关闭>重新启动计算机。

Related Information

- Technical Support - Cisco Systems