目录

概述

什么是ARP探测？

故障排除

解决方法

引用错误

概述

本文档旨在帮助了解错误消息的原因并进行补救。

2013 Oct 25 15:23:17 N7K  %ARP-3-DUP_VADDR_SRC_IP_PROBE:  arp [4650]  Duplicate address Detected. Probe  packet received from 34bd.c8a3.ce30 on Vlan99(port-channel46) with destination set to our local Virtual ip, 10.10.10.1

2013 Oct 25 15:23:35 N7K  %ARP-3-DUP_SRC_IP_PROBE:  arp [4650]  Duplicate address Detected. Probe  packet received from 34bd.c8a3.ce30 on Vlan109(port-channel46) with destination set to our local ip, 10.10.10.2

什么是ARP探测？

ARP探测是使用全零发送方IP地址构建的ARP请求。该术语用于IPv4地址冲突检测规范(RFC 5227)。 在开始使用IPv4地址（无论是通过手动配置、DHCP还是其他方式接收）之前，实施此规范的主机必须通过广播ARP探测数据包来测试该地址是否已在使用。[8]

故障排除

这些ARP探测功能由属于该VLAN中没有SVI的交换机的Mac地址发送。

经进一步调查，这些是运行IP设备跟踪功能的IOS设备发送的ARP探测数据包。

以下是数据包的Ethanalyzer捕获示例：

N7K# ethanalyzer local interface inband capture-filter "ether src 34:bd:c8:a3:ce:30 and arp and host 10.10.10.2" detail

Capturing on inband

Frame 1 (60 bytes on wire, 60 bytes captured)

Arrival Time: Oct 25, 2013 15:28:59.577664000

[Time delta from previous captured frame: 0.000000000 seconds]

[Time delta from previous displayed frame: 0.000000000 seconds]

[Time since reference or first frame: 0.000000000 seconds]

Frame Number: 1

Frame Length: 60 bytes

Capture Length: 60 bytes

[Frame is marked: False]

[Protocols in frame: eth:arp]

Ethernet II, Src: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30), Dst: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Destination: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Address: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

Source: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

Address: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

Type: ARP (0x0806)

Trailer: 000000000000000000000000000000000000

Address Resolution Protocol (request)

Hardware type: Ethernet (0x0001)

Protocol type: IP (0x0800)

Hardware size: 6

Protocol size: 4

Opcode: request (0x0001)

[Is gratuitous: False]

Sender MAC address: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

Sender IP address: 0.0.0.0 (0.0.0.0)

Target MAC address: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Target IP address: 10.10.10.2 (10.10.10.2)

解决方法

IP设备跟踪功能现在在某些IOS交换机中默认启用

要解决此问题，您可以在从这些设备到nexus的物理接口上禁用IPDT:

注意：这无法全局禁用，必须按接口完成。 如果这是端口通道，则应在端口通道逻辑接口上而不是物理接口上配置。

IOSswitch(config)# no ip device tracking

% IP device tracking is disabled at the interface level by removing the relevant configs

IOSswitch(config)# interface gi1/0/1

IOSswitch(config-if)# ip device tracking maximum 0

IOSswitch(config-if)# end

在带3.2.3SE的3850上，以下配置将禁用该功能：

3850(config)# interface gi1/0/1

3850(config-if)# ip device tracking maximum 1

3850(config-if)# NMSP attach suppress

3850(config-if)# end

3850# wr mem

在带3.3.3SE的3850上，以下配置将禁用该功能(ip device tracking max 0 now works):

3850(config)# interface gi1/0/1

3850(config-if)# ip device tracking maximum 0

3850(config-if)# NMSP attach suppress

3850(config-if)# end

3850# wr mem

引用错误

CSCud96554抑制系统日志%ARP-3-DUP_VADDR_SRC_IP_PROBE

CSCul20441抑制6.2(2)中的系统日志%ARP-3-DUP_VADDR_SRC_IP_PROBE