Contents

Introduction

Prerequisites

Requirements

Components Used

Configure

WSA 配置

示例ASA配置

示例交换机配置(c3560)

Verify

Troubleshoot

Introduction

本文描述如何配置Web安全工具(WSA) /Cisco路由器为了支持HTTP、HTTPS和本地FTP数据流透明重定向与WEB缓存通信协议(WCCP)。

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

本文档中的信息基于以下软件和硬件版本：

- Cisco Web运行AsyncOS版本6.0或以上的安全工具

- 在WSA启用的本地FTP代理

- WCCPv2兼容的Cisco路由器/交换机或者ASA防火墙

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

Configure

当本地FTP数据流重定向透明地对WSA时， WSA典型地收到在标准的FTP端口21的数据流。因此，在WSA的本地FTP代理在端口21应该监听(默认情况下本地FTP代理是8021)。在GUI中，请选择安全服务>验证的FTP代理。

WSA 配置

1. 创建FTP数据流的一个身份。在GUI中，请选择Web安全经理>身份并且保证认证为此ID被禁用。

2. 创建一个访问策略。在GUI中，请选择Web安全经理>Access策略，参考身份step1。

3. 在FTP代理设置下，请修改FTP被动端口是11000-11006为了保证所有端口适合到一个单路供电的组。

4. 创建这些WCCP服务ID ：

域名服务端口

web-cache 0 80 (二者择一，您能使用98自定义Web高速缓冲存储器，如果使用多个WSAs)

ftp本地60 21,11000,11001,11002,11003,11004,11005,11006

https高速缓冲存储器70 443

这些示例重定向三内部子网，当他们绕过所有私下寻址的目的地以及单个内部主机的时WCCP重定向。

示例ASA配置

wccp web-cache redirect-list web-cache group-list group_acl

wccp 60 redirect-list ftp-native group-list group_acl

wccp 70 redirect-list https-cache group-list group_acl

wccp interface inside web-cache redirect in

wccp interface inside 60 redirect in

wccp interface inside 70 redirect in

access-list group_acl extended permit ip host 10.1.1.160 any

access-list ftp-native extended deny ip any 10.0.0.0 255.0.0.0

access-list ftp-native extended deny ip any 172.16.0.0 255.240.0.0

access-list ftp-native extended deny ip any 192.168.0.0 255.255.0.0

access-list ftp-native extended deny ip host 192.168.42.120 any

access-list ftp-native extended permit tcp 192.168.42.0 255.255.255.0 any eq ftp

access-list ftp-native extended permit tcp 192.168.42.0 255.255.255.0 any range 11000

11006

access-list ftp-native extended permit tcp 192.168.99.0 255.255.255.0 any eq ftp

access-list ftp-native extended permit tcp 192.168.99.0 255.255.255.0 any range 11000

11006

access-list ftp-native extended permit tcp 192.168.100.0 255.255.255.0 any eq ftp

access-list ftp-native extended permit tcp 192.168.100.0 255.255.255.0 any range 11000

11006

access-list https-cache extended deny ip any 10.0.0.0 255.0.0.0

access-list https-cache extended deny ip any 172.16.0.0 255.240.0.0

access-list https-cache extended deny ip any 192.168.0.0 255.255.0.0

access-list https-cache extended deny ip host 192.168.42.120 any

access-list https-cache extended permit tcp 192.168.42.0 255.255.255.0 any eq https

access-list https-cache extended permit tcp 192.168.99.0 255.255.255.0 any eq https

access-list https-cache extended permit tcp 192.168.100.0 255.255.255.0 any eq https

access-list web-cache extended deny ip any 10.0.0.0 255.0.0.0

access-list web-cache extended deny ip any 172.16.0.0 255.240.0.0

access-list web-cache extended deny ip any 192.168.0.0 255.255.0.0

access-list web-cache extended deny ip host 192.168.42.120 any

access-list web-cache extended permit tcp 192.168.42.0 255.255.255.0 any eq www

access-list web-cache extended permit tcp 192.168.99.0 255.255.255.0 any eq www

access-list web-cache extended permit tcp 192.168.100.0 255.255.255.0 any eq www

示例交换机配置(c3560)

这应该在多数路由器也是运作。

ip wccp web-cache redirect-list web-cache group-list group_acl

ip wccp 60 redirect-list ftp-native group-list group_acl

ip wccp 70 redirect-list https-cache group-list group_acl

interface Vlan99

ip address 192.168.99.1 255.255.255.0

ip wccp web-cache redirect in

ip wccp 60 redirect in

ip wccp 70 redirect in

interface Vlan100

ip address 192.168.100.1 255.255.255.0

ip wccp web-cache redirect in

ip wccp 60 redirect in

ip wccp 70 redirect in

interface Vlan420

ip address 192.168.42.1 255.255.255.0

ip helper-address 192.168.100.20

ip wccp web-cache redirect in

ip wccp 60 redirect in

ip wccp 70 redirect in

ip access-list extended ftp-native

deny   ip any 10.0.0.0 0.255.255.255

deny   ip any 172.16.0.0 0.15.255.255

deny   ip any 192.168.0.0 0.0.255.255

deny   ip host 192.168.42.120 any

permit tcp 192.168.42.0 0.0.0.255 any eq ftp

permit tcp 192.168.42.0 0.0.0.255 any range 11000 11006

permit tcp 192.168.99.0 0.0.0.255 any eq ftp

permit tcp 192.168.99.0 0.0.0.255 any range 11000 11006

permit tcp 192.168.100.0 0.0.0.255 any eq ftp

permit tcp 192.168.100.0 0.0.0.255 any range 11000 11006

ip access-list extended https-cache

deny   ip any 10.0.0.0 0.255.255.255

deny   ip any 172.16.0.0 0.15.255.255

deny   ip any 192.168.0.0 0.0.255.255

deny   ip host 192.168.42.120 any

permit tcp 192.168.42.0 0.0.0.255 any eq 443

permit tcp 192.168.99.0 0.0.0.255 any eq 443

permit tcp 192.168.100.0 0.0.0.255 any eq 443

ip access-list extended web-cache

deny   ip any 10.0.0.0 0.255.255.255

deny   ip any 172.16.0.0 0.15.255.255

deny   ip any 192.168.0.0 0.0.255.255

deny   ip host 192.168.42.120 any

permit tcp 192.168.42.0 0.0.0.255 any eq www

permit tcp 192.168.99.0 0.0.0.255 any eq www

permit tcp 192.168.100.0 0.0.0.255 any eq www

ip access-list standard group_acl

permit 10.1.1.160

Note:由于WCCP技术限制，最多八个端口可以每个WCCP服务ID分配。

Verify

当前没有可用于此配置的验证过程。

Troubleshoot

目前没有针对此配置的故障排除信息。