目录

简介

先决条件

要求

使用的组件

配置

运行NX-OS软件版本6.2(9)的MDS9509

运行NX-OS软件版本6.2(9)的MD 9148

网络图

从MD 9148(NPV)的F波尔特信道中继对MD 9509(NPIV)

拓扑

验证

MDS9509

MD 9148

故障排除

VSAN在正在初始化保持

被看到的EPP故障消息

简介

本文描述如何配置从以功能N_Port ID虚拟化的一个多层数据交换(MD) 9500的一F波尔特信道中继(NPIV)运行到MD 9148运行功能N_Port虚拟化(NPV)。

F波尔特信道中继允许从在Port-Channel将虚拟化的NPV交换机的结构登录。如果独立构件链路失败，这提供不制造混乱的冗余。个别链路默认情况下是在共享的速率模式，但是可以是投入的速率模式。

先决条件

要求

Cisco 建议您了解以下主题：

- N_Port虚拟化

- 光纤通道

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行NX-OS软件版本6.2(9)的MDS9509

- Slot2 - DS-X9148 - 48个端口1/2/4 Gbps FC模块

- 插槽4 - DS-X9124 - 24个端口1/2/4 Gbps FC模块

- 运行NX-OS软件版本6.2(9)的MD 9148

本文依靠这些功能：

- 功能NPV和NPIV在SAN-OS软件版本3.3被添加了

- 功能fport信道中继是被添加的NX-OS软件版本4.1(3)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

注意：使用命令查找工具（仅限注册用户）可获取有关本部分所使用命令的详细信息。

注意：

所有接口应该在同一个虚拟存储区域网络(VSAN)。此示例使用VSAN 1。

它是最佳实践分配在不同线路卡上的成员接口。

“投入的switchport速率模式”可选。默认情况下，建立中继的F (TF)如果需要端口接口在共享的速率模式能运行。如果在端口组的带宽是可用的，他们可以用switchport速率模式投入的命令配置。您能输入x命令显示端口资源的模块为了发现端口组和可用的带宽在其中每一。

运行NX-OS软件版本6.2(9)的MDS9509

feature fport-channel-trunk

feature npiv

interface port-channel 1

channel mode active

switchport mode F

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

interface fc2/2

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

interface fc4/8

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

运行NX-OS软件版本6.2(9)的MD 9148

注意：

9148的所有端口投入(高速模式)，因此配置不是必要在9148为了保证专用。实际上， “switchport速率模式投入的”命令自动地被添加并且不可能更改。

“功能fport信道中继”在MD NPV交换机不需要配置。

对NPV模式的一更改清除当前配置并且重新启动在NPV模式的交换机。

feature npv

interface port-channel 1

channel mode active

switchport mode NP

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

switchport trunk mode on

interface fc1/2

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

interface fc1/14

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

网络图

从MD 9148(NPV)的F波尔特信道中继对MD 9509(NPIV)

拓扑

MDS9509模块信息：

mds9509# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

2    48     1/2/4 Gbps FC Module                DS-X9148           ok

4    24     1/2/4 Gbps FC Module                DS-X9124           ok

5    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    active *

6    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    ha-standby

MD 9148模块信息：

mds9148# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

1    48     1/2/4/8 Gbps FC/Supervisor-3        DS-C9148-K9-SUP    active *

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令。请使用Output Interpreter Tool为了查看show命令输出分析。

MDS9509

此命令指示port-channel1有两个可操作的端口。

mds9509# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc4/8

此命令显示Port-Channel和所有成员接口。第一可操作的波尔特(蠢人)用星号表示：

mds9509(config-if)# show port-channel data

port-channel1

Administrative channel mode is active

Operational channel mode is active

Last membership update succeeded

First operational port is fc4/8

2 ports in total, 2 ports up

Ports:   fc2/2    [up]

fc4/8    [up] *

此命令显示port-channel1接口在“建立中继”的状态哪些是所需的状态。

注意：VSAN 1和20是两个指示有是UP在9148的两VSAN的端口。

mds9509# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 112 bits/sec, 14 bytes/sec, 0 frames/sec

5 minutes output rate 152 bits/sec, 19 bytes/sec, 0 frames/sec

25798 frames input, 1399932 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

23082 frames output, 1013152 bytes

0 discards, 0 errors

18 input OLS, 14 LRR, 29 NOS, 0 loop inits

17 output OLS, 0 LRR, 21 NOS, 0 loop inits

Member[1] : fc4/2

Member[2] : fc4/8

Interface last changed at Thu Mar  6 06:27:36 2014

此命令在“建立中继”的状态也显示两个成员接口。

mds9509# show interface fc2/2, fc4/8

fc2/2 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:42:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 0 bits/sec,0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec,0 bytes/sec, 0 frames/sec

31 frames input,4476 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

30 frames output,4224 bytes

0 discards,0 errors

3 input OLS,3  LRR,7 NOS,0 loop inits

5 output OLS,0 LRR, 4 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters  :never

fc4/8 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:c8:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 8 bits/sec,1 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec,1 bytes/sec, 0 frames/sec

45855 frames input,1934340 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

23018 frames output,1115304 bytes

0 discards,0 errors

8 input OLS,5  LRR,8 NOS,0 loop inits

7 output OLS,0 LRR, 6 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters 2w 1d

MD 9148

此命令指示port-channel1有两个可操作的端口。

mds9148# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc1/2

此命令显示port-channel1接口在“建立中继”的状态哪些是所需的状态。

注意：VSAN 1和20是两个指示有是UP在9148的两VSAN的端口。

mds9148# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:fc:40:c0

Admin port mode is NP, trunk mode is on

snmp link state traps are enabled

Port mode is TNP

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 32 bits/sec,4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec,4 bytes/sec, 0 frames/sec

688 frames input,91096 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

661 frames output,89080 bytes

3 discards,0 errors

14 input OLS,0  LRR,0 NOS,0 loop inits

32 output OLS,29 LRR, 14 NOS, 0 loop inits

Member[1] : fc1/2

Member[2] : fc1/14

Interface last changed at Thu Mar  6 18:48:57 2014

故障排除

本部分提供的信息可用于对配置进行故障排除。

如果Port-Channel不出现，请查看此信息：

只有当这些配置是相同的在端口和PortChannel，端口可以配置作为静态PortChannel的成员：

- 速度

- 模式

- 速率模式

- 波尔特VSAN

- 中继模式

- 允许VSAN列表或VF-ID列表

配置端口不Port-Channel的并且验证它出现。

参考配置端口通道欲知更多信息。

VSAN在正在初始化保持

当没有接口FLOGI'd对在MD 9148时的该VSAN VSAN显示如正在初始化。一旦VSAN是UP在Port-Channel，如果VSAN的最后剩余端口在MD 9148沿着走VSAN保持。

被看到的EPP故障消息

保证中继协议(EPP)启用。不应该关闭它：

rtp-san-34-15-9509(config)# show trunk protocol

Trunk Protocol is enabled

如果中继协议是然后禁用的再打开：

mds9509(config)# show trunk protocol

Trunk Protocol is disabled

mds9509(config)# trunk protocol

mds9509(config)#

mds9509(config)# show trunk protocol

Trunk Protocol is enabled