目录

简介

先决条件

要求

使用的组件

升级 程序

初始设置

升级步骤

验证

简介

本文档介绍在虚拟交换系统(VSS)模式下使用Supervisor 2T和双宿主Cisco Catalyst 6800即时接入交换机(FEX)的Cisco Catalyst 6500系列交换机上的分步服务中软件升级(ISSU)过程。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于VSS模式下运行Supervisor引擎2T的Cisco Catalyst 6500系列交换机，该引擎在WS-X6904-40G线卡上连接了双宿主6800IA。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

升级 程序

初始设置

升级过程针对Cisco IOS®软件版本15.1(2)SY到版本15.1(2)SY1执行。

以下是ISSU流程之前的统计信息：

- 交换机ID为1的Catalyst 6500机箱处于活动状态，ID为2的交换机处于备用（热）状态。

- 两个机箱在Cisco IOS软件版本15.1(2)SY上都处于打开状态。

- 运行Cisco IOS软件版本15.0(2)EX2的单个6800IA通过双宿连接连接到WS-X6904-40G线卡上的VSS。FEX端口通道号为99,FEX ID为110。

6K1#show mod sw all

Switch Number:     1   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY    Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY    Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX2   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Active

Peer switch number           : 2

Peer switch operational role : Virtual Switch Standby

升级步骤

1. 确保新的Cisco IOS映像(Cisco IOS软件版本15.1(2)SY1)存在于bootdisk和slavebootdisk中。

6K1#dir bootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:35:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:42:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

6K1#dir slavebootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:26:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:46:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

2. （可选）使用以下命令以验证VSS是否已准备好运行升级过程：

- show issu state detail

- show redundancy

- show module switch all

- 6K1#show issu state detail

系统被配置为以交错模式升级。

发现两个管理引擎节点在线。

摘要:系统将以串联模式升级。

Slot = 1/2

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_INIT

6K1#

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 36 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 1/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 2/2

Current Software state = STANDBY HOT

Uptime in current state = 34 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

3. 使用issu loadversion命令启动升级过程。

在此步骤中，VSS备用机箱将重新启动，使用新映像重新加载，并在SSO冗余模式下初始化为VSS备用机箱，运行新映像。如批量同步成功消息所示，当机箱配置同步时，此步骤即完成。加载新映像和VSS备用机箱转换到SSO模式可能需要几秒钟到几分钟。

6K1#issu loadversion 1/2 bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

2/2 slavebootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

System configuration has been modified. Save? [yes/no]: yes

Building configuration...

[OK]

%issu loadversion initiated successfully, upgrade sequence will begin shortly

6K1#

*Feb 11 05:24:40.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence

will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Feb 11 05:25:10.091: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

<..output truncated..>

*Feb 11 05:29:46.075: %VS_GENERIC-SW1-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 05:29:46.079: %HA_CONFIG_SYNC-SW1-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:29:46.079: %RF-SW1-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:30:25.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed.

Please issue the 'issu runversion' command after all modules come online.

!

! Boot variable for standby should point to new Image in "show issu state detail" output.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 1/2

RP State = Active

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show redundancy states

my state = 13 -ACTIVE

peer state = 8  -STANDBY HOT

Mode = Duplex

Unit = Secondary

Unit ID = 18

Redundancy Mode (Operational) = sso

Redundancy Mode (Configured)  = sso

Redundancy State              = sso

Maintenance Mode = Disabled

Manual Swact = enabled

Communications = Up

client count = 144

client_notification_TMR = 30000 milliseconds

keep_alive TMR = 9000 milliseconds

keep_alive count = 1

keep_alive threshold = 19

RF debug mask = 0x0

4. 当VSS备用机箱在SSO冗余状态下成功运行新映像，并且VSS备用机箱上的所有线卡都处于启用状态且处于联机状态时，请输入issu runversion命令以强制进行切换。升级后的VSS备用机箱将作为运行新映像的新活动机箱接管。以前的活动机箱在SSO模式下重新加载并初始化为新的VSS备用机箱，运行旧映像（在需要中止软件升级并恢复旧映像的情况下）。 如批量同步成功消息所示，当机箱配置同步时，此步骤即完成。

6K1#issu运行版本

此命令将重新加载主用设备。

Proceed ? [confirm]

%issu runversion initiated successfully

*Feb 11 05:35:19.035: %RF-SW1-5-RF_RELOAD: Self reload. Reason: Admin ISSU

runversion CLI

<..output truncated..>

Feb 11 05:35:21.411: %SYS-SW1-5-SWITCHOVER: Switchover requested by Exec.

Reload Reason: Admin ISSU runversion CLI.

Resetting .......

!

!Standby chassis now becomes active. Below logs are from new active switch.

!

Initializing as Virtual Switch ACTIVE processor

.

.

*Feb 11 05:37:36.107: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 05:39:56.563: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:39:56.563: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:39:56.555: %PFREDUN-SW1_STBY-6-STANDBY: Ready for SSO mode in Default Domain

! Wait till all the modules and Fex Port-channel 99 links come up

!

*Feb 11 05:41:28.467: %ISSU_PROCESS-SW2-6-RUNVERSION_INFO: Runversion has completed.

Please issue the 'issu acceptversion' command

Feb 11 05:43:13.034: %LINK-3-UPDOWN: Interface TenGigabitEthernet1/0/2, changed

state to up (FEX-110)

Feb 11 05:43:14.033: %LINEPROTO-5-UPDOWN: Line protocol on Interface

TenGigabitEthernet1/0/2, changed state to up (FEX-110)

*Feb 11 05:43:14.491: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te1/3/5,

connected to FEX 110, uplink 52

*Feb 11 05:43:14.491: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group 99

is now dual-active detection capable

6K1#show issu state

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show fex 110 detail

FEX: 110        Description: FEX0110     state: online

FEX version: 15.0(2)EX2

Extender Model: C6800IA-48TD, Extender Serial: FOC1736W1A6

FCP ready: yes

Image Version Check: enforced

Fabric Portchannel Ports: 2

Fabric port for control traffic: Te2/3/5

Fabric interface state:

Po99       - Interface Up.

Te1/3/5    - Interface Up.      state: bound

Te2/3/5    - Interface Up.      state: bound

5. 使用issu acceptversion命令可停止回滚计时器。这是必需的，因为如果计时器过期，升级的机箱将重新加载并恢复到以前的软件版本。

6K1#issu acceptversion

% Rollback timer stopped. Please issue the 'issu commitversion' command.

6. 使用issu runversion fex all命令以在FEX(6800IA)上启动映像下载和升级过程。 FEX会触发从Supervisor2T的新软件捆绑包(此处为Cisco IOS软件版本15.2(2)SY1)下载映像。 如果使用FEX堆栈，则主设备负责将图像提取到其成员。TFTP服务器运行于192.1.1.1。

6K1#issu runversion fex all

% Successfully initiated 'runversion fex' for Fex IDs: 110.

Use 'show issu state' for more information.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;bootdisk:

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_IN_PROGRESS

Following are the logs on from FEX 6800IA console:

!

!192.1.1.1 is the tftp running on FEX controller i.e. VSS active and vlan 1012 is the

control vlan associated with fex.

!

FEX-110#

Loading c6800ia-universalk9-mz.150-2.EX4.bin from 192.1.1.1

(via Vlan1012):  !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 15493122 bytes]

examining image...

extracting info (112 bytes)

extracting c6800ia-universalk9-mz.150-2.EX4/info (792 bytes)

extracting info (112 bytes)

Stacking Version Number: 1.55

System Type:             0x00000000

Ios Image File Size:   0x00EB5200

Total Image File Size: 0x00EC6A00

Minimum Dram required: 0x08000000

Image Suffix:          universalk9-150-2.EX4

Image Directory:       c6800ia-universalk9-mz.150-2.EX4

Image Name:            c6800ia-universalk9-mz.150-2.EX4.bin

Image Feature:         IP|LAYER_2|SSH|3DES|MIN_DRAM_MEG=128

FRU Module Version:    No FRU Version Specified

Old image for switch 1: flash:/c6800ia-universalk9-mz.150-2.EX2

Old image will be left alone

Extracting images from archive into flash...

! The console will be waiting for about 5-10 minutes after the above line.

<output truncated>

New software image installed in flash:/c6800ia-universalk9-mz.150-2.EX4

Following are the logs from the 6500 Active supervisor:

*Feb 11 06:00:30.387: %SATMGR-SW2-5-ONLINE: FEX 110 online

*Feb 11 06:00:30.391: %SATMGR-SW2-5-FEX_MODULE_ONLINE: FEX 110, module 1 online

*Feb 11 06:00:30.395: %OIR-SW2-6-INSREM: Switch 110 Physical Slot 1 - Module

Type LINE_CARD  inserted

*Feb 11 06:00:30.951: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te2/3/5,

connected to FEX 110, uplink 51

*Feb 11 06:00:30.951: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group

99 is now dual-active detection capable

*Feb 11 06:01:00.983: %OIR-SW2-6-SP_INSCARD: Card inserted in Switch_number =

110, physical slot 1, interfaces are now online

FEX-110#show ver | in image

System image file is "flash:/c6800ia-universalk9-mz.150-2.EX4/

c6800ia-universalk9-mz.150-2.EX4.bin"

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

7. 要继续，请输入issu commitversion命令以升级VSS备用机箱并完成ISSU序列。VSS备用机箱将重新启动，使用新映像重新加载，并在运行新映像时初始化为处于SSO冗余状态的VSS备用机箱。如Bulk sync succeeded消息所示，当机箱配置同步且新VSS-Standby上的所有线卡都处于启用状态并处于联机状态时，此步骤即完成。

6K1#issu commitversion

%issu commitversion initiated successfully, upgrade sequence will continue shortly

6K1#

*Feb 11 06:05:30.839: %ISSU_PROCESS-SW2-3-COMMITVERSION: issu commitversion;

Commitversion sequence will begin in 60 seconds. Enter 'issu abortversion'

to cancel.

*Feb 11 06:06:00.839: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO:

Resetting Standby shortly

*Feb 11 06:08:48.571: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 06:09:01.163: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has

come online, wait for terminal state

.

.

*Feb 11 06:10:41.267: %VS_GENERIC-SW2-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 06:10:41.271: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED:

Bulk Sync succeeded

*Feb 11 06:10:41.271: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 06:10:46.403: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Upgrade has completed,

updating boot configuration

!

!Boot variable now displays both new and old image in ?show issu state detail? output.

!

6K1#show issu state detail

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 hour, 28 minutes

Switchovers system experienced = 1

Standby failures = 1

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M), Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/2

Current Software state = STANDBY HOT

Uptime in current state = 1 minute

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

验证

要验证升级是否成功，请使用以下命令：

- show issu state detail

- show redundancy

- show module switch all

以下是ISSU进程后的当前状态：

- 交换机ID为2的6500机箱处于活动状态，而ID为1的交换机处于备用（热）状态。 它们现在位于Cisco IOS软件版本15.1(2)SY1上。

- 即时接入客户端(6800IA)现在运行Cisco IOS软件版本15.0(2)EX4。

6K1#show mod swi all

Switch Number:     1   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY1   Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY1   Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX4   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Active

Peer switch number           : 1

Peer switch operational role : Virtual Switch Standby