目录

简介

先决条件

在禁用一致性检查之前终止USRM/VRSM实例

正在下载该实用程序。

RedHat/Linux命令

ESXi说明

在VMware ESXi 5.x上安装

VMware Vsphere命令

简介

本文档介绍在LSI RAID控制器上禁用单个磁盘冗余阵列(RAID)控制器一致性检查的步骤，该检查会对具有严格输入/输出(I/O)要求的某些应用产生负面影响。 一旦具有苛刻I/O要求的这组应用程序是通用会话和资源管理器/ Videoscape会话资源管理器(USRM/VSRM)。由于运行一致性检查时可能对这些应用程序产生的I/O等待影响，建议禁用对所有虚拟驱动器/raid卷的一致性检查。 参见CSCuw01134

先决条件

带LSI 92XX型号Raid控制器的思科统一计算系统(UCS)M3机架式服务器。

禁用一致性检查需要USRM/VSRM应用程序的维护窗口。

在禁用一致性检查之前终止USRM/VRSM实例

UCS C220上最多有8个USRM/VSRM实例。  在执行禁用一致性检查的过程之前，每个实例都需要终止。  当一致性检查过程完成时，每个实例必须手动重新启动。

注意：以下2个流程应包含在针对单个客户系统/要求编写的高级流程方法(MOP)中。  例如：MOP将包括协调服务器故障切换和故障恢复，以最大程度地减少对客户的影响。  每个客户可能有不同的要求，需在MOP中予以解决。

要终止USRM/VSRM软件，请执行以下步骤。  注意：需要为USRM/VSRM的每个实例完成这些步骤。

1. 在浏览器中打开USRM/VSRM Web用户界面(UI)

2. 导航至重置页面

3. 使用下拉框将ServerState设置为“Terminate”。

4. 单击Commit Changes按钮。

结果：USRM/VSRM软件将终止且不重新启动。

禁用一致性检查的过程完成后，USRM/VSRM的每个实例都需要手动启动。  对USRM/VSRM的每个实例执行以下步骤。

1. 打开与USRM/VSRM的SSH会话。

2. 导航至正确的目录

1. 对于USRM:/opt/usrm

2. 对于VSRM:/common/usrm

3. 执行命令以启动USRM/VSRM:  ./usrm —<选项（自动或受监管）> -d

1. 受控模式示例：./usrm — 受监管 — d

2. 自动模式示例：./usrm —auto -d

注意：选项前有2个短划线，“d”参数前有1个短划线。

结果：USRM/VSRM软件将启动并开始处理请求。

正在下载该实用程序。

下载StorCli实用程序http://docs.avagotech.com/docs/12351437

StorCLI压缩文件将包含安装文件用于不同操作系统(OS)平台的文件夹。

在RedHat Linux上安装

从zip文件中的/StorCli_All_OS/Linux/文件夹中解压storcli rpm文件，然后安装：

# rpm -ivh <StorCLI-x.xx-x.noarch.rpm>

RedHat/Linux命令

Change to the folder where storcli64 executable file was installed to, typically /opt/MegaRAID/storcli/

#cd /opt/MegaRAID/storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli64 /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli64 /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli64 /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli64 /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’

ESXi说明

如果情况要求在Vmware ESXi环境中禁用一致性检查，则StorCLI实用程序安装过程不同，但storcli命令语法相同。 在vSphere中，安全外壳(SSH)默认禁用，在尝试打开与主机的SSH终端之前，您需要启用SSH。

在VMware ESXi 5.x上安装

从zip文件中的/StorCli_All_OS/Vmware-MN/文件夹解压缩/复制vmware-esx-storcli-xxxxxx.vib文件。

将vmware-esx-storcli-xxxxxx.vib文件复制到ESXi主机的本地文件系统，并复制到/tmp文件夹。

现在运行esxcli命令安装它。

# esxcli软件vib install -v "/tmp/vmware-esx-storcli-xxxxxx.vib" -no-sig-check

VMware Vsphere命令

Change to the folder where the Storcli executable was installed to, typically /opt/lsi/storcli

#cd /opt/lsi/storcli

Please note the ESXi storcli executable is storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’