目录

简介

先决条件

捕获数据包的步骤

简介

本文档介绍如何捕获SSL设备的网络接口看到的数据包，以及如何生成数据包捕获的pcap文件。

先决条件

本文档中的信息是从运行版本3.7.x的SSL设备创建的。本文档中使用的所有设备都以清除（默认）配置启动。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

警告：如果在生产系统上捕获数据包，可能会影响网络性能。捕获数据包时，始终存在丢弃数据包的风险。

捕获数据包的步骤

1.通过安全外壳(SSH)访问SSL设备。  CLI的凭证与Web用户界面相同。

2.要获取可用的接口进行捕获，请运行以下命令：

support> segment all

您应看到类似以下的输出：

Segment A configuration:

Mode of operation: Active Inline, Fail to Appliance

Status: no failure

External interfaces used: 1 2 3 4

- network: 1 4

- attached appliance: 2 3

External interfaces down: 1 2 3 4

示例显示网段A上的4个接口。

3.使用以下命令确认没有选定接口：

support> capture status

如果未选择任何选项，您应看到以下输出：

Ready to configure and start capture

Selected interface(s) : NONE

Selected mode : normal

4.在开始捕获之前，您需要运行以下命令并指定要在哪些接口上运行捕获：

capture select 1 2 3 4

注意：您将用尝试捕获流量的接口替换1、2、3、4。

您可以重复步骤3确认设置了正确的接口。您应看到以下输出：

Ready to configure and start capture

Selected interface(s) : 1 2 3 4

Selected mode : normal

5.要开始捕获，请运行以下命令：

support> capture start

您应看到以下输出：

Capture started

如果设备上已保存pcap，您将看到以下输出：

Starting capture will erase existing captures stored on disk.

Continue and lose existing captures? (enter 'yes' to confirm):

提示：如果不键入yes，则会中止捕获。

注意：一次只能在设备上存储一个pcap。

6.要停止捕获，请运行以下命令：

support> capture stop

您应看到如下输出：

Waiting while capture files are being processed (0 secs elapsed)

Capture file available via scp

Linux/Mac: scp <user>@<appliance>:pcap_20140708202956_20140708203403.tar.gz

pcap_20140708202956_20140708203403.tar.gz

Windows: pscp.exe -scp <user>@<appliance>:pcap_20140708202956_20140708203403.tar.gz

pcap_20140708202956_20140708203403.tar.gz