目录

简介

先决条件

要求

使用的组件

规则

限制和限制

术语

PTP时钟故障同步

原因如下：

特定故障点

要采取的操作

PTP命令行界面Show命令

检查平台资源

平台工具

执行嵌入式数据包捕获(EPC)

收集PTP调试

执行Show Platform Forward(SPF)

执行Packet Tracer(PT)

Catalyst 9000上的PTP警告

相关信息

简介

本文档介绍如何对Catalyst 9000交换机上的精确时间协议(PTP)进行故障排除。

先决条件

要求

Cisco 建议您了解以下主题：

- 精确时间协议(PTP)

使用的组件

本文档中的信息基于Catalyst 9300、9400、9500和9600交换机。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅Cisco技术提示和规则。

限制和限制

- Catalyst 9200交换机不支持PTP，但从17.14.01开始的C9200CX交换机支持PTP。

- 在17.06.01之前，Stackwise部署中的Catalyst 9300交换机不支持PTP。

- 在17.10.01之前，Stackwise-Virtual中的Catalyst 9400、9500或9600交换机不支持PTP

Cisco Catalyst交换机支持Precision时间协议常见问题

有关Catalyst 9000的PTP限制和限制的详尽列表，请参阅给定平台和版本的第2层配置指南的PTP部分。

术语

期限

定义

大师级时钟(GMC)

在PTP域内，祖母时钟是使用PTP进行时钟同步的主要时间源。大师级时钟通常具有非常精确的时间源，例如GPS或原子钟。当网络不需要任何外部时间参考且仅需要在内部同步时，祖时钟可以自由运行。

普通时钟(OC)

普通时钟是具有单个PTP端口的PTP时钟。它用作PTP网络中的节点，可以被BMCA选为子域内的主节点或从节点。普通时钟是PTP网络中最常见的时钟类型，因为它们用作连接到需要同步的设备的网络中的终端节点。普通时钟与外部设备具有不同的接口。

边界时钟(BC)

PTP网络中的边界时钟代替标准网络交换机或路由器运行。边界时钟有多个PTP端口，每个端口都提供对单独PTP通信路径的访问。边界时钟提供PTP域之间的接口。它们会拦截和处理所有PTP消息，并传递所有其他网络流量。边界时钟使用BMCA选择任何端口看到的最佳时钟。然后，将选定端口设置为从端口。主端口与下游连接的时钟同步，而从端口与上游主时钟同步。

透明时钟(TC)

PTP网络中透明时钟的作用是更新PTP事件消息中的时间间隔字段。此更新补偿了交换机延迟，其准确度在1皮秒内。透明时钟有两种类型：

端到端(E2E)透明

测量SYNC和DELAY_REQUEST消息的PTP事件消息传输时间（也称为驻留时间）。此测量的传输时间将添加到相应消息中的数据字段（更正字段）：

- 测量的SYNC消息的传输时间会添加到相应的SYNC或FOLLOW_UP消息的校正字段中。

- 测量的DELAY_REQUEST消息的传输时间被添加到相应的DELAY_RESPONSE消息的校正字段中。

点对点(P2P)透明

如上所述，使用E2E透明时钟的相同方法测量PTP事件消息传输时间。此外，P2P透明时钟可测量上行链路延迟。上行链路延迟是所考虑的上游邻居P2P透明时钟和P2P透明时钟之间的估计数据包传播延迟。这两次（消息中转时间和上行链路延迟时间）都被添加到PTP事件消息的校正字段中，并且从设备接收的消息的校正字段包含所有链路延迟的总和。理论上，这是SYNC数据包的端到端总延迟（从主到从）。

PTP时钟故障同步

原因如下：

- 网络拥塞，导致PTP数据包在接口（传输中）或控制平面策略(CoPP)上被缓冲或丢弃。

- 防火墙拦截PTP数据包。

- 耗尽硬件资源，例如CPU、内存或TCAM。

- 硬件或软件限制，无法精确测量时间。

要执行的操作：

检查Cat9k PTP常见问题页面

查看show命令故障排除流程

特定故障点

通告和发现

症状

可能的原因

普通时钟CPU不处理来自GMC的通告数据包。普通时钟不会发送延迟请求数据包。在PTP协商之后，时钟无法同步。

根时钟未配置为发送Announce packets.PTP Packets lost in transit。接口、控制平面或ASIC丢弃的PTP数据包。配置错误导致GMC发送不正确的PTP域/配置文件或普通时钟配置的域/配置文件不正确。

要采取的操作：

验证PTP配置和状态：

执行接口或控制平面EPC以验证时钟正在接收和发送PTP数据包：

如果EPC不可靠，请使用PTP调试收集的数据验证正在发送和接收的PTP值：

最佳主时钟算法(BMCA)

症状

可能的原因

同步失败

忽略或拒绝来自GMC的PTP消息的时钟

日志记录错误重新同步尝试

网络设备和GMC之间的PTP版本不兼容。通告数据包中的时钟数据不准确。同一域内多个主时钟导致的时钟不稳定。

要采取的操作：

排除可能造成延迟或不准确时间保持的任何中转时钟或边界时钟。

排除平台上的任何硬件或软件限制，以免精确计时。

收集PTP调试并检查是否存在任何错误。

大师级时钟选择

症状

可能的原因

最佳主时钟算法(BMCA)不选择最准确的GMC。BMCA不计算网络延迟。优先级设置不匹配。

要采取的操作：

同步消息交换

症状

可能的原因

透明时钟(TC)配置错误，例如PTP配置文件或模式不正确。延迟计算出错。同步消息数据包在传输中或OC的控制平面上丢弃。

要采取的操作：

延迟请求和响应

症状

可能的原因

透明时钟无法计算精确的时间戳，从而导致延迟计算不准确。延迟请求或响应数据包以错误顺序接收、在传输中丢失或在控制平面之前丢弃

要采取的操作：

更正和同步

症状

可能的原因

时钟计算出的时间修正和延迟补偿不准确。硬件或软件限制，导致不正确的系统时钟调整，从而导致同步失败。

要采取的操作

PTP命令行界面Show命令

验证PTP模式、配置文件、身份、域、启用PTP的接口和PTP接口状态：

Cat9300#show ptp clock

PTP CLOCK INFO

PTP Device Type: Unknown

PTP Device Profile: Default Profile

Clock Identity: 0x70:B:4F:FF:FE:A8:52:80

Clock Domain: 0

Network Transport Protocol: 802.3

Number of PTP ports: 0

Cat9300#

没有PTP配置的接口仍处于域0中并处于INITIALIZING状态。

Cat9300#show ptp brief

Interface                       Domain    PTP State

GigabitEthernet1/0/1            0         INITIALIZING

这是端到端透明模式下时钟的过渡阶段。

Cat9300#configuration terminal

Cat9300(config)#interface twe1/0/1

Cat9300(config-if)#shut

Cat9300(config-if)#no shut

Cat9300(config-if)#end

%LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to down

%LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to down

Cat9300#show ptp brief | i 1/0/1

Interface                       Domain    PTP State

TwentyFiveGigE1/0/1             8         FAULTY

%LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to up

Cat9300#show ptp brief | i 1/0/1

Interface                       Domain    PTP State

TwentyFiveGigE1/0/1             8         LISTENING

%LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to up

Cat9300#show ptp brief | i 1/0/1

Interface                       Domain    PTP State

TwentyFiveGigE1/0/1             8         UNCALIBRATED

Cat9300#show ptp brief | i 1/0/1

Interface                       Domain    PTP State

TwentyFiveGigE1/0/1             8         SLAVE

Cat9300#show platform software fed switch active ptp debugs interface twe1/0/1

Offload Monitor Data:

=======================================

Ofld sig cnt: 0, Ofld ts cnt: 0, Ofld miss cnt: 0, Ofld issue hit: 0

Sig (rd,wr)ptr: (0,0), Nif (rd,wr)ptr: (0,0)

Drop counters:

=======================================

ptp messages dropped due to qos drain count : 0

Cat9300#show platform software fed switch active ifm mappings

Interface                 IF_ID    Inst Asic Core Port SubPort Mac  Cntx LPN  GPN  Type Active

TwentyFiveGigE1/0/1       0x9        0   0   0    0      0      7    8    1    1    NRU  Y

<>

Cat9300#show platform software fed switch active ptp if-id 0x009

Displaying port data for if_id 9

=======================================

Port Mac Address 9C:54:16:AE:4C:81

Port Clock Identity 9C:54:16:FF:FE:AE:4C:80

Port number 1

PTP Version 2

domain_value 8

Profile Type: : DEFAULT

Clock Mode : TRANSPARENT CLOCK E2E

Delay mechanism: End-to-End

port_enabled: TRUE

ptt_port_enabled: TRUE

Port state: : SLAVE

sync_seq_num 52439

delay_req_seq_num 0

ptp vlan is valid : TRUE

ptp vlan id 10

port mode 2

tag native vlan : FALSE

num sync messages transmitted  0

num followup messages transmitted  0

num sync messages received  4434

num followup messages received  4434

num delay requests transmitted  0

num delay responses received 0

num delay requests received  0

num delay responses transmitted  0

Cat9300#show platform software fed switch active ptp domain

Displaying data for domain number 8

=======================================

Profile Type : DEFAULT

Profile State: enabled

Clock Mode : TRANSPARENT CLOCK E2E

Delay Mechanism: : END-TO-END

PTP clock : 1970-1-1 1:45:13

mean_path_delay 0 nanoseconds

Transport Method : 802.3

Message general ip dscp  : 59

Message event ip dscp    : 47

Cat9300#show platform software fed switch active  ptp auto-calibrate

PTP Auto Calibration:

PTP auto_calibration status : FALSE

C9300-4c80#ptp calibrate interface twe1/0/1 speed all

%SYS-5-CONFIG_P: Configured programmatically by process PTP protocol engine from console as vty0

%PTP_RP_MODULE-6-PTP_AUTO_CALIBRATION_COMPLETE: PTP auto calibration on the interface TwentyFiveGigE1/0/1 is complete

%SYS-5-CONFIG_P: Configured programmatically by process PTP protocol engine from console as vty0

检查平台资源

检查接口

PTP数据包路径中的输入丢弃、输出丢弃或CRC错误的非零值会导致故障。

Cat9300#show interfaces twe1/0/1 human-readable

TwentyFiveGigE1/0/1 is up, line protocol is up (connected)

Hardware is Twenty Five Gigabit Ethernet, address is 9c54.16ae.4c81 (bia 9c54.16ae.4c81)

MTU 1500 bytes, BW 10000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive not set

Full-duplex, 10Gb/s, link type is auto, media type is SFP-10GBase-CX1

input flow-control is on, output flow-control is unsupported

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/2000/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 3.0 kilobits , 5 pps

5 minute output rate 0 bits/sec, 0 packets/sec

26,497 packets input, 1,955,114 bytes, 0 no buffer

Received 26,477 broadcasts (26,476 multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 26,476 multicast, 0 pause input

0 input packets with dribble condition detected

947 packets output, 124,533 bytes, 0 underruns

Output 17 broadcasts (917 multicasts)

0 output errors, 0 collisions, 3 interface resets

2 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

检查控制平面策略

PTP数据包通过低延迟队列进行处理。PTP流量与其他网络流量类型共享策略索引，因此最好验证控制平面上没有递增丢包。

Cat9300#show platform hardware fed switch active qos queue stats internal cpu policier

CPU Queue Statistics

============================================================================================

(default) (set)     Queue        Queue

QId PlcIdx  Queue Name                Enabled   Rate     Rate      Drop(Bytes)  Drop(Frames)

--------------------------------------------------------------------------------------------

0    11     DOT1X Auth                  Yes     1000      1000     0            0

1    1      L2 Control                  Yes     2000      2000     0            0

2    14     Forus traffic               Yes     4000      4000     0            0

3    0      ICMP GEN                    Yes     600       600      0            0

4    2      Routing Control             Yes     5400      5400     0            0

5    14     Forus Address resolution    Yes     4000      4000     0            0

6    0      ICMP Redirect               Yes     600       600      0            0

7    16     Inter FED Traffic           Yes     2000      2000     0            0

8    4      L2 LVX Cont Pack            Yes     1000      1000     0            0

9    19     EWLC Control                Yes     13000     13000    0            0

10   16     EWLC Data                   Yes     2000      2000     0            0

11   13     L2 LVX Data Pack            Yes     1000      1000     0            0

12   0      BROADCAST                   Yes     600       600      0            0

13   10     Openflow                    Yes     200       200      0            0

14   13     Sw forwarding               Yes     1000      1000     0            0

15   8      Topology Control            Yes     13000     13000    0            0

16   12     Proto Snooping              Yes     2000      2000     0            0

17   6      DHCP Snooping               Yes     400       400      0            0

18   13     Transit Traffic             Yes     1000      1000     0            0

19   10     RPF Failed                  Yes     200       200      0            0

20   15     MCAST END STATION           Yes     2000      2000     0            0

21   13     LOGGING                     Yes     1000      1000     0            0

22   7      Punt Webauth                Yes     1000      1000     0            0

23   18     High Rate App               Yes     13000     13000    0            0

24   10     Exception                   Yes     200       200      0            0

25   3      System Critical             Yes     1000      1000     0            0

26   10     NFL SAMPLED DATA            Yes     200       200      0            0

27   2      Low Latency                 Yes     5400      5400     0            0  <<< Queue for PTP traffic.

28   10     EGR Exception               Yes     200       200      0            0

29   5      Stackwise Virtual OOB       Yes     8000      8000     0            0

30   9      MCAST Data                  Yes     400       400      0            0

31   3      Gold Pkt                    Yes     1000      1000     0            0

* NOTE: CPU queue policer rates are configured to the closest hardware supported value

CPU Queue Policer Statistics

====================================================================

Policer    Policer Accept   Policer Accept  Policer Drop  Policer Drop

Index         Bytes          Frames        Bytes          Frames

-------------------------------------------------------------------

0          4052             48              0             0

1          3520420          10686           0             0

2          1966076          16634           0             0     <<< PTP packets share this Policier Index w/other network traffic.

3          0                0               0             0

4          0                0               0             0

5          0                0               0             0

6          0                0               0             0

7          0                0               0             0

8          2937088          45892           0             0

9          0                0               0             0

10         1770             15              0             0

11         0                0               0             0

12         0                0               0             0

13         20246            191             0             0

14         24918            252             0             0

15         0                0               0             0

16         0                0               0             0

17         0                0               0             0

18         0                0               0             0

19         0                0               0             0

Second Level Policer Statistics

====================================================================

20         8423584          73212           0             0

21         50986            506             0             0

Policer Index Mapping and Settings

--------------------------------------------------------------------

level-2   :   level-1                      (default)   (set)

PlcIndex  :   PlcIndex                       rate      rate

--------------------------------------------------------------------

20        :   1  2  8                        13000     13000

21        :   0 4 7 9 10 11 12 13 14 15      6000      6000

====================================================================

Second Level Policer Config

====================================================================

level-1 level-2                            level-2

QId PlcIdx  PlcIdx  Queue Name                 Enabled

--------------------------------------------------------------------

0    11      21      DOT1X Auth                  Yes

1    1       20      L2 Control                  Yes

2    14      21      Forus traffic               Yes

3    0       21      ICMP GEN                    Yes

4    2       20      Routing Control             Yes

5    14      21      Forus Address resolution    Yes

6    0       21      ICMP Redirect               Yes

7    16      -       Inter FED Traffic           No

8    4       21      L2 LVX Cont Pack            Yes

9    19      -       EWLC Control                No

10   16      -       EWLC Data                   No

11   13      21      L2 LVX Data Pack            Yes

12   0       21      BROADCAST                   Yes

13   10      21      Openflow                    Yes

14   13      21      Sw forwarding               Yes

15   8       20      Topology Control            Yes

16   12      21      Proto Snooping              Yes

17   6       -       DHCP Snooping               No

18   13      21      Transit Traffic             Yes

19   10      21      RPF Failed                  Yes

20   15      21      MCAST END STATION           Yes

21   13      21      LOGGING                     Yes

22   7       21      Punt Webauth                Yes

23   18      -       High Rate App               No

24   10      21      Exception                   Yes

25   3       -       System Critical             No

26   10      21      NFL SAMPLED DATA            Yes

27   2       20      Low Latency                 Yes

28   10      21      EGR Exception               Yes

29   5       -       Stackwise Virtual OOB       No

30   9       21      MCAST Data                  Yes

31   3       -       Gold Pkt                    No

<>

检查CPU和内存

Cat9300#show platform resources

**State Acronym: H - Healthy, W - Warning, C - Critical

Resource                 Usage                 Max             Warning         Critical        State

----------------------------------------------------------------------------------------------------

Control Processor       1.28%                 100%            90%             95%             H

DRAM                   3566MB(47%)           7575MB          85%             90%             H

TMPFS                  1001MB(13%)           7575MB          40%             50%             H

show processes cpu sorted | ex 0.00

show cpu history

show processes memory sorted

检查TCAM

Cat9300#show platform hardware fed switch active fwd-asic resource tcam utilization

Codes: EM - Exact_Match, I - Input, O - Output, IO - Input & Output, NA - Not Applicable

CAM Utilization for ASIC  [0]

Table                  Subtype      Dir      Max     Used    %Used       V4       V6     MPLS    Other

------------------------------------------------------------------------------------------------------

Mac Address Table      EM           I       32768       20    0.06%        0        0        0       20

Mac Address Table      TCAM         I        1024       21    2.05%        0        0        0       21

L3 Multicast           EM           I        8192        0    0.00%        0        0        0        0

L3 Multicast           TCAM         I         512        9    1.76%        3        6        0        0

L2 Multicast           EM           I        8192        0    0.00%        0        0        0        0

L2 Multicast           TCAM         I         512       11    2.15%        3        8        0        0

IP Route Table         EM           I       24576       12    0.05%       11        0        1        0

IP Route Table         TCAM         I        8192       25    0.31%       12       10        2        1

QOS ACL                TCAM         IO       5120       85    1.66%       28       38        0       19

Security ACL           TCAM         IO       5120      129    2.52%       26       58        0       45

Netflow ACL            TCAM         I         256        6    2.34%        2        2        0        2

PBR ACL                TCAM         I        1024       22    2.15%       16        6        0        0

Netflow ACL            TCAM         O         768        6    0.78%        2        2        0        2

Flow SPAN ACL          TCAM         IO       1024       13    1.27%        3        6        0        4

Control Plane          TCAM         I         512      282   55.08%      130      106        0       46 <<< Expected to be at least 50%

Tunnel Termination     TCAM         I         512       18    3.52%        8       10        0        0

Lisp Inst Mapping      TCAM         I        2048        1    0.05%        0        0        0        1

Security Association   TCAM         I         256        4    1.56%        2        2        0        0

CTS Cell Matrix/VPN

Label                  EM           O        8192        0    0.00%        0        0        0        0

CTS Cell Matrix/VPN

Label                  TCAM         O         512        1    0.20%        0        0        0        1

Client Table           EM           I        4096        0    0.00%        0        0        0        0

Client Table           TCAM         I         256        0    0.00%        0        0        0        0

Input Group LE         TCAM         I        1024        0    0.00%        0        0        0        0

Output Group LE        TCAM         O        1024        0    0.00%        0        0        0        0

Macsec SPD             TCAM         I         256        2    0.78%        0        0        0        2

平台工具

执行嵌入式数据包捕获(EPC)

配置EPC

Cat9300#monitor capture tac [interface | control-plane] [in | out | both] [match | access-list] buffer size 100

注意：有关用于EPC的更多配置选项，请查看给定平台/版本的网络管理配置指南。

在接口级别验证Rx PTP数据包

Cat9300#monitor capture tac interface twe1/0/1 in match any buffer size 100

Cat9300#monitor capture tac start

Started capture point : tac

%BUFCAP-6-ENABLE: Capture Point tac enabled.

C9300-4c80#monitor capture stop

Capture statistics collected at software:

Capture duration - 3 seconds

Packets received - 28

Packets dropped - 0

Packets oversized - 0

Bytes dropped in asic - 0

Capture buffer exists till exported or cleared

Stopped capture point : tac

%BUFCAP-6-DISABLE: Capture Point tac disabled.

C9300-4c80#show monitor capture tac buffer brief | i PTP

2   0.032858 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

12   1.032894 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

15   2.032831 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

28   3.033414 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

检验Rx数据包是否到达控制平面

Cat9300#monitor capture cpu control-plane in match any buffer size 100

Cat9300#monitor capture cpu start

Started capture point : cpu

Cat9300#

*Sep 28 14:05:28.375: %BUFCAP-6-ENABLE: Capture Point cpu enabled.

Cat9300#

验证控制平面级别的Tx PTP数据包

这表示Cisco IOS® XE软件和CPU正在生成Rx PTP数据包。

注意：下一跳交换机或SPAN/RSPAN上的入口EPC更可靠，可以验证本地普通时钟正在发送PTP数据包。

注意：CPU生成的数据包（如“ ”）在出口中不会在物理接口上配置了EPC，这是EPC工具的书面限制。

Cat9300#monitor capture cpu control-plane out match any buffer size 100

Cat9300#monitor capture cpu start

收集PTP调试

调试

目的

自动校准

bmc

显示接口的选定对象。

消息

自动校准调试

21:41:12.543: %LINK-5-CHANGED: Interface TwentyFiveGigE1/0/1, changed state to administratively down

21:41:13.542: %LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to down

21:41:13.543: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan10, changed state to down

1:41:29.714: Autocalibration: No autocalibration is progress (status - 0) or linkup interface TwentyFiveGigE1/0/1 different from autocalibrtion interface No interface

21:41:30.118: %SYS-5-CONFIG_I: Configured from console by console

21:41:31.714: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to down

21:41:35.821: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to up

21:41:37.824: %LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to up

21:41:37.824: Autocalibration: No autocalibration is progress (status - 0) or linkup interface TwentyFiveGigE1/0/1 different from autocalibrtion interface No interface

21:41:38.849: Autocalibration: No autocalibration is progress (status - 0) or linkup interface Vlan10 different from autocalibrtion interface No interface

21:41:39.849: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan10, changed state to up

bmc debug

21:41:12.543: %LINK-5-CHANGED: Interface TwentyFiveGigE1/0/1, changed state to administratively down

21:41:13.542: %LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to down

21:41:13.543: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan10, changed state to down

21:41:30.118: %SYS-5-CONFIG_I: Configured from console by console

21:41:31.714: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to down

21:41:35.821: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to up

21:41:37.824: %LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to up

21:41:39.849: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan10, changed state to up

21:41:40.277:  Set  gmc interface: TwentyFiveGigE1/0/1 <<<

消息debug

Cat9300#clear logging

Cat9300#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

Clear logging buffer [confirm]

Cat9300(config)#

Cat9300(config)#int twe1/0/1

Cat9300(config-if)#shut

Cat9300(config-if)#end

Cat9300#

Cat9300#debug ptp messages

PTP Messages debugging is on

Cat9300#

Cat9300#conf  t

Enter configuration commands, one per line.  End with CNTL/Z.

Cat9300(config)#interface twe1/0/1

Cat9300(config-if)#no shut

Cat9300(config-if)#end

Cat9300#

Cat9300#show ptp bri | i 1/0/1

TwentyFiveGigE1/0/1             8         FAULTY

Cat9300#show ptp bri | i 1/0/1

TwentyFiveGigE1/0/1             8         LISTENING

Cat9300#show ptp bri | i 1/0/1

TwentyFiveGigE1/0/1             8         UNCALIBRATED

Cat9300#show ptp bri | i 1/0/1

TwentyFiveGigE1/0/1             8         SLAVE

Cat9300#undebug all

All possible debugging has been turned off

Cat9300#

Cat9300#show logging

<>

Log Buffer (131072 bytes):

21:59:06.980: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to down

21:59:07.826: %SYS-5-CONFIG_I: Configured from console by console

21:59:11.271: %LINK-3-UPDOWN: Interface TwentyFiveGigE1/0/1, changed state to up

21:59:12.976: Cisco IOS-FMAN-PTP:retrieve interface: Twe1/0/1 iif_id: 9(fmanrp_ptp_port_data_update)  ptp port data:  <<< local data sent by clock

if_hdl = 9

mac address = 9c54.16ae.4c81 <<< similar to local clock identity

domain_value = 8

port_number = 1

port_state = 4

port_enabled = 1

ptt_port_enabled = 1

delete_flag = False

21:59:13.273: %LINEPROTO-5-UPDOWN: Line protocol on Interface TwentyFiveGigE1/0/1, changed state to up <<<

21:59:13.846:  received message on TwentyFiveGigE1/0/1 <<<

21:59:13.846: PTP message received, intf: TwentyFiveGigE1/0/1, type: ANNOUNCE

21:59:14.846:  received message on TwentyFiveGigE1/0/1

21:59:14.846: PTP message received, intf: TwentyFiveGigE1/0/1, type: ANNOUNCE

21:59:15.845:  received message on TwentyFiveGigE1/0/1

21:59:15.845: PTP message received, intf: TwentyFiveGigE1/0/1, type: ANNOUNCE

21:59:15.976: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan10, changed state to up

21:59:16.775:  Set  gmc interface: TwentyFiveGigE1/0/1 <<<

执行Show Platform Forward(SPF)

如果看到PTP数据包到达接口但未传送到控制平面，请运行此工具。

1. Configure ingress EPC on PTP enabled interface.

2. View buffer output and filter for PTP and make note of PTP packet number.

Cat9300#show monitor capture tac buffer brief | i PTP

2   0.032858 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message <<<

12   1.032894 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

15   2.032831 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

28   3.033414 74:8f:c2:dc:b0:63 -> 01:1b:19:00:00:00 PTPv2 82 Announce Message

3. Export buffer to .pcap on Switch's flash.

Cat9300-4c80#monitor capture tac export location flash:/ptp-cpu.pcap

4. Execute the SPF command and make note of interface where PTP packets are expected to ingress and reference the packet number from buffer brief command.

Cat9300#show platform hardware fed switch active forward interface twe1/0/1 pcap flash:ptp-cpu.pcap number 2 data

Show forward is running in the background. After completion, syslog can be generated.

4. View Forward/Drop decision

Cat9300#show platform hardware fed switch active forward last summary

Input Packet Details:

###[ Ethernet ]###

dst       = 01:1b:19:00:00:00

src=74:8f:c2:dc:b0:63

type      = 0x8100

###[ 802.1Q ]###

prio      = 0

id        = 0

vlan      = 10

type      = 0x88f7

###[ Raw ]###

load      = '0B 02 00 40 08 00 00 08 00 00 00 00 00 00 00 00 00 00 00 00 74 8F C2 FF FE DC B0 60 00 03 0B 11 05 00 00 00 00 00 00 00 00 00 00 00 00 00 00 80 F8 FE 43 6A 80 74 8F C2 FF FE DC B0 60 00 00 A0'

Ingress:

Port                      : TwentyFiveGigE1/0/1

Global Port Number        : 1

Local Port Number         : 1

Asic Port Number          : 0

Asic Instance             : 0

Vlan                      : 10

Mapped Vlan ID            : 5

STP Instance              : 3

BlockForward              : 0

BlockLearn                : 0

L3 Interface              : 38

IPv4 Routing          : enabled

IPv6 Routing          : enabled

Vrf Id                : 0

Adjacency:

Station Index         : 172

Destination Index     : 21151

Rewrite Index         : 1

Replication Bit Map   : 0xa    ['localCpu', 'remoteCpu']

Decision:

Destination Index     : 21151  [DI_CPUQ_LOW_LATENCY]

Rewrite Index         : 1      [RI_CPU]

Dest Mod Index        : 0      [IGR_FIXED_DMI_NULL_VALUE]

CPU Map Index         : 0      [CMI_NULL]

Forwarding Mode       : 0      [Bridging]

Replication Bit Map   :        ['localCpu', 'remoteCpu']

Winner                :        CPPMAC LOOKUP2

Qos Label             : 65

SGT                   : 0

DGTID                 : 0

Egress:

Possible Replication      :

Port                  : CPU_Q_LOW_LATENCY <<< This should be the forwarding decision to this CPU queue. Any drops are unexpected and should be investigated.

Output Port Data          :

Port                    : CPU

Asic Instance         : 0

CPU Queue             :     27 [CPU_Q_LOW_LATENCY]

Unique RI             : 0

Rewrite Type          : 0      [Unknown]

Mapped Rewrite Type   : 17     [CPU_ENCAP]

Vlan                  : 10

Mapped Vlan ID        : 5

********************************************************************************

C9300-4c80#

执行Packet Tracer(PT)

Catalyst 9000上的PTP警告

Cisco Bug ID

标题思科漏洞ID

思科漏洞ID CSCvg24999

在ptp模式p2ptransparent上交换机崩溃。

思科漏洞ID CSCwf81913

PTP停止在Catalyst交换机上工作，端口进入未校准的状态。

思科漏洞ID CSCwa49052

PTP偏移和平均路径延迟可能滞留在故障交换机上，并且永远不会增加。思科漏洞ID

思科漏洞ID CSCvu73652

C9300 — 丢弃源端口不等于319的PTP事件消息。  Cisco Bug ID

思科漏洞ID CSCwc35946

在8275.1、802.1AS和默认PTP配置文件之间更改时，CLI选项不一致。

思科漏洞ID CSCwc00050

无法通过Web UI更改PTP模式

相关信息

- 思科技术支持和下载