目录

简介

先决条件

要求

使用的组件

概述

规则

分步过程

示例输出

相关信息

简介

本文档介绍如何在运行 Cisco IOS® 系统软件（版本低于 12.2(17)SX）的 Catalyst 6500 系列交换机（带有 Supervisor 720）上恢复口令。

12.2(17)SX之前的Cisco IOS软件版本的操作步骤不同的原因是Cisco Bug ID CSCec36997(仅限注册客户)(在sup720上恢复口令会导致交换机处理器(SP)崩溃。 当您的交换机遇到此Bug时，在进入RP ROMMON后，您大约有10秒的时间将配置寄存器更改为0x2142。在这10秒后，交换机将重新加载软件强制重新加载。但是，如果您在崩溃前将配置寄存器更改为此值，则此值将在重新加载后生效，并且您可以继续执行剩余过程。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档适用于运行版本低于 12.2(17)SX 的 Cisco IOS 软件且基于 Supervisor 720 的系统。如果您的Supervisor 720运行Cisco IOS软件版本12.2(17)SX或更高版本，请参阅运行Cisco IOS系统软件的Catalyst 6000/6500系列交换机的口令恢复程序文档。

概述

由于硬件不同，运行 Cisco IOS 的 Catalyst 6500/6000 的启动顺序与 Cisco 7200 系列路由器的启动顺序不同。在为机箱重新通电后，SP 将启动。大约 25-60 秒后，它将控制台所有权转交给路由处理器 (RP (MSFC))。 RP 继续加载捆绑的软件映像。请务必在 SP 将控制台控制权转交给 RP 之后立即按 Ctrl-Break。如果您太早发送中断序列，则您会进入 SP 的 ROMMON 模式，这不是您想要的模式。请在控制台上显示以下消息后发送中断序列：

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

在这之后，口令恢复过程与普通路由器一样。

注意：从此开始，运行Cisco IOS软件的Catalyst 6500系列交换机称为路由器。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

分步过程

由于交换机上运行 Cisco IOS 操作系统，因此交换机的配置方式与路由器相同。口令恢复过程的步骤与 Cisco 7200 系列路由器相同。不同之处是在开始发送中断序列之前，您必须多等待 25-60 秒。

1. 将终端或带终端仿真功能的 PC 连接到路由器的控制台端口。使用以下终端设置：

9600 baud rate

No parity

8 data bits

1 stop bit

No flow control

电缆规格文档中描述了所需的控制台电缆规格。有关如何连接到控制台端口的说明，请参阅模块安装指南。连接到控制台端口 - 仅 Supervisor 引擎部分提供了有用的信息。

2. 如果您仍需要访问路由器，请发送 show version 命令，并且记录配置寄存器设置。它通常为0x2102或0x102。单击此处查看show version命令的示例输出。

3. 如果您无法访问路由器（由于丢失登录口令或 TACACS 口令），则将配置寄存器设置为 0x2102 较安全。

4. 使用电源开关先关闭路由器电源，然后再将其打开。

5. 在 RP 获得控制台端口的控制权后，立即按终端键盘上的 Break。在运行 Cisco IOS 的 Catalyst 6500 上，SP 先启动。然后，它将控制权转交给 RP。在 RP 获得控制权后，启动中断序列。当显示此消息时，RP 已获得控制台端口的控制权。（在看见以下消息前，请不要发送中断顺序信号）：

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

由于Cisco Bug ID CSCec36997（仅限注册客户）（在sup720-native上恢复口令会导致SP崩溃），因此在交换机崩溃之前，您有大约10秒的时间完成步骤6。

如果中断序列不起作用，请参阅口令恢复过程中的标准break键序列组合，获取其他键组合。

6. 请在 rommon 1> 键入 confreg 0x2142，以便在不装载配置的情况下从闪存处引导。

7. 交换机因软件强制崩溃而崩溃：

rommon 1 >

00:00:41: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:41: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

*** System received a Software forced crash ***

signal= 0x17, code= 0x24, context= 0x4269f6f4

PC = 0x401370d8, Cause = 0x3020, Status Reg = 0x34008002

路由器重新启动。但是，由于配置寄存器设置为0x2142，因此它会忽略其保存的配置。如果您看到路由器配置仍然存在（仍旧是以前的主机名），则表明在崩溃之前配置寄存器未及时更改为0x2142。如果出现这种情况，请重新启动（步骤 4）。 如果配置寄存器已正确地更改为 0x2142，则重新加载后，会显示初始配置问题。

8. 在每个设置问题后面键入 no，或者按 Ctrl-C 跳过初始设置程序。

9. 在 Router>提示符处键入 enable。现在您处于启用模式，且显示了 Router# 提示符。

10. 发出 configure memory 或 copy start running 命令将非易失性 RAM (NVRAM) 复制到内存中，此操作很重要。请不要发出 configure terminal 命令。

11. 发出 write terminal 或 show running 命令。这些命令将显示路由器的配置。在此配置中，shutdown 命令显示在所有接口下面。这意味着所有接口当前已关闭。此外，口令都采用加密或未加密格式。

12. 发出 configure terminal 命令以进入全局配置模式并进行更改。当前的提示是 hostname(config)#。

13. 在全局配置模式下发出 enable secret < password > 以更改启用口令。

14. 发出 config-register 0x2102 命令或者在全局配置模式 (Router(config)#) 第 2 步记录的值，将配置值设置回最初值。

15. 更改所有虚拟终端口令（如果存在虚拟终端）：

Router(config)#line vty 0 4

Router(config-line)#password cisco

Router(config-line)#^Z

Router#

16. 在正常使用的每个接口上发出 no shutdown 命令。发出 show ip interface brief 命令查看接口及其当前状态的列表。您必须在启动模式 (Router#) 才能执行 show ip interface brief 命令。这里给出一个接口例子：

Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      172.17.10.10    YES TFTP   administratively down dow

Vlan10                     10.1.1.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES unset  administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet2/2         unassigned      YES TFTP   administratively down dow

FastEthernet3/1            172.16.84.110   YES TFTP   administratively down dow

<snip>...

Router#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)#interface fastEthernet 3/1

Router(config-if)#no shutdown

Router(config-if)#exit

Router(config)# <do other interfaces as necessary...>

17. 按下 Ctrl-z 离开配置模式。当前的提示 hostname#。

18. 发出 write memory 或 copy running startup 命令以提交更改。

示例输出

此处的示例显示一个实际口令恢复过程。本示例是在 Catalyst 6500 系列交换机上创建的。首先发出 show version 和 show module 命令查看本示例中使用的组件。

Press RETURN to get started.

sup720>enable

Password:

sup720#

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

sup720 uptime is 18 minutes

Time since sup720 switched to active is 17 minutes

System returned to ROM by power-on (SP by reload)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2102

sup720#

sup720#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   16  16 port GE RJ45                        WS-X6316-GE-TX     SAD04100A9R

2   48  48 port 10/100 mb RJ-45 ethernet       WS-X6248-RJ-45     SAD041402P9

4   16  SFM-capable 16 port 1000mb GBIC        WS-X6516A-GBIC     SAL0705CD7X

5    2  Supervisor Engine 720 (Active)         WS-SUP720-BASE     SAD070600MU

7   24  aCEF720 24 port 1000mb SFP             WS-X6724-SFP       SAD0725035Y

9   48  48-port 10/100 mb RJ45                 WS-X6148-RJ45V     SAL06282HGE

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  00d0.9738.702a to 00d0.9738.7039   0.202 5.3(1)       7.7(0.74)APP Ok

2  0001.9709.5c90 to 0001.9709.5cbf   1.2   5.1(1)CSX    7.7(0.74)APP Ok

4  0009.11f6.aa28 to 0009.11f6.aa37   1.0   7.2(1)       7.7(0.74)APP Ok

5  000c.3042.844c to 000c.3042.844f   1.0   7.7(1)       12.2(14)SX1  Ok

7  0030.f272.2666 to 0030.f272.267d   1.0   12.2(14r)S5  12.2(14)SX1  PwrDown

9  0009.127c.8d40 to 0009.127c.8d6f   1.0   5.4(2)       7.7(0.74)APP Ok

Mod Sub-Module                  Model              Serial        Hw     Status

--- --------------------------- ------------------ ------------ ------- -------

5 Policy Feature Card 3       WS-F6K-PFC3A       SAD070601DR   1.0    Ok

5 MSFC3 Daughterboard         WS-SUP720          SAD070500YF   1.0    Ok

7 unknown FRU type (major = 0 WS-F6700-CFC       SAD073201KC   1.0    PwrDown

9 Inline Power Module         WS-F6K-PWR                       1.0    Ok

Mod Online Diag Status

--- -------------------

1 Pass

2 Pass

4 Pass

5 Pass

7 Unknown

9 Pass

sup720#

sup720#

sup720#reload

Proceed with reload? [confirm]

!--- Here you turn off the power and then turn it back on. !--- Here it is done with a reload instead of a hard power-cycle.

*Sep 29 04:21:13: %SYS-5-RELOAD: Reload requested by console.

*Sep 29 04:21:16: %OIR-SP-6-CONSOLE: Changing console ownership to switch procer

*Sep 29 04:21:18: %SYS-SP-5-RELOAD: Reload requested

*Sep 29 04:21:18: %OIR-SP-6-CONSOLE: Changing console ownership to switch procer

***

*** --- SHUTDOWN NOW ---

***

!--- First, the switch processor comes up.

System Bootstrap, Version 7.7(1)

Copyright (c) 1994-2003 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 524288 Kbytes of main memory

Autoboot executing command: "boot disk0:s72033-ps-mz.122-14.SX1.bin"

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

Image text-base: 0x40020C10, data-base: 0x40B98000

00:00:03: %PFREDUN-6-ACTIVE: Initializing as ACTIVE processor

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

!--- The RP now has control of the console. !--- This is when you send the break sequence.

System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 2003 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 524288 Kbytes of main memory

Download Start

*** Mistral Interrupt on line 4 ***

System memory 1 bit ECC correctable error interrupt ..

PC = 0x8000841c, SP = 0x80007f00, RA = 0x80008488

Cause Reg = 0x00004400, Status Reg = 0x3041c003

rommon 1 >

!--- You are now in ROMMON mode on the RP. Continue the password !--- recovery procedure just as on any router. Changing the configuration !--- register from 0x2102 to 0x2142 causes the router to ignore the existing !--- configuration. It needs to be ignored because it has passwords that are not !--- known. Due to Cisco bug ID CSCec36997 : Password recovery on sup720-native leads to crash !--- on SP. You have about 10 seconds to change the configuration register to 0x2142. !--- After these 10 seconds, the SP crashes. If the config register is not changed !--- in time, start again.

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect.

rommon 2 >

!--- Without any intervention, the switch crashes in about 10 seconds !--- after you break into RP ROMMON.

00:00:31: %SYS-SP-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure co.

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %SYS-SP-2-INTSCHED: 't_idle' at level 7

-Process= "SCP Download Process", ipl= 7, pid= 57

-Traceback= 4013991C 401232B4 402827F4 40282994 40283010 405CB010 402A9858 4013C

00:00:31: %OIR-SP-6-CONSOLE: Changing console ownership to switch processor

*** System received a Software forced crash ***

signal= 0x17, code= 0x24, context= 0x4269f6f4

PC = 0x401370d8, Cause = 0x3020, Status Reg = 0x34008002

System Bootstrap, Version 7.7(1)

Copyright (c) 1994-2003 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 524288 Kbytes of main memory

Autoboot executing command: "boot disk0:s72033-ps-mz.122-14.SX1.bin"

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

Image text-base: 0x40020C10, data-base: 0x40B98000

00:00:03: %PFREDUN-6-ACTIVE: Initializing as ACTIVE processor

00:00:03: %OIR-6-CONSOLE: Changing console ownership to route processor

System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 2003 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 524288 Kbytes of main memory

Download Start

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Download Completed! Booting the image.

Self decompressing the image : ################################################]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

1 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: n

!--- The router ignores the saved configuration and enters !--- the initial configuration mode.

Press RETURN to get started!

00:00:03: %SYS-3-LOGGER_FLUSHED: System was paused for 00:00:00 to ensure conso.

00:00:46: curr is 0x10000

00:00:46: RP: Currently running ROMMON from F1 region

00:01:00: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

00:01:00: %SNMP-5-COLDSTART: SNMP agent on host Router is undergoing a cold stat

00:01:00: %SYS-6

Router>-BOOTTIME: Time taken to reboot after reload = 1807 seconds

Firmware compiled 19-May-03 10:54 by integ Build [100]

00:00:54: %SPANTREE-SP-5-EXTENDED_SYSID: Extended SysId enabled for type vlan

00:00:54: SP: SP: Currently running ROMMON from F1 region

00:01:00: %SYS-SP-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) s72033_sp Software (s72033_sp-SP-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:48 by ccai

00:01:01: %OIR-SP-6-INSPS: Power supply inserted in slot 1

00:01:01: %C6KPWR-SP-4-PSOK: power supply 1 turned on.

00:01:01: %OIR-SP-6-INSPS: Power supply inserted in slot 2

00:01:01: %C6KPWR-SP-4-PSOK: power supply 2 turned on.

00:01:01: %C6KPWR-SP-4-PSREDUNDANTBOTHSUPPLY: in power-redundancy mode, system .

00:01:05: %FABRIC-SP-5-FABRIC_MODULE_ACTIVE: the switching fabric module in sloe

00:01:06: %DIAG-SP-6-RUN_MINIMUM: Module 5: Running Minimum Diagnostics...

Router>

Router>

00:01:18: %DIAG-SP-6-DIAG_OK: Module 5: Passed Online Diagnostics

00:01:18: %OIR-SP-6-INSCARD: Card inserted in slot 5, interfaces are now online

00:01:21: %DIAG-SP-6-RUN_MINIMUM: Module 4: Running Minimum Diagnostics...

Router>

Router>

Router>

00:01:36: %DIAG-SP-6-RUN_MINIMUM: Module 9: Running Minimum Diagnostics...

Router>

Router>

00:01:42: %DIAG-SP-6-RUN_MINIMUM: Module 1: Running Minimum Diagnostics...

00:01:44: %DIAG-SP-6-DIAG_OK: Module 4: Passed Online Diagnostics

00:01:45: %OIR-SP-6-INSCARD: Card inserted in slot 4, interfaces are now online

00:01:54: %DIAG-SP-6-DIAG_OK: Module 9: Passed Online Diagnostics

00:01:54: %OIR-SP-6-INSCARD: Card inserted in slot 9, interfaces are now online

00:01:57: %DIAG-SP-6-DIAG_OK: Module 1: Passed Online Diagnostics

00:01:57: %OIR-SP-6-INSCARD: Card inserted in slot 1, interfaces are now online

00:02:06: %DIAG-SP-6-RUN_MINIMUM: Module 2: Running Minimum Diagnostics...

00:02:15: %DIAG-SP-6-DIAG_OK: Module 2: Passed Online Diagnostics

00:02:15: %OIR-SP-6-INSCARD: Card inserted in slot 2, interfaces are now online

Router>

Router>enable

Router#

!--- You go right into privilege mode without needing a password. !--- At this point, the configuration running-config is a default configuration !--- with all the ports administratively down (shutdown).

Router#copy startup-config running-config

Destination filename [running-config]? <press enter>

!--- This pulls in your original configuration. Since you are already in privilege !--- mode, the passwords in this configuration (that are not known) do not affect you.

4864 bytes copied in 2.48 secs (2432 bytes/sec)

sup720#

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!--- Overwrite the password that you do not know. This is your new enable password.

sup720#show ip interface brief

Interface                  IP-Address      OK? Method Status                Prol

Vlan1                      10.48.72.142    YES TFTP   administratively down dow

Vlan500                    10.1.1.1        YES TFTP   administratively down dow

Vlan501                    10.2.2.1        YES TFTP   administratively down dow

GigabitEthernet1/1         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/2         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/3         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/4         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/5         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/6         unassigned      YES TFTP   administratively down dow

GigabitEthernet1/7         unassigned      YES TFTP   administratively down dow

<snip>...

!--- Issue the no shut command on all interfaces that you want to bring up.

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#interface gig 1/1

sup720(config-if)#no shut

sup720(config-if)#^Z

sup720#

!--- Overwrite the virtual terminal passwords.

sup720#configure terminal

sup720(config)#line vty 0 4

sup720(config-line)#password XXX

sup720(config-line)#^Z

sup720#

!--- Restore the configuration register to its normal state !--- so that it no longer ignores the stored configuration file.

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

sup720 uptime is 4 minutes

Time since sup720 switched to active is 4 minutes

System returned to ROM by power-on (SP by error - a Software forced crash, PC 0)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2142

sup720#

sup720#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

sup720(config)#config-register 0x2102

sup720(config)#

!--- Verify that the configuration register is changed for the next reload.

sup720#show version

Cisco Internetwork Operating System Software

IOS (tm) s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Tue 27-May-03 20:40 by ccai

Image text-base: 0x40008C10, data-base: 0x41ACE000

ROM: System Bootstrap, Version 12.2(14r)S9, RELEASE SOFTWARE (fc1)

BOOTLDR: s72033_rp Software (s72033_rp-PS-M), Version 12.2(14)SX1, EARLY DEPLOY

sup720 uptime is 4 minutes

Time since sup720 switched to active is 4 minutes

System returned to ROM by power-on (SP by error - a Software forced crash, PC 0)

System image file is "disk0:s72033-ps-mz.122-14.SX1.bin"

cisco Catalyst 6000 (R7000) processor with 458752K/65536K bytes of memory.

Processor board ID

SR71000 CPU at 600Mhz, Implementation 0x504, Rev 1.2, 512KB L2 Cache

Last reset from power-on

X.25 software, Version 3.0.0.

Bridging software.

3 Virtual Ethernet/IEEE 802.3  interface(s)

96 FastEthernet/IEEE 802.3 interface(s)

58 Gigabit Ethernet/IEEE 802.3 interface(s)

1917K bytes of non-volatile configuration memory.

8192K bytes of packet buffer memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2142 (will be 0x2102 at next reload)

sup720#

sup720#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

sup720#

!--- Optional: If you want to test that the router operates properly and that you have changed the passwords, !--- reload and test.

sup720#reload

Proceed with reload? [confirm]

相关信息

- LAN 产品支持页

- LAN 交换技术支持页

- 技术支持 - Cisco Systems