目录

简介：

先决条件

要求:

使用的组件

问题陈述：

解决方案：

简介：

本文档介绍如何排除UCS中心2.0版及更高版本中由SSH主机密钥不匹配导致的UCS中心备份故障。

先决条件

要求:

本文档假定您了解以下主题：

- Cisco UCS中心

- 基本的Linux命令了解。

使用的组件

- UCS中心2.1(1a)版

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

问题陈述：

UCS中心备份操作失败，并且Status选项卡显示以下错误消息：

“Host key has changed for the remote server. Clear the cached host key and retry.”

日志证据：

# From svc_ops_dme.log:

Jan 6 11:36:47 degtlue2100 svc_ops_dme[1597]: [EVENT][E14194351][79965][transition][internal][] [FSM:STAGE:ASYNC]: uploading data to backup server(FSM-STAGE:sam:dme:MgmtDataExporterExportData:upload)

Jan 6 11:36:47 degtlue2100 svc_ops_dme[1597]: [EVENT][E14194351][79966][transition][internal][] [FSM:STAGE:STALE-FAIL]: uploading data to backup server(FSM-STAGE:sam:dme:MgmtDataExporterExportData:upload)

Jan 6 11:36:47 degtlue2100 svc_ops_dme[1597]: [EVENT][E14194351][79968][transition][internal][] [FSM:STAGE:REMOTE-ERROR]: Result: end-point-failed Code: unspecified Message: Host key has changed for the remote server. Clear the cached host key and retry (sam:dme:MgmtDataExporterExportData:upload)     <<<<<<<

Jan 6 11:36:47 degtlue2100 svc_ops_dme[1597]: [EVENT][E14194351][79970][transition][internal][] [FSM:STAGE:FAILED]: uploading data to backup server(FSM-STAGE:sam:dme:MgmtDataExporterExportData:upload)

解决方案：

1. 建立到UCS中心系统的SSH会话。

2.验证已安装的UCS中心软件包版本。

Central-HTTS1# connect local-mgmt

Cisco UCS Central

TAC support: http://www.cisco.com/tac

Copyright (c) 2011-2025, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1 or later version. A copy of each

such license is available at

https://opensource.org/license/gpl-2-0 and

https://opensource.org/license/lgpl-2-1

Central-HTTS1(local-mgmt)# show version

Name                Package             Version        GUI

----                -------             -------        ----

core                Base System         2.1(1a)        2.1(1a)

central-mgr         Central Manager     2.1(1a)        2.1(1a)

service-reg         Service Registry    2.1(1a)        2.1(1a)

identifier-mgr      Identifier Manager  2.1(1a)        2.1(1a)

operation-mgr       Operations Manager  2.1(1a)        2.1(1a)

resource-mgr        Resource Manager    2.1(1a)        2.1(1a)

policy-mgr          Policy Manager      2.1(1a)        2.1(1a)

stats-mgr           Statistics Manager  2.1(1a)        2.1(1a)

server-mgr          Server Manager      2.1(1a)        2.1(1a)

gch                 Generic Call Home   2.1(1a)        none

rel-key             Release Key         2.1(1a)        none

Central-HTTS1(local-mgmt)#

3.从中央服务器获取令牌。

注意：每10分钟更改一次。

Central-HTTS1(local-mgmt)# show token

0HPPCXXYGVR

*使用响应密钥生成器上的令牌：https://cspg-releng.cisco.com/UCSPassGen.php

注意：首先选择您的UCSC版本。（2.0或2.1）。 否则，根用户将无法使用密码。在粘贴从UCS中心获取的令牌之前，请确保从密码生成网站上的Debug-Token字段中删除“token”一词。  文本将保持其他状态，并生成无效密码。

4.使用根凭证和响应密钥作为密码，启动到UCS中心的新SSH会话。

login as: root

root@ <IP Address> password:

Last login: Tue Jan 13 17:57:20 2026 from <IP Address>

5.导航到此路径，并检查“known_hosts”文件以查找受影响服务器的IP地址：

[root@Central-HTTS1 ~]# cd /root/.ssh

[root@Central-HTTS1 .ssh]# cat known_hosts

[root@Central-HTTS1 ~]# cd /root/

anaconda-ks.cfg  .bash_profile    .cshrc           ks-pre.log       .ssh/

.bash_history    .bashrc          ks-post1.log     opt/             .tcshrc

.bash_logout     .config/         ks-post.log      original-ks.cfg  .viminfo

[root@Central-HTTS1 ~]# cd /root/.ssh/

[root@Central-HTTS1 .ssh]# ls

id_rsa  id_rsa.pub  known_hosts

[root@Central-HTTS1 .ssh]# cat known_hosts

如果文件中存在受影响服务器的IP地址，请使用“vim”编辑器手动删除相应的条目。

导航到特定行，然后键入“dd”将其删除。

[root@Central-HTTS1 .ssh]# vi known_hosts

[root@Central-HTTS1 .ssh]# vi known_hosts

....

....

....

!wq     (Write and Quit  >> Saving changes and exiting)

删除受影响的IP地址后，使用：wq保存文件并退出编辑器。

更新known_hosts文件后，请再次从UCS中心重试备份操作。

然后，这次备份成功完成。