简介

本文档介绍通过Cisco Intersight对Cisco Nutanix HCI集群执行固件升级的过程。

背景信息

虽然建议使用Life Cycle Manager(LCM)修复ISM/IMM集群的固件，但特定情况(例如触发Bug或Field Notice(FN))可能需要选择特定版本进行升级或降级。在这些情况下，可以通过Intersight应用固件更改。

与LCM过程不同，离线升级需要逐个主机手动编辑和修补固件。执行这些操作之前，必须了解集群的工作负载和容量。

用户手动将主机置于维护模式，通过Intersight应用固件更改，然后退出维护模式。对集群中的每个节点重复此操作。

提示：要了解有关集群可承受的同步缺失节点数量的更多详细信息，请参阅Nutanix文档集群容错。

手动升级步骤概览

1. 使用新的固件版本编辑每个固件策略。

2. 部署所有配置文件，无需立即重新启动以暂存固件。

3. 通过棱镜元件或棱镜中心将单个节点置于维护模式。

4. 在维护模式下激活服务器的配置文件，以重新启动服务器并应用固件。

5. 对集群中的所有节点重复步骤3和4。

6. 验证升级是否完成，群集是否正常

修改固件策略

Intersight通过固件策略推送固件。每个节点都有自己的策略，通过编辑这些策略来选择新版本。

固件策略名称的语法为：ntnx_firmware_<序列号>_<部署UUID>

查找并编辑策略

导航到Policies > Click Filters > Check Firmware。

选择要修改的策略，然后点击编辑。

从下拉列表中选择所需的固件版本，然后点击Save & Deploy。

暂存固件

重新部署服务器配置文件时，确保取消选中Reboot Immediately选项。这会将新固件暂存到刀片上；仅在下次重新通电后执行更改。

部署开始后：

- 新的工作流程显示在Requests选项卡中。

- 固件下载启动。

- 部署服务器而不立即重新启动后，服务器配置文件显示Inconsistent状态。在配置文件激活之前，这是预期值。

继续编辑所有其他固件策略，并在不立即重新启动的情况下进行部署。

通过Prism Central或Prism元件将服务器置于维护模式

为避免中断，必须将服务器置于维护模式，以在重新启动之前迁移工作负载。

直角棱镜元件

1. 导航到硬件 > 图。

2. 选择AHV#。

3. 选择Enter Maintenance Mode。

通过棱镜中心

1. 导航到基础设施 > 硬件 > 集群。

2. 选择Cluster。

3. 选择特定节点以将其置于维护模式。

激活配置文件和推送固件

一旦主机处于维护模式，固件就可以推送到节点

1. 导航到Profiles选项卡。

2. 通过序列号在维护模式下查找服务器的配置文件。

3. 选择Actions > Activate。

（可选）通过KVM控制台监控固件升级进度。

验证升级并退出维护模式

激活完成后，服务器配置文件状态将变为OK。

现在，可从维护模式中删除该节点。

对其余节点重复上述过程，直到所有配置文件显示OK Status。

验证集群运行状况

在Prism中，验证群集弹性是正常。

相关信息

Cisco UCS硬件兼容性列表

Nutanix平台兼容性和互操作性矩阵

KB-15110 LCM预检查：test_cisco_validate_credentials_and_setup

Perform Cisco Nutanix HCI Cluster Offline Upgrade Through Intersight

## Introduction

This document describes the process to manually perform an offline firmware upgrade for Cisco Nutanix HCI clusters using Cisco Intersight when LCM is not used.

## Background Information

While it is recommended to use Life Cycle Manager (LCM) when remediating firmware for ISM/IMM Clusters, specific scenarios—such as hitting a bug or Field Notice (FN)—may require selecting a specific version for an upgrade or downgrade. In these cases, firmware changes can be applied through Intersight.

Unlike the LCM process, an offline upgrade requires editing and patching firmware on a per-host basis. It is mandatory to understand the workload and capacity of the cluster before performing these actions. During this process, the user manually places the host in Maintenance Mode, applies the firmware change via Intersight, and then exits Maintenance Mode. This is repeated for each node in the cluster.

## Manual Upgrade Steps at a Glance

1. Edit the Firmware Policy with the new firmware version.

2. Deploy all profiles without an immediate reboot to stage the firmware.

3. Place the node in Maintenance Mode via Prism Element or Prism Central.

4. Activate the profile for the server in Maintenance Mode to power cycle the server and apply firmware.

5. Repeat steps 3 and 4 for all nodes in the cluster.

## Modify Firmware Policies

Intersight pushes firmware through a Firmware Policy. Each node has its own policy, and new versions are selected by editing these policies.

The syntax for the firmware policy name is: `ntnx_firmware_

_

`

### Locate and Edit Policies

1. Navigate to **Policies** > Click **Filters** > **Type** > Check **Firmware**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image.png)

2. Select the Policy and click **Edit**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%201.png)

3. Select the desired firmware version from the drop-down list and click **Save & Deploy**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%202.png)

### Stage the Firmware

When redeploying the server profile, ensure the **Reboot Immediately** option is **unchecked**. This stages the new firmware on the blade; the change is only executed after the next power cycle. This method saves time by staging firmware across all nodes simultaneously.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%203.png)

Once deployment starts:

* A new workflow appears in the **Requests** tab.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%204.png)

* The firmware download is initiated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%205.png)

* After the server is deployed without an immediate reboot, the Server Profile will show an **Inconsistent** status. This is expected until the profile is activated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%206.png)

## Place Servers in Maintenance Mode Through Prism Central or Prism Element

To avoid disruption, servers must be placed into Maintenance Mode to migrate workloads before the reboot.

### Using Prism Element

1. Navigate to **Hardware** > **Diagram**.

2. Select the **AHV#**.

3. Select **Enter Maintenance Mode**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%207.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%208.png)

### Using Prism Central

1. Navigate to **Infrastructure** > **Hardware** > **Clusters**.

2. Select the **Cluster**.

3. Select the specific **Node** to place it in Maintenance Mode.

## Activate Profiles and Push Firmware

Once the host is in Maintenance Mode, you can push the firmware.

1. Navigate to the **Profiles** tab.

2. Locate the profile of the server in Maintenance Mode using its Serial Number.

3. Select **Actions** > **Activate**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%209.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2010.png)

4. (Optional) Monitor the firmware upgrade progress through the KVM console.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2011.png)

## Verify Upgrade and Exit Maintenance Mode

Once the activation is complete:

1. The Server Profile status transitions to **OK**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2012.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2013.png)

2. The node can now be taken out of Maintenance Mode.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2014.png)

3. Repeat the process for the remaining nodes until all profiles show an **OK** status.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2015.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2016.png)