目录

简介

先决条件

使用的组件

恢复管理员帐户密码

步骤

验证

相关信息

简介

本文档提供在第4代和第5代交换矩阵互联上恢复丢失密码的过程的全面指南。

先决条件

对交换矩阵互联的物理访问。

使用的组件

交换矩阵互联6536。

RJ45至DB9串行电缆。

笔记本电脑。

恢复管理员帐户密码

步骤

1. 连接到控制台端口。 将串行管理电缆的RJ-45端插入交换矩阵互联上的控制台端口，并将DB-9凸端连接到笔记本电脑或其它计算机的串行端口。

2. 重新通电交换矩阵互联：

1. 关闭交换矩阵互联电源。

2. 打开交换矩阵互联电源。

3. 在控制台启动时按组合键： Ctrl + C。

4. 在加载程序提示符下，找到与命令dir一起使用的系统映像。

loader > dir

bootflash::

lost+found

ucs-manager-k9.4.2.3e.bin

.rpmstore

ucs_chassis_imgs

installables

ucs-6400-k9-system.9.3.5.I42.3d.bin   <----

nuova-sim-mgmt-nsg.0.1.0.001.bin

5. 运行命令cmdline recoverymode=1以启用恢复模式。

loader > cmdline recoverymode=1

6. 启动交换矩阵互联上的系统映像。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

7. 然后，进入config terminal模式。

switch(boot)# config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

switch(boot)(config)#

8. 重置管理员密码。

switch(boot)(config)# admin-password

注：请选择至少包含一个大写字母和一个数字的强密码。密码不能为空。

注意：新密码将以明文模式显示。

9.退出config terminal模式。

10.加载系统映像。

switch(boot)(config)# exit

switch(boot)# load ucs-6400-k9-system.9.3.5.I42.3d.bin

如果是集群配置。重复上述步骤以进入加载程序提示符。

1. 连接到控制台端口。

2. 重新通电交换矩阵互联：

1. 关闭交换矩阵互联电源。

2. 打开交换矩阵互联电源。

3. 在控制台启动时按组合键： Ctrl + C。

4. 在加载器提示下级交换矩阵互联时，启动映像以启动它。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

提示：交换矩阵互联必须处于同一固件版本才能形成集群。

验证

通过SSH建立到交换矩阵管理IP的连接，并使用更新的密码登录。

login as: admin

Pre-authentication banner message from server:

| Cisco UCS 6500 Series Fabric Interconnect

End of banner message from server

admin@X.X.X.X's password: N3wp4ssw0rd

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2009, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

FI-6536-A#

相关信息

https://www.cisco.com/c/en/us/td/docs/unified_computing/ucs/hw/6454-install-guide/6454/6454_chapter_011.html