目录

简介

先决条件

要求

使用的组件

规则

CatOS 和 Cisco IOS 系统软件之间的区别

Catalyst 6500/6000 CatOS 和 Cisco IOS 软件映像

了解 CatOS 和 Cisco IOS 软件的软件映像命名规则

CatOS 和 Cisco IOS 软件之间的默认系统区别

了解 Cisco IOS 系统软件中的接口

Cisco IOS 软件中的接口（端口）模式

配置 L2 以太网接口

端口配置和状态 CatOS/Cisco IOS 命令表

了解 Cisco IOS 软件中 range 命令的使用

Cisco IOS 软件配置

在 Cisco IOS 软件中配置中继

在 Cisco IOS 软件中配置 EtherChannels

在 Cisco IOS 软件中配置 VLAN

在 Cisco IOS 软件中配置 VTP

CatOS/Cisco IOS 软件命令表

相关信息

简介

Catalyst OS (CatOS) 的用户可通过本文档熟悉 Cisco IOS® 系统软件使用的第 2 层 (L2) 配置。本文档涉及 CatOS 和 Cisco IOS 软件的命令和概念（例如端口/接口、中继、信道、VLAN 和虚拟中继协议 (VTP)）之间的相似性和差异。 对于最常见的命令，本文档提供了 CatOS/Cisco IOS 软件命令表，可供快速参考。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

CatOS 和 Cisco IOS 系统软件之间的区别

Supervisor 引擎上的 CatOS 与 MSFC 上的 Cisco IOS 软件（混合）：可将 CatOS 映像用作系统软件，在 Catalyst 6500/6000 交换机上运行 Supervisor 引擎。如果安装了可选的 MSFC，则将使用单独的 Cisco IOS 软件映像来运行 MSFC。

Supervisor 引擎和 MSFC 上的 Cisco IOS 软件（本地）：可将单个 Cisco IOS 软件映像用作系统软件，在 Catalyst 6500/6000 交换机上同时运行 Supervisor 引擎和 MSFC。

注：有关详细信息，请参阅文档Cisco Catalyst 6500系列交换机的Cisco Catalyst和Cisco IOS操作系统比较。

Catalyst 6500/6000 CatOS 和 Cisco IOS 软件映像

Catalyst 6500/6000 交换机可选择运行两种软件中的一种。

CatOS:此实施在逻辑上等同于带路由交换模块 (RSM) 的 Catalyst 5500/5000 系列交换机。 在 CatOS 模式下运行时，存在两个独立的软件映像。MSFC 运行传统的 Cisco IOS 软件映像，而 Supervisor 引擎运行传统的 CatOS。每个设备均有自己的配置文件。

Cisco IOS 软件：此实施提供单个“类似于路由器”的接口。路由器（名为路由处理器 [RP]）和交换机 Supervisor 引擎（名为交换机处理器 [SP]）之间的区分对于用户而言显而易见。存在单个控制台连接、配置文件和软件映像。

注意：您始终需要MSFC1引导映像，以允许MSFC1正确加载。引导映像对于硬件支持必不可少，并且引导映像可在紧急恢复情况下提供备份。实际上，软件映像会加载路由器发挥全部功能所需的软件。

除 MSFC 以外，Policy Feature Card (PFC) 也是必要的。

了解 CatOS 和 Cisco IOS 软件的软件映像命名规则

在 CatOS 中，交换机 Supervisor 引擎和 MSFC 运行独立的软件映像。

对于 Supervisor 引擎，有两种不同的映像类型：一种用于 Supervisor 引擎 Is，另一种用于 Supervisor 引擎 IIs。cat6000-sup 前缀之后的数字表示映像的差异。

如果 2 在 cat6000-sup 前缀之后，则映像用于 Catalyst Supervisor 引擎 II。如果720在cat6000-sup前缀之后，则映像用于Catalyst Supervisor引擎720。如果2和720都不在cat6000-sup前缀后，则映像用于Catalyst Supervisor引擎I。例如，名为“cat6000-sup.6-2-3.bin”的文件用于Supervisor引擎I。名为“cat6000-sup2.6-2-3.bin”的文件用于Supervisor引擎II。要下载这些映像，请参阅软件下载 - Catalyst 6500/6000 CatOS 系统软件（仅限注册用户）。

当您在 MSFC1、MSFC2、或 MSFC3 上运行装有 Cisco IOS 软件的 CatOS 时，每种类型的 MSFC 都会运行自己的独立映像。软件下载区（仅限注册用户）现在已合并这些映像。要下载 MSFC1、MSFC2 或 MSFC3 的映像，请转至 Cisco 软件下载页。

Cisco IOS 系统软件运行适用于 Supervisor 引擎和 MSFC 子卡的合并软件映像。对于用户，仅将一种映像加载到闪存中。Supervisor 引擎和 MSFC 安装类型对每个映像进行了分类。软件下载区（仅限注册用户）中的映像类别有：

- Supervisor 引擎 720/MSFC3 (CAT6000-SUP720/MSFC3)

- Supervisor 引擎 2/MSFC2 (CAT6000-SUP2/MSFC2)

- Supervisor 引擎 1/MSFC2 (CAT6000-SUP1/MSFC2)

- Supervisor 引擎 1/MSFC1 (CAT6000-SUP1/MSFC1)

要下载 Cisco IOS 系统软件映像，请参阅软件下载 - Catalyst 6500/6000 Cisco IOS 系统软件（仅限注册用户）。

注意：Supervisor引擎II必须使用MSFC2子卡；Supervisor 引擎 II 不能使用原始 MSFC 子卡。

要确定当前运行的是哪个映像，请发出 show version 命令。

注意：在混合模式下，请在各模块上发出 show version 命令以确定当前运行的映像。

例如，此处的 show version 命令指示某台具有 MSFC2 的 Catalyst 6500 在 Supervisor 引擎上运行 CatOS，并在 MSFC 上运行 Cisco IOS 软件。

Hybrid_Cat6500>(enable) show version

WS-C6509 Software, Version NmpSW: 7.6(4)

Copyright (c) 1995-2003 by Cisco Systems

NMP S/W compiled on Nov  4 2003, 19:22:09

System Bootstrap Version: 5.3(1)

System Boot Image File is 'bootflash:cat6000-supk8.7-6-4.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA043500S2

PS1  Module: WS-CAC-1300W    Serial #: SON04340836

PS2  Module: WS-CAC-1300W    Serial #: SNI05470791

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

1   2    WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Fw : 5.3(2)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Sw :

2   2    WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Fw : 5.3(1)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Sw :

3   48   WS-X6148-GE-TX      SAD0746052K Hw : 4.0

Fw : 7.2(1)

Sw : 7.6(4)

4   48   WS-X6248-RJ-45      SAD04281CZY Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

5   48   WS-X6248-RJ-45      SAD042608NZ Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

6   48   WS-X6248-RJ-45      SAD04170CG9 Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

7   48   WS-X6248-RJ-45      SAD04270N9U Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

15  1    WS-F6K-MSFC2        SAD04520C65 Hw : 1.7

Fw : 12.1(19)E1

Sw : 12.1(19)E1

16  1    WS-F6K-MSFC2        SAL0548F2TE Hw : 2.0

Fw : 12.1(19)E1

Sw : 12.1(19)E1

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

2      130944K  50017K  80927K  16384K  10857K   5527K  512K  389K  123K

Uptime is 142 days, 4 hours, 27 minutes

CatOS 和 Cisco IOS 软件之间的默认系统区别

功能

CatOS

Cisco IOS 软件

配置文件

两个配置文件：一个用于Supervisor引擎(NMP^1)，一个用于MSFC

一个配置文件

软件映像

两个映像：一个用于 Supervisor 引擎，另一个用于 MSFC

一个软件映像；要正确加载 MSFC 还需要 MSFC 引导映像

默认端口模式

所有端口均为 L2 交换端口

每个端口都是L32路由端口（接口）

默认端口状态

所有端口均启用

所有端口（接口）均为关闭状态

配置命令格式

命令关键字 set 在每个配置命令之前

包含 global- 和 interface-level 命令的 Cisco IOS 命令结构

配置模式

无配置模式（set、clear 和 show 命令）

configure terminal 命令和 VLAN 数据库激活配置模式

删除/更改配置

通过使用 clear、set 和/或 enable/disable 命令

与 Cisco IOS 命令结构相同；关键字 no 否定命令

1 NMP =网络管理处理器

2 L3 =第3层

了解 Cisco IOS 系统软件中的接口

Cisco IOS 软件中的接口（端口）模式

您可以将 Cisco IOS 软件中的端口称为接口。Cisco IOS 软件中有两种接口模式：

- L3 路由接口

- L2 交换机接口

注意：默认为L3路由接口。

配置 L2 以太网接口

要使某个端口/接口成为 L2 交换机接口，请在接口下添加 switchport 命令，如本示例所示：

Cat6500# show running-config interface fastethernet 5/10

Building configuration...

Current configuration:

!

interface FastEthernet5/10

no ip address

switchport

end

L2 交换机端口的默认接口配置与 CatOS 中的配置不同。例如，当端口采用 L2 端口配置时，中继模式为 desirable 而不是 auto。show interface interface switchport 命令提供了 L2 交换机端口当前配置的详细信息。示例如下：

Cat6500# show interfaces fastethernet 5/10 switchport

Name: Fa5/10

Switchport: Enabled

Administrative Mode: dynamic desirable

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 ( default)

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Cisco IOS 软件中有三个主要的 L2 交换机端口模式：

- 接入:将接口设置为非中继模式。

- 动态:将接口设置为动态协商接入或中继模式。此设置的两个选项是：

- 期望:如果相邻设备在 desirable 或 auto 模式下采用中继配置，则此配置允许端口成为中继。当端口采用交换机端口配置时，Desirable 模式是默认模式。

- 自动:如果另一台相邻设备在 desirable 模式下采用中继配置，则此配置允许端口成为中继。

- 中继:将接口设置为永久中继模式。

端口配置和状态 CatOS/Cisco IOS 命令表

功能

CatOS

启用 PortFast

CatOS (enable) set spantree portfast 4/1 enable

Warning: Spantree port fast start should only

be enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/1 fast start enabled.

配置主机访问的端口。此命令启用 PortFast 并禁用 CatOS 中的中继和信道。

CatOS (enable) set port host 4/2

Port(s) 4/2 channel mode set to off.

Warning: Spantree port fast start should only be

enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/2 fast start enabled.

Port(s) 4/2 trunk mode set to off.

CatOS (enable)

显示端口状态

show port

show port mod

show port mod/port

show port counters

show port counters mod/port

功能

Cisco IOS 软件

启用 PortFast

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# spanning-tree portfast

Warning: portfast should only be enabled on

ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled can cause temporary

spanning tree loops.

Use with CAUTION

Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

配置主机访问的端口。此命令启用 PortFast 并禁用 CatOS 中的中继和信道。

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport mode access

CiscoIOS(config-if)# spanning-tree portfast

%Warning: portfast should only be enabled

on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled, can cause temporary

spanning tree loops.

Use with CAUTION

%Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

显示端口状态

show interface status

show interface status module mod

show interface status errordisabled

show interface counters error module mod

了解 Cisco IOS 软件中 range 命令的使用

即使交换机运行了 Cisco IOS 软件，仍然可能存在大量的接口。因此，为帮助多端口快速配置，Cisco IOS 软件允许您像在 CatOS 中一样同时配置一系列接口。如果发出 range 命令，您可利用相同的配置快速配置多个接口。

CiscoIOS(config)# interface range gigabitethernet 1/1 -2, fastethernet 4/1 -24

注意：在此命令的语法中，第一个接口范围和连字符之间有空格。语法很重要，必须完全正确。如果缺少空格，命令行界面 (CLI) 会返回语法错误。

这些是未正确使用 range 命令的示例：

CiscoIOS(config)# interface range gigabitethernet 1/1-2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1 -24

本示例在 VLAN 2 中设置 4/2-8 端口：

NativeIOS(config)# interface range fastethernet 4/2 -8

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# no shut

CiscoIOS(config-if)# ^Z

CiscoIOS# show interface

在此示例中使用 range 命令后，配置如下所示：

interface FastEthernet4/4

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/5

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/6

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/7

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/8

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/9

no ip address

shutdown

Cisco IOS 软件配置

在 Cisco IOS 软件中配置中继

Cisco IOS 软件支持交换机间链路协议 (ISL) 和 IEEE 802.1Q (dot1q) 中继模式。可选择不同的接口配置，如了解 Cisco IOS 系统软件中的接口部分所述。除 Cisco IOS 软件中的默认设置（该设置为 desirable 而不是 auto）以外，中继的工作方式与 CatOS 中的完全相同。

功能

CatOS

启用 ISL 中继

CatOS (enable) set trunk 4/1 on isl

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to isl.

启用 dot1q 中继

CatOS (enable) set trunk 4/1 on dot1q

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to dot1q

CatOS (enable) set vlan 2 4/1

VLAN 2 modified.

VLAN 1 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

4/1

注意：对于dot1q，本征VLAN在中继链路上匹配非常重要。在 CatOS 中，使用 set vlan vlan-id mod/port 命令为中继设置本地 VLAN。

更改中继模式

CatOS (enable) set trunk mod/port {on

| off | desirable | auto | nonegotiate}

[vlans] [isl | dot1q | negotiate]

显示中继状态

show trunk

show trunk mod

show port mod/port

功能

Cisco IOS 软件

启用 ISL 中继

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation isl

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become isl

CiscoIOS(config-if)# ^Z

CiscoIOS#

启用 dot1q 中继

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation dot1q

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become dot1q

CiscoIOS(config-if)# switchport trunk native vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

更改中继模式

CiscoIOS(config-if)# switchport mode {access |

trunk | multi | dynamic {auto | desirable}}

显示中继状态

show interfaces trunk

show interfaces trunk module number

show interfaces interface-type mod/port

show interfaces status

有多种方式可在 Cisco IOS 软件中验证中继信息。

注意：路由端口不是L2中继端口。

show interfaces trunk 命令显示当前中继的所有接口。此命令不显示具有中继配置但不主动中继的端口：

Switch# show interfaces trunk

Port Mode      Encapsulation Status   Native vlan

Po41 desirable n-isl         trunking 1

Port Vlans allowed on trunk

Po41 1-1005

Port Vlans allowed and active in management domain

Po41 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Po41 1-6,1002-1005

无论中继状态如何，show interfaces trunk module number 命令显示指定模块上的所有接口。

Switch# show interfaces trunk module 4

Port   Mode      Encapsulation Status       Native vlan

Fa4/1  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/2  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/3  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/4  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/5  desirable negotiate     not-trunking 1

Fa4/6  desirable negotiate     not-trunking 1

Fa4/7  desirable negotiate     not-trunking 1

Fa4/8  desirable negotiate     not-trunking 1

Fa4/9  desirable negotiate     not-trunking 1

Fa4/10 routed    negotiate     routed       1

Fa4/11 desirable negotiate     not-trunking 1

Fa4/12 desirable negotiate     not-trunking 1

Fa4/13 desirable negotiate     not-trunking 1

Fa4/14 desirable negotiate     not-trunking 1

Fa4/15 desirable negotiate     not-trunking 1

Fa4/16 desirable negotiate     not-trunking 1

Fa4/17 desirable negotiate     not-trunking 1

您可使用 show interfaces interface-type mod/port trunk 命令检查指定接口的中继状态，无需在多个屏幕上滚动。

Switch# show interfaces fastethernet 4/1 trunk

Port  Mode      Encapsulation Status       Native vlan

Fa4/1 desirable n-isl         trunk-inbndl 1 (Po41)

Port Vlans allowed on trunk

Fa4/1 1-1005

Port Vlans allowed and active in management domain

Fa4/1 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Fa4/1 1-6,1002-1005

show interfaces status 命令为每个接口提供一行状态和中继状态显示内容。

Switch# show interfaces status

Port Name Status     Vlan   Duplex Speed Type

Gi1/1   connected  routed full    1000 1000BaseSX

Gi1/2   connected  1      full    1000 1000BaseSX

Gi3/1   notconnect routed full    1000 missing

Gi3/2   notconnect routed full    1000 missing

Gi3/3   notconnect routed full    1000 1000BaseSX

Gi3/4   notconnect routed full    1000 1000BaseSX

Gi3/5   notconnect routed full    1000 1000BaseSX

Gi3/6   notconnect routed full    1000 1000BaseSX

Gi3/7   notconnect routed full    1000 1000BaseSX

Gi3/8   notconnect routed full    1000 1000BaseSX

Fa4/1   connected  trunk  full     100 100BaseFX MM

Fa4/2   connected  trunk  full     100 100BaseFX MM

Fa4/3   connected  trunk  full     100 100BaseFX MM

Fa4/4   connected  trunk  full     100 100BaseFX MM

Fa4/5   notconnect 1     full     100 100BaseFX MM

Fa4/6   notconnect 1     full     100 100BaseFX MM

Fa4/7   notconnect 2     full     100 100BaseFX MM

Fa4/8   notconnect 2     full     100 100BaseFX MM

Fa4/9   notconnect 1     full     100 100BaseFX MM

Fa4/10   notconnect routed full     100 100BaseFX MM

Fa4/11   notconnect 1     full     100 100BaseFX MM

在 Cisco IOS 软件中配置 EtherChannels

您在 Cisco IOS 软件中配置 EtherChannels 的方式与在 CatOS 中的不同。要在 Cisco IOS 软件的一组端口上启用 EtherChannel，需要使用端口信道接口。如果所有情况对端口组都有效，则会形成一个端口信道。在默认情况下，即使某个接口采用交换机端口配置，所有接口都会禁用端口信道。

要将一组接口配置为 EtherChannel 的一部分，您必须在每个接口下单独发出 channel-group group-number mode channel-mode 命令。如果您从配置中删除 switchport 命令，则与该交换机端口相关的所有命令将不再显示在配置中。但是，将端口作为交换机端口进行重新配置将会返回之前的所有命令。因此，将端口作为交换机端口进行配置和未进行配置不会清除端口信道组信息。

创建信道组之后，您必须发出端口信道接口上的所有配置，而不是各物理端口上的所有配置。您在端口信道上发出的命令会以透明方式传播到所有的物理端口。您在信道成员的物理接口上发出的命令将从信道组中删除接口。

功能

CatOS

创建信道

CatOS (enable) set port channel 4/3-4 on

Port(s) 4/3-4 are assigned to admin group 613.

Port(s) 4/3-4 channel mode set to on.

CatOS (enable)

设置信道模式

CatOS (enable) set port channel

mod/port mode {on | off | desirable |

auto} [silent | non-silent]

显示端口信道状态

show port channel

show port channel mod/port

show port channel channel-group

功能

Cisco IOS 软件

创建信道

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface port-channel 1

CiscoIOS(config-if)# exit

CiscoIOS(config)# interface fastethernet 4/3

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)# interface fastethernet 4/4

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)#

设置信道模式

CiscoIOS(config-if)# channel-group

channel-group_number mode {on | auto

[non-silent] | desirable [non-silent]}

显示端口信道状态

show etherchannel

show etherchannel channel-group

show interfaces etherchannel

show interfaces interface-type mod/port etherchannel

show etherchannel 命令包含多个可以显示端口信道配置信息的子命令。

show etherchannel channel-group summary 命令提供信道组配置中的所有接口状态。此命令对于快速查找应属于某个信道组的接口非常有用。

CiscoIOS# show etherchannel 256 summary

Flags: U - in use I - in port-channel S - suspended

D - down I - stand-alone d - default setting

Group Port-channel Ports

-----+------------+-----------------------------------------------------------

256   Po256(U)    Fa5/5(I) Fa5/6(I) Fa5/7(I) Fa5/8(I)

不管信道状态如何，show interfaces etherchannel 命令都可显示与信道组关联的每个接口。

CiscoIOS# show interfaces etherchannel

----

GigabitEthernet1/1:

Port state = EC-Enbld Up In-Bndl Usr-Config

Channel group = 254 Mode = Automatic Gcchange = 0

Port-channel = Po254 GC = 0x00FE0001

Port indx = 0 Load = 0x55

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP    Learning Group

Port  Flags   State   Timers   Interval Count Priority Method Ifindex

Gi1/1 SAC     U6/S7   Q     30s     1   128      Any    56

Partner's information:

Partner Partner Partner  Partner        Group

Port Name    Device   ID         Port Age Flags Cap.

Gi1/1   69055180(STELLA) 0010.7bbe.50bb 3/4  12s SC    2

您可使用 show interfaces interface-type mod/port etherchannel 命令检查指定接口的信道状态，无需在多个屏幕上滚动。

CiscoIOS# show interfaces fastethernet 5/5 etherchannel

Port state = EC-Enbld Up Cnt-bndl Sngl-port-Bndl Cnt-Bndl Not-in-Bndl Usr-Config

Channel group = 256 Mode = Automatic Gcchange = 1

Port-channel = null GC = 0x11000002

Port indx = 0 Load = 0x00

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP  Learning Group

Port  Flags   State Timers   Interval Count Priority Method Ifindex

Fa5/5 SAC     U6/S7 Q  30s   1     128      Any 0

Partner's information:

Partner Partner   Partner Partner        Group

Port Name   Device  ID      Port Age Flags Cap.

Fa5/5   066549452(SINGHA) 00d0.bb3a.c0d9 4/17 29s SC 2

Age of the port in the current state: 00h:30m:31s

Probable reason: pm - different in oper mode (1) with Fa5/8(2)

show interfaces port-channel channel-group etherchannel 命令显示作为端口信道当前活动成员的端口。

CiscoIOS# show interfaces port-channel 256 etherchannel

Age of the Port-channel = 05h:52m:49s

Logical slot/port = 13/64 Number of ports = 2

GC = 0x01000001 HotStandBy port = null

Port state = Port-channel Ag-Inuse

Ports in the Port-channel:

Index  Load   Port   EC state  Configuration

------+------+------+-----------+--------------

1    55     Fa5/7  auto      user

0    AA     Fa5/8  auto      user

Time since last port bundled: 00h:46m:51s Fa5/7

Time since last port Un-bundled: 00h:46m:54s Fa5/8

在 Cisco IOS 软件中配置 VLAN

Cisco IOS 软件和 CatOS 的 VLAN 概念和功能是相同的。但是，两种实施之间的配置方法有着很大的不同。当 set 命令在 CatOS 中创建 VLAN 时，VLAN 创建将在 Cisco IOS 软件中通过 VLAN 数据库配置模式发生。

功能

CatOS

创建 VLAN

CatOS (enable) set vlan 2

Vlan 2 configuration successful

删除 VLAN

CatOS (enable) clear vlan 2

This command will deactivate all

ports on vlan 2

Do you want to continue(y/n) [n]?y

Vlan 2 deleted

将端口分配给 VLAN

CatOS (enable) set vlan 2 1/1

VLAN 2 modified.

VLAN 10 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

查看 VLAN 的状态

show vlan

功能

Cisco IOS 软件

创建 VLAN

CiscoIOS# vlan database

CiscoIOS(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

删除 VLAN

NativeIOS# vlan database

CiscoIOS(vlan)# no vlan 2

Deleting VLAN 2...

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

将端口分配给 VLAN

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface gigabitethernet2/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

查看 VLAN 的状态

show vlan

要检查 VLAN 的状态，请使用 show vlan 命令。

Router# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active

2    VLAN0002                         active

10   VLAN0010                         active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

在 Cisco IOS 软件中配置 VTP

VTP 是在 VTP 域中同步 VLAN 数据库的 L2 协议。在同一个 VTP 域添加、删除或修改 VLAN 时，VTP 会同步同一个 VTP 域中所有成员的 VLAN 数据库。通过减少不需要传播的 VLAN 的多余传播和组播流量，VTP 修剪可将中继流量降到最低。

在 Cisco IOS 软件中，VLAN 数据库模式定义了 VTP 配置。对 VLAN 数据库和 VTP 的更改发生在 VLAN 数据的应用程序上。当用户从 VLAN 数据库配置模式退出时，将会发生这种情况。默认的 Cisco IOS 软件 VTP 配置如下：

注意：默认VTP模式是Server。

CiscoIOS# show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Server

VTP Domain Name : null

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0xE2 0x4F 0xC0 0xD6 0x94 0xBB 0x31 0x9A

Configuration last modified by 0.0.0.0 at 6-27-01 02:04:20

Local updater ID is 0.0.0.0 (no valid interface found)

功能

CatOS

配置 VTP

CatOS (enable) set vtp domain cisco

VTP domain cisco modified

更改 VTP 模式

CatOS (enable) set vtp mode client

VTP domain cisco modified

CatOS (enable) set vtp mode server

VTP domain cisco modified

CatOS (enable) set vtp mode transparent

VTP domain cisco modified

启用 VTP 修剪

CatOS (enable) set vtp pruning enable

This command will enable the pruning

function in the entire management domain.

All devices in the management domain

should be pruning-capable before enabling.

Do you want to continue (y/n) [n]? y

VTP domain cisco modified

显示 VTP 配置

CatOS (enable) show vtp domain

功能

Cisco IOS 软件

配置 VTP

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp domain cisco

Changing VTP domain name from null to cisco

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

更改 VTP 模式

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp client

Setting device to VTP CLIENT mode.

CiscoIOS(vlan)# vtp server

Setting device to VTP SERVER mode.

CiscoIOS(vlan)# vtp transparent

Setting device to VTP TRANSPARENT mode.

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

启用 VTP 修剪

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp pruning

Pruning switched ON

CiscoIOS(vlan)# exit

APPLY completed.

显示 VTP 配置

CiscoIOS# show vtp status

CatOS/Cisco IOS 软件命令表

此表是 CatOS 命令和与命令等效的 Cisco IOS 软件的简要列表。此表作为从 CatOS 到 Cisco IOS 软件进行迁移的快速参考十分有用。此表是常用命令的缩写列表。此表未列出每个命令的所有参数。请参阅 Catalyst 6500 系列 Cisco IOS 命令参考 12.2SX 以获取完整的命令语法和参数。

本部分的注释提供了有关特定命令的帮助。注释以斜体显示。

CatOS 命令

Cisco IOS 软件命令

clear vlan vlan

无 VLAN 此命令是VLAN数据库命令。

set cam agingtime

mac-address-table aging-time 此命令设置每个VLAN的MAC地址老化时间。

set cam set cam {static |永久}

mac-address-table static 所有静态条目也是永久的。

set errdisable-timeout interval

errdisable恢复间隔30-86400 此命令设置errdisable恢复时间。

set mls

mls 多层交换(MLS)在Cisco IOS软件中以透明方式发生。

set option errport

errdisable recovery cause 此命令配置errdisable选项。

set port channel 默认模式为auto。

信道组模式 默认模式为关闭。

set port duplex

双工 默认行为因线路卡而异。

set port flowcontrol send [desired |关闭 |on ]

flowcontrol send [desired |关闭 | on ]

set port flowcontrol receive [desired |关闭 |on ]

flowcontrol receive [desired |关闭 | on ]

set port host

switchport switchport mode access spanning-tree portfast 接入端口自动关闭信道/中继。

set port negotiation mod/port disable

速度非协商 仅在千兆端口上使用此命令。对 10/100 Mbps 端口使用 speed and duplex 命令。

set port negotiation mod/port enable

无速度协商 仅在千兆端口上使用此命令。对 10/100 Mbps 端口使用 speed and duplex 命令。

set port speed

速度 默认行为因线路卡而异。

set qos

mls qos

set span

monitor session

set spantree

生成树

set system crossbar-fallback

service internal [no] fabric switching-mode allow [bus-only |截断]

set test diaglevel

诊断级别 这是启动诊断级别。

set trace

调试 请谨慎使用此命令。某些调试是强制型的。

set trunk 默认模式为auto。

switchport mode trunk 默认模式为desirable。

set udld

udld 您可以全局配置此命令，并按接口配置此命令。

set vlan

VLAN交换机端口接入VLAN 此命令是VLAN数据库命令。 此命令为接口命令，不创建 VLAN。

set vtp

vtp 此命令是VLAN数据库命令。

show boot

show bootvar 此命令显示引导参数。

show cam dynamic

show mac-address-table dynamic

show channel info show port channel

show etherchannel summary

show errordetection

show errdisable detect

show errdisable-timeout

show errdisable recovery

show port show mac

show interface

show port status

show interface status

show span

show monitor

show sprom

show idprom 此命令对确定机箱序列号非常有用。

show system crossbar-fallback

show fabric switching-mode

show test [diaglevel | mod]

show diagnostic [level |模块]

show qos

show mls qos

show traffic

show catalyst6000 traffic-meter 此命令显示背板利用率。

show trunk show port trunk

show interfaces trunk

show udld

show udld

show vlan

show vlan

show vtp domain

show vtp status

switch console

远程登录 此命令仅与思科技术支持一起用于特定故障排除。

相关信息

- LAN 产品支持

- LAN 交换技术支持

- 工具与资源

- 技术支持和文档 - Cisco Systems