目录

简介

先决条件

要求

使用的组件

背景信息

问题

解决方案

结论

简介

本文档介绍在安装M9XT-FC1632 PEM模块时，端口激活许可如何在MDS 9132T (DS-C9132T-K9)平台上工作。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

Cisco MDS 9132T 32 Gbps 32端口光纤通道交换机，基本机箱中提供16个32 Gbps FC端口(FC1/1-16)，未安装8端口激活许可证(M9132T-PL8)，扩展插槽中安装有16个32 Gbps FC端口的M9XT-FC1632模块。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

本文档具体介绍在没有8端口激活许可证(M9132T-PL8)的情况下，在基本端口(FC1/9-16)和扩展端口(FC1/17-32)之间移动许可证的过程。

一位客户购买了M9XT-FC1632端口扩展模块，其中所有16个端口都处于活动状态(FC1/17-32)，默认配置为8个活动端口(FC1/1-8)。他们假设可以在活动扩展端口和符合条件的端口之间传输许可证(FC1/9-16)。但是，当尝试从扩展模块删除端口激活许可证以将其移动到基本模块时，他们遇到了错误消息“fc1/x：(error) requested config change not allowed”，其中x表示17-32之间的端口号。

此外，当安装M9XT-FC1632端口扩展模块时，额外的16个端口不会显示在“show license usage”输出中，如下所示：

`show license usage` Feature Ins Lic Status Expiry Date Comments Count -------------------------------------------------------------------------------- FM_SERVER_PKG No - Unused - ENTERPRISE_PKG No - Unused - PORT_ACTIV_9132U_PKG No 8 In use never - --------------------------------------------------------------------------------

但是，“show port-license”输出显示基本8个许可端口(fc1/1-8)和另外16个端口(fc1/17-32)已许可。

`show port-license` Available port activation licenses are 0 ----------------------------------------------- Interface Cookie Port Activation License ----------------------------------------------- fc1/1 16777216 acquired fc1/2 16781312 acquired fc1/3 16785408 acquired fc1/4 16789504 acquired fc1/5 16793600 acquired fc1/6 16797696 acquired fc1/7 16801792 acquired fc1/8 16805888 acquired fc1/9 16809984 eligible fc1/10 16814080 eligible fc1/11 16818176 eligible fc1/12 16822272 eligible fc1/13 16826368 eligible fc1/14 16830464 eligible fc1/15 16834560 eligible fc1/16 16838656 eligible fc1/17 16842752 acquired fc1/18 16846848 acquired fc1/19 16850944 acquired fc1/20 16855040 acquired fc1/21 16859136 acquired fc1/22 16863232 acquired fc1/23 16867328 acquired fc1/24 16871424 acquired fc1/25 16875520 acquired fc1/26 16879616 acquired fc1/27 16883712 acquired fc1/28 16887808 acquired fc1/29 16891904 acquired fc1/30 16896000 acquired fc1/31 16900096 acquired fc1/32 16904192 acquired

问题

有问题的客户无法在扩展模块与基本模块之间移动端口激活许可证。

解决方案

此行为是为激活前24个连续端口的方案设计的。但是，由于有问题的客户没有购买M9132T-PL8（8端口激活许可证）来激活端口FC1/9-16，他们唯一的选择是将端口激活许可证从FC1/1-8移到FC1/9-16，并使用从接口FC1/9-32开始的24个连续端口。或者，如果需要，他们可以购买额外的8端口许可证。

MDS9132-1-rack7(config-if)# int fc1/17

MDS9132-1-rack7(config-if)# no port-license

fc1/17：（错误）不允许请求的配置更改

MDS9132-1-rack7(config-if)#

许可指南现已更新：

Cisco MDS 9000系列许可指南，版本8.x

https://www.cisco.com/c/en/us/td/docs/switches/datacenter/mds9000/sw/8_x/config/licensing/cisco_mds9000_licensing_guide_8x.html?dtid=osscdc000283#concept_6D5A7D76D5E344B4B232B3111868FA93

注意：Cisco MDS 9132T 32 Gbps 32端口光纤通道交换机在底盘机箱中具有16个32 Gbps FC端口(FC1/1-16)，在LEM模块(FC1/17-32)中具有16个32 Gbps FC端口。端口许可证不能在底座机箱和LEM模块之间移动。

结论

要许可端口fc1/1-8（8个端口）和端口fc1/9，即使安装了M9XT-FC1632端口扩展模块，您也需要获取额外的8端口许可证。