目录

简介

问题

解决方案

相关信息

简介

本文档介绍Hewlett-Packard(HP)直通模块和Cisco Nexus 5000系列交换机出现的互操作性问题，并提供解决该问题的解决方案。

问题

将带2232的Nexus 5000(woodside交换矩阵扩展器(FEX))升级到版本5.2后遇到问题。当2232接口连接到10Gb HP直通模块时，它们会不断摆动，最终错误禁用：

NDCD29ACCSW1# show int brief | inc linkFlap

Eth152/1/1 2 eth trunk down linkFlapErrDisabled 10G(D) 1001

Eth152/1/2 2 eth trunk down linkFlapErrDisabled 10G(D) 1002

Eth152/1/3 2 eth trunk down linkFlapErrDisabled 10G(D) 1003

Eth152/1/4 2 eth trunk down linkFlapErrDisabled 10G(D) 1004

Eth152/1/5 2 eth trunk down linkFlapErrDisabled 10G(D) 1005

Eth152/1/9 2 eth trunk down linkFlapErrDisabled 10G(D) 1009

HP网站上记录了已知的HP 10Gb直通模块链路抖动问题 ，他们建议客户升级到1.0.7.0版。到目前为止，HP 10Gb直通固件是1.0.1.6。

注意：直通模块固件独立于HP板载管理员(OBA)版本。

要确定直通模块固件，请输入show interconnect info 11 命令：

1. Ethernet

Product Name: HP 10GbE Pass-Thru Module

Width: Single

URL to Management interface:

In-Band IPv4 Address: 0.0.0.0

User Assigned Name:

Part Number: 538113-B21

Spare Part Number: 504624-001

Serial Number: MY31104WWTTemperature Sensor: Present

JS2 Connector: Absent

Internal Ethernet Interface to OA: Absent

Internal Ethernet Route to OA: Enabled

Internal Serial Interface to OA: Present

Internal Serial Route to OA: Enabled

Serial Port Baud Rate: 9600

External Serial Port Interface: Present

External Ethernet Interface: Absent

Manufacturer: HP

然后，输入connect interconnect 1 命令以查看以下输出：

NOTICE: This pass-thru connection to the integrated I/O console

is provided for convenience and does not supply additional access

control.  For security reasons, use the password features of the

integrated switch.

Connecting to integrated switch 1 at 9600,N81...

Escape character is '<Ctrl>_' (Control + Shift + Underscore)

按Enter以显示交换机控制台：

------------------------------------------------------------------------------

Command: D)isconnect, C)hange settings, send B)reak, E)xit command mode X)modem send > C

Change settings for: L)ocal Session, R)emote Port [I/O Bay 1], E)xit

Change settings for: L)ocal Session, R)emote Port [I/O Bay 1], E)xit R

Settings: B)audrate; flow control: N)one H)ardware S)oftware; E)xit > N

Connected to integrated switch 1 at 9600,N81.

Escape character is '<Ctrl>_' (Control + Shift + Underscore)

------------------------------------------------------------------------------

输入10GbE Pass-Thru# /system命令以查看HP Pass-Thru模块版本号：

[System Menu]

info     -  System Information Display

config   -  Set Active or Factory Default Config

dumpconfig -  Dump Saved Config

xmodem   -  Download new image using XMODEM

reset    -  Reset The Switch

System# info

System:                  HP 10Gbe Pass-Thru

Version: 1.0.1.6

Board: HP 10GbE Pass-Thru Module

Serial:                  MY31104WWT

System#

如图所示，系统运行HP直通模块1.0.1.6版。HP提到此版本不打算发货给客户，也不会在其网站上发布。他们的直通模块供应商出错地提供了几个带有此版本的模块。HP发现链路抖动问题后，便发布了可解决此问题的补丁。HP请求了1.0.1.6版以进一步测试问题，但HP没有该版本。

注意：此问题只在版本5.2（而不是较旧版本）中才显而易见的原因是，较旧的Nexus操作系统中可能存在对不当HP模块的容忍度。

解决方案

如果客户提交的服务请求具有类似的症状，请检查HP直通模块固件并让其升级到版本1.0.7.0。

相关信息

- 直通模块版本1.0.7.0下载 — 惠普

- 升级程序 — HP

- 技术支持和文档 - Cisco Systems