目录

简介

先决条件

要求

使用的组件

配置

日志导出策略配置

日志级别配置

验证

外部服务器

故障排除

相关信息

简介

本文档介绍如何使用安全复制协议(SCP)配置要导出到外部服务器的数据管理引擎(DME)日志以保留日志。

Unified Computing System Manager(UCSM)在/var/sysmgr/sam_logs/中存储其进程的日志文件。管理员可以通过收集UCSM techsupport或在local-mgmt作用域中使用tail-mgmt-log命令来读取这些日志。

先决条件

要求

Cisco 建议您了解以下主题：

- 命令行(CLI)访问UCS域

- 外部服务器

使用的组件

本文档中的信息基于以下软件和硬件版本：

- UCS 6248交换矩阵互联

- UCSM 2.2(7b)

- CentOS 6.7

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

配置

日志导出策略配置

注意：这些配置步骤记录在Cisco UCS Manager CLI系统监控指南的Configuring Settings for Faults, Events， and Logs > Log File Exporter一节中。强烈建议您阅读整个监控指南。

步骤1.首先检查当前日志导出策略。

ucs-04-B# scope monitoring

ucs-04-B /monitoring # scope sysdebug

ucs-04-B /monitoring/sysdebug # scope log-export-policy

ucs-04-B /monitoring/sysdebug/log-export-policy # show

Log Export Policy:

Remote server:

admin state: Disabled

Use Passwordless Ssh: Yes

步骤2.查看可修改的设置。

ucs-04-B /monitoring/sysdebug/log-export-policy # set

admin-state       admin state

descr             Description

hostname          Remote server

passwd            password

passwordless-ssh  Use Passwordless Ssh

path              remote path

proto             protocol

user              remote user

步骤3.配置外部服务器。

ucs-04-B /monitoring/sysdebug/log-export-policy # set hostname 192.168.0.100

ucs-04-B /monitoring/sysdebug/log-export-policy* # set user ucs

ucs-04-B /monitoring/sysdebug/log-export-policy* # set passwd

password:

ucs-04-B /monitoring/sysdebug/log-export-policy* # set path /var/log/

ucs-04-B /monitoring/sysdebug/log-export-policy* # set admin-state enabled

ucs-04-B /monitoring/sysdebug/log-export-policy* # set proto scp

ucs-04-B /monitoring/sysdebug/log-export-policy* # set passwordless-ssh yes

ucs-04-B /monitoring/sysdebug/log-export-policy* # commit-buffer

ucs-04-B /monitoring/sysdebug/log-export-policy #

日志级别配置

管理员可能需要提高特定日志记录模块的日志记录级别。此处的命令显示可配置的模块。

ucs-04-B # scope monitoring

ucs-04-B /monitoring # scope sysdebug

ucs-04-B /monitoring/sysdebug # scope mgmt-logging

ucs-04-B /monitoring/sysdebug/mgmt-logging #

reset  Reset mgmt logging levels

save   Save mgmt logging parameters

set    Set mgmt logging property values

show   Show system information

ucs-04-B /monitoring/sysdebug/mgmt-logging # show

Log File Size Limit:         5242880

Name                  Level  Default Level

--------------------- ------ -------------

adaptor               Info   Info

agdriver              Info   Info

ape                   Info   Info

app_hostag_agcore     Info   Info

app_sam_bladeAG       Info   Info

app_sam_cim           Info   Info

app_sam_controller    Info   Info

app_sam_dcosAG        Info   Info

app_sam_dme           Info   Info

app_sam_hostagentAG   Info   Info

app_sam_licenseAG     Info   Info

app_sam_nicAG         Info   Info

app_sam_portAG        Info   Info

app_sam_rsdAG         Info   Info

app_sam_serverAG      Info   Info

app_sam_snmp          Info   Info

app_sam_statsAG       Info   Info

app_sam_svcmonAG      Info   Info

app_sam_switchAG      Info   Info

app_synagent_fileAG   Info   Info

app_unittest_testsvc  Info   Info

auth                  Info   Info

autocond              Info   Info

bio_stream            Info   Info

bios                  Info   Info

callhome              Info   Info

catalog               Info   Info

char_stream           Info   Info

compute               Info   Info

core_transactor       Info   Info

core_utils            Info   Info

diag                  Info   Info

doer                  Info   Info

domain                Info   Info

equipment             Info   Info

ether                 Info   Info

event_                Info   Info

event_channel         Info   Info

exception_handling    Info   Info

fabric                Info   Info

fault                 Info   Info

fcpool                Info   Info

filter                Info   Info

fsm                   Info   Info

http_client           Info   Info

ippool                Info   Info

iptfwconfig           Info   Info

locator               Info   Info

此处的命令说明了管理员如何修改DME日志记录模块app_sam_dme的日志记录级别。

ucs-04-B /monitoring/sysdebug/mgmt-logging # set

all     All mgmt logging modules

file    Mgmt logging file parameters

module  Specific mgmt logging module

ucs-04-B /monitoring/sysdebug/mgmt-logging # set module app_sam_dme

crit    Crit

debug0  Debug0

debug1  Debug1

debug2  Debug2

debug3  Debug3

debug4  Debug4

info    Info

major   Major

minor   Minor

warn    Warn

ucs-04-B /monitoring/sysdebug/mgmt-logging # set module app_sam_dme debug4

ucs-04-B /monitoring/sysdebug/mgmt-logging # show

Log File Size Limit:         5242880

Name                  Level  Default Level

--------------------- ------ -------------

adaptor               Info   Info

agdriver              Info   Info

ape                   Info   Info

app_hostag_agcore     Info   Info

app_sam_bladeAG       Info   Info

app_sam_cim           Info   Info

app_sam_controller    Info   Info

app_sam_dcosAG        Info   Info

app_sam_dme           Info   Debug4

app_sam_hostagentAG   Info   Info

app_sam_licenseAG     Info   Info

app_sam_nicAG         Info   Info

app_sam_portAG        Info   Info

app_sam_rsdAG         Info   Info

app_sam_serverAG      Info   Info

app_sam_snmp          Info   Info

app_sam_statsAG       Info   Info

app_sam_svcmonAG      Info   Info

app_sam_switchAG      Info   Info

app_synagent_fileAG   Info   Info

app_unittest_testsvc  Info   Info

auth                  Info   Info

autocond              Info   Info

bio_stream            Info   Info

bios                  Info   Info

callhome              Info   Info

catalog               Info   Info

char_stream           Info   Info

compute               Info   Info

core_transactor       Info   Info

core_utils            Info   Info

diag                  Info   Info

doer                  Info   Info

domain                Info   Info

equipment             Info   Info

ether                 Info   Info

event_                Info   Info

event_channel         Info   Info

exception_handling    Info   Info

fabric                Info   Info

fault                 Info   Info

fcpool                Info   Info

filter                Info   Info

fsm                   Info   Info

http_client           Info   Info

ippool                Info   Info

iptfwconfig           Info   Info

locator               Info   Info

日志记录级别的增加会导致记录的消息数量增加。在大多数情况下，只有在思科技术支持中心(TAC)请求时才必须修改此设置。

验证

使用本部分可确认配置能否正常运行。

外部服务器

如图所示，系统日志服务器包含从UCS域导出的几个.tgz文件。

[admin@localhost /var/log]# ls -la logs.ucs-04-B* | tail -n 5

-rw-r--r--. 1 root root 476911 Dec  8 09:10 logs.ucs-04-B.151208141033.tgz

-rw-r--r--. 1 root root 276423 Dec  8 09:29 logs.ucs-04-B.151208142904.tgz

-rw-r--r--. 1 root root 456043 Dec  8 09:33 logs.ucs-04-B.151208143342.tgz

-rw-r--r--. 1 root root 480427 Dec  8 09:57 logs.ucs-04-B.151208145722.tgz

-rw-r--r--. 1 root root 119322 Dec  8 10:04 logs.ucs-04-B.151208150403.tgz

其中一个文件的提取示例显示它包含一个svc_sam_dme.log.6.gz文件，如果没有此配置，UCS必须删除该文件才能保存较新的日志消息。

[admin@localhost /var/log]# tar -vxzf logs.ucs-04-B.151208145722.tgz

bootflash/sysdebug/log_export/ucs-04-B/151208145722/

bootflash/sysdebug/log_export/ucs-04-B/151208145722/svc_sam_dme.log.6.gz

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- Cisco UCS监控资源手册

- 技术支持和文档 - Cisco Systems