Contents

Introduction

Prerequisites

Requirements

Components Used

背景信息

问题

解决方案

Related Information

Introduction

本文描述Cisco连结6000连接的一个问题与 Cisco连结2248PQ结构增量剂(FEX)和提供一个解决方案。

Prerequisites

Requirements

Cisco建议您有这些题目基础知识：

- Cisco连结2000系列FEX

- Cisco连结6000系列FEX配置

Components Used

本文档中的信息基于以下软件和硬件版本：

- Cisco连结2248PQ-10GE

- Cisco连结6004

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

背景信息

Cisco连结2248PQ FEX有十六个万兆以太网矩阵接口通过四个四元组(4信道)小的尺寸可插入的(QSFP)端口，并且四十八万兆以太网主机接口。所有主机接口使用所有可用的矩阵接口。(不支持静态别住。矩阵接口只支持端口信道方式。)当所有主机接口发送数据流到所有矩阵接口时， Cisco连结的2248PQ最大超量预订比率是3:1。

问题

当您提出在连接到Cisco连结2248PQ-10GE的Cisco连结的链路6000个FEX结构端口时，在Cisco连结6000的链路显示，因为链路没被连接的和在Cisco连结2248PQ的端口的链路指示灯绿色或：

Nexus6004-A# show int eth 2/7

Ethernet2/7 is down (Link not connected)

Dedicated Interface

Belongs to Po125

Hardware: 40000 Ethernet, address: 5897.1ef0.4856 (bia 5897.1ef0.4856)

MTU 1500 bytes, BW 40000000 Kbit, DLY 10 usec

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is fex-fabric

auto-duplex, 40 Gb/s, media type is 40g

解决方案

为了带动此链路， Cisco连结2248PQ需要发现QSFP电缆，四条独立的10G链路(请收回uplink端口的早先说明作为十六条10G链路通过四个QSFP端口)。使用同一个电缆，但是您需要输入此on命令Cisco连结您计划分成四10G连接的6000个端口：

(config)# interface breakout slot 2 port 7-9 map 10g-4x

Note:您必须分开端口成组三，并且您必须分开整个组，不仅一名成员。因此您的选项是包括早先组的所有成员的1-3， 4-6， 7-9， 10-12，或者所有组合。例如， 1-6， 7-12， 4-9。

一旦输入此命令，您需要要使更改发挥作用重新载入模块：

(config)# poweroff module 2

(config)# no poweroff module 2

需要模块的几分钟能来联机。当它时，您应该看到您的链路分界到四个10G子端口：

Nexus6004-A# show int status | i 2/7

Eth2/7/1      --                 connected 1         full    10G     --

Eth2/7/2      --                 connected 1         full    10G     --

Eth2/7/3      --                 connected 1         full    10G     --

Eth2/7/4      --                 connected 1         full    10G     --

这时，您需要捆绑端口到Port-Channel，并且正常FEX配置可以适用：

(config)# fex 270

(config)# int ethernet 2/7/1-4

(config-if-range)# switchport mode fex-fabric

(config-if-range)# channel-group 270

(config)# interface port-channel 270

(config-if)# switchport mode fex-fabric

(config-if)# fex associate 270

(config-if)# shut

(config-if)# no shut

Related Information

- 断裂In命令配置指南

- 连结6000 FEX配置指南

- 连结2000数据表或宣传单页