目录

简介

要求

初始配置

重新编号堆叠成员

步骤 1：构建更新的配置

旧配置

新建配置

步骤 2：断开堆栈

启动日志

步骤 3：重新编号堆栈成员

步骤 4：应用新配置

步骤 5：重新连接堆栈

相关信息

简介

本文档提供了在部署6800IA并投入生产后对交换矩阵扩展器(FEX)堆栈成员重新编号的建议步骤。本文档适用于所有6800IA部署，而与运行Cisco IOS® 15.1(2)SY软件版本的父交换机平台Catalyst 6500、Catalyst 6807或Catalyst 6880无关。

对于运行Cisco IOS 15.x SY软件版本的设备，请参阅Cisco IOS 15.2SY — 即时接入 — 重新编号FEX交换机ID。Cisco IOS 15.1(2)SY6、15.2(1)SY1或更高版本支持此功能。

要求

请注意，重新编号流程将在以下方面造成停机：

- 控制台访问将重新编号成员的堆栈。

- 在重新编号过程中通过SSH/控制台访问父交换机。

初始配置

如下图所示，运行Cisco IOS软件版本15.2(1)SY1的带Sup2T的Catalyst 6500是父交换机，FEX 101是将重新编号的堆叠。

6500-FEX#remote command fex 101 show switch

Switch/Stack Mac Address : f078.16ed.af00

H/W   Current

Switch#  Role   Mac Address     Priority Version  State

----------------------------------------------------------

*1       Master f078.16ed.af00     1      4       Ready   <=master based on the MAC address

2       Member f078.16ed.bc00     1      4       Ready

3       Member f078.16ed.d780     1      4       Ready

在此，交换机将重新编号为：

- 交换机3 —>交换机1

- 交换机1 —>交换机2

- 交换机2 —>交换机3

请注意，堆栈成员的控制台端口不显示任何内容，并且不会做出响应。

重新编号堆叠成员

如果讨论的堆栈不在生产中，请执行步骤2、3和5。

如果堆栈正在生产中，且需要保留所有配置，请执行所有步骤。

步骤 1：构建更新的配置

在图中，路由器连接到接口2/0/5,VoIP电话连接到接口3/0/5。一旦交换机重新编号（3到1、1到2和2到3），这些连接将分别在3/0/5和1/0/5上。当堆栈重新连接到父交换机时，它会根据交换机编号将配置的最新版本推送到端口。换句话说，3/0/5将配置连接到路由器的端口。

在开始重新编号过程之前，必须先更新配置版本，以减少停机时间。

旧配置

!

interface GigabitEthernet101/2/0/5

description ToRouterA

switchport switchport trunk allowed vlan 1-100

switchport mode trunk

!

interface GigabitEthernet101/3/0/5

description Phone-3F295

switchport switchport trunk allowed vlan 5,15

switchport trunk native vlan 5

switchport mode trunk

新建配置

!

interface GigabitEthernet101/3/0/5

description ToRouterA

switchport switchport trunk allowed vlan 1-100

switchport mode trunk

!

interface GigabitEthernet101/1/0/5

description Phone-3F295

switchport switchport trunk allowed vlan 5,15

switchport trunk native vlan 5

switchport mode trunk

无需更新上行链路端口通道配置，因为即时接入控制平面协议(如卫星发现协议(SDP))会自动更新该配置。

步骤 2：断开堆栈

断开上行链路端口（父交换机或堆栈端）或关闭父交换机的端口。在本例中，上行链路端口关闭。

6500-FEX(config)#int te1/2/5

6500-FEX(config-if)#shut

6500-FEX(config)#int te2/2/5

6500-FEX(config-if)#shut

6500-FEX#show etherchannel 101 summary

<snip>

------+-------------+-----------+--------------------------

101    Po101(SD)        -        Te1/2/5(D)     Te2/2/5(D)

6500-FEX#remote comm fex 101 show etherchannel summ

<snip>

------+-------------+-----------+--------------------------

1      Po1(SU)          -        Te1/0/1(P)  Te3/0/1(P)

当所有上行链路端口关闭时，FEX101中的所有堆叠成员都将重新加载。

启动日志

CPU rev: BImage passed digital signature verificationBoard rev: 5Testing DataBus

...Testing AddressBus...

Loading "flash:/c6800ia-universalk9-mz.152-3m.E1.bin"...Verifying image

flash:/c6800ia-universalk9mz.152-3m.E1.bin.........

Press RETURN to get started!

FEX-0>

FEX-0>

FEX-0>

FEX-0>

此时，所有主机端口(例如，如图所示的Gig101/1/0/5和Gig101/2/0/5)应该管理性关闭。

步骤 3：重新编号堆栈成员

6800IA交换机仍作为堆叠捆绑在一起（未断开堆叠电缆连接）。 如果需要重新堆叠它们，则建议关闭所有客户端，取消/重新连接堆叠电缆并打开它们。

FEX-0(config)#switch 3 renumber 1

WARNING: Changing the switch number may result in a configuration change for that switch.

The interface configuration associated with the old switch number will remain as

a provisioned configuration.

Do you want to continue?[confirm]               <<=== <enter>

Changing Switch Number 3 to Switch Number 1

New Switch Number will be effective after next reboot

FEX-0(config)#switch 1 renumber 2

WARNING: Changing the switch number may result in a configuration change for that switch.

The interface configuration associated with the old switch number will remain as

a provisioned configuration.

Do you want to continue?[confirm]              <<=== <enter>

Changing Switch Number 1 to Switch Number 2

New Switch Number will be effective after next reboot

FEX-0(config)#switch 2 renumber 3

WARNING: Changing the switch number may result in a configuration change for that switch.

The interface configuration associated with the old switchnumber will remain as

a provisioned configuration.

Do you want to continue?[confirm]              <<=== <enter>

Changing Switch Number 1 to Switch Number 2

New Switch Number will be effective after next reboot

步骤 4：应用新配置

即使FEX堆栈已断开，父交换机仍应具有以下配置：

6500-FEX#sh run | beg provision

<snip>

module provision fex 101

slot 1 slot-type 357 port-type 61 number 48  virtual-slot 50

slot 2 slot-type 357 port-type 61 number 48  virtual-slot 51

slot 3 slot-type 357 port-type 61 number 48  virtual-slot 53

<snip>

在FEX 101的父交换机中应用新配置。

!

interface GigabitEthernet101/3/0/5

descrition ToRouterA

switchport switchport trunk allowed vlan 1-100

switchport mode trunk

!

interface GigabitEthernet101/1/0/5

description Phone-3F295

switchport switchport trunk allowed vlan 5,15

switchport trunk native vlan 5

switchport mode trunk

!

步骤 5：重新连接堆栈

通过启用port-channel 101重新连接堆栈。

6500-FEX(config)#int te1/2/5

6500-FEX(config-if)#no shut

6500-FEX(config)#int te2/2/5

6500-FEX(config-if)#no shut

6800IA控制台日志：

FEX-0>

%LINK-3-UPDOWN: Interface TenGigabitEthernet2/0/2, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface TenGigabitEthernet2/0/2,

changed state to up

%LINK-3-UPDOWN: Interface Port-channel1, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed state to up

%LINK-3-UPDOWN: Interface TenGigabitEthernet1/0/1, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface TenGigabitEthernet1/0/1,

changed state to up

FEX-101>

FEX-101>

6500-FEX#remote command fex 101 show switch

Switch/Stack Mac Address : f078.16ed.af00

H/W   Current

Switch#  Role   Mac Address     Priority Version  State

----------------------------------------------------------

1       Member f078.16ed.d780     1      4       Ready

*2       Master f078.16ed.af00     1      4       Ready <= master based on the MAC address

3       Member f078.16ed.bc00     1      4       Ready

如上所示，堆叠成员将重新编号（将此处报告的MAC地址与“初始配置”部分中给出的MAC地址进行比较）。

6500-FEX#show etherchannel 101 summary

<snip>

------+-------------+-----------+--------------------------

101    Po101(SU)        -        Te1/2/5(P)     Te2/2/5(P)

6500-FEX#remote comm fex 101 show etherchannel summ

<snip>

------+-------------+-----------+--------------------------

1      Po1(SU)          -        Te1/0/1(P)    Te2/0/1(P)

相关信息

- Cisco Catalyst即时接入解决方案白皮书

- 如何配置即时接入(PDF)

- Catalyst 6800IA交换机硬件安装指南

- 技术支持和文档 - Cisco Systems