目录

简介

先决条件

要求

使用的组件

背景信息

配置

验证

故障排除

简介

本文档介绍如何使用LDAP属性映射为远程访问VPN用户分配静态IP地址。

先决条件

要求

Cisco 建议您了解以下主题：

- Active Directory (AD)

- 轻量级目录访问协议(LDAP)

- 思科安全防火墙威胁防御

- 思科安全防火墙管理中心

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Windows Server 2022

- FTD版本7.4.2

- FMC版本7.4.2

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

注意：Firepower 6.7或更高版本支持使用领域进行IP地址分配并配置LDAP属性映射的选项。在继续之前，请确保firepower版本为6.7或更高版本。

配置

步骤1:导航到Devices > Remote Access，然后选择所需的Remote Access VPN Policy。选择所需的Connection Profile。在AAA选项卡下，选择Authentication Server和Authorization Server的领域。

第二步：导航到Devices > Remote Access，然后选择所需的远程访问VPN策略。导航到高级>地址分配策略，确保启用选项使用授权服务器（仅适用于RADIUS或领域）。

第三步：导航到Advanced > LDAP Attribute Mapping并添加Name Map，其中LDAP Attribute Name set to msRADIUSFramedIPAddress and Cisco Attribute Name set toIETF-Radius-Framed-IP-Address。

第四步：在Windows AD服务器上，打开服务器管理器，然后导航到工具> Active Directory用户和计算机。右键单击用户，选择属性>拨入，然后选中名为分配静态IP地址的框。

第五步：选择Static IP Addresses并向用户分配静态IP地址。

第六步：连接到VPN网关并使用Cisco安全客户端登录。系统将为用户分配您配置的静态IP地址。

验证

启用debug ldap 255并确保检索到msRADIUSFramedIPAddress LDAP属性：

[13] Session Start

[13] New request Session, context 0x000015371bf7a628, reqType = Authentication

[13] Fiber started

[13] Creating LDAP context with uri=ldap://192.168.2.101:389

[13] Connection to LDAP server: ldap://192.168.2.101:389, status = Successful

[13] supportedLDAPVersion: value = 3

[13] supportedLDAPVersion: value = 2

[13] Binding as (Administrator@test.example) [Administrator@test.example]

[13] Performing Simple authentication for Administrator@test.example to 192.168.2.101

[13] LDAP Search:

Base DN = [CN=Users,DC=test,DC=example]

Filter = [sAMAccountName=jdoe]

Scope = [SUBTREE]

[13] User DN = [CN=John Doe,CN=Users,DC=test,DC=example]

[13] Talking to Active Directory server 192.168.2.101

[13] Reading password policy for jdoe, dn:CN=John Doe,CN=Users,DC=test,DC=example

[13] Read bad password count 0

[13] Binding as (jdoe) [CN=John Doe,CN=Users,DC=test,DC=example]

[13] Performing Simple authentication for jdoe to 192.168.2.101

[13] Processing LDAP response for user jdoe

[13] Message (jdoe):

[13] Authentication successful for jdoe to 192.168.2.101

[13] Retrieved User Attributes:

[13] objectClass: value = top

[13] objectClass: value = person

[13] objectClass: value = organizationalPerson

[13] objectClass: value = user

[13] cn: value = John Doe

[13] sn: value = Doe

[13] givenName: value = John

[13] distinguishedName: value = CN=John Doe,CN=Users,DC=test,DC=example

[13] instanceType: value = 4

[13] whenCreated: value = 20240928142334.0Z

[13] whenChanged: value = 20240928152553.0Z

[13] displayName: value = John Doe

[13] uSNCreated: value = 12801

[13] uSNChanged: value = 12826

[13] name: value = John Doe

[13] objectGUID: value = ......fA.f...;.,

[13] userAccountControl: value = 66048

[13] badPwdCount: value = 0

[13] codePage: value = 0

[13] countryCode: value = 0

[13] badPasswordTime: value = 0

[13] lastLogoff: value = 0

[13] lastLogon: value = 0

[13] pwdLastSet: value = 133720070153887755

[13] primaryGroupID: value = 513

[13] userParameters: value = m: d.

[13] objectSid: value = ............Q=.S....=...Q...

[13] accountExpires: value = 9223372036854775807

[13] logonCount: value = 0

[13] sAMAccountName: value = jdoe

[13] sAMAccountType: value = 805306368

[13] userPrincipalName: value = jdoe@test.example

[13] objectCategory: value = CN=Person,CN=Schema,CN=Configuration,DC=test,DC=example

[13] msRADIUSFramedIPAddress: value = -1408232375

[13] mapped to IETF-Radius-Framed-IP-Address: value = -1408232375

[13] msRASSavedFramedIPAddress: value = -1408232375

[13] dSCorePropagationData: value = 16010101000000.0Z

[13] lastLogonTimestamp: value = 133720093118057231

[13] Fiber exit Tx=522 bytes Rx=2492 bytes, status=1

[13] Session End

故障排除

调试命令：

debug webvpn 255

debug ldap

用于验证分配给所需RA VPN用户的静态IP地址的命令：

show vpn-sessiondb anyconnect filter name <username>

firepower# show vpn-sessiondb anyconnect filter name jdoe

Session Type: AnyConnect

Username : jdoe Index : 7

Assigned IP : 172.16.20.73 Public IP : 10.0.0.10

Protocol : AnyConnect-Parent SSL-Tunnel DTLS-Tunnel

License : AnyConnect Premium

Encryption : AnyConnect-Parent: (1)none SSL-Tunnel: (1)AES-GCM-128 DTLS-Tunnel: (1)AES-GCM-256

Hashing : AnyConnect-Parent: (1)none SSL-Tunnel: (1)SHA256 DTLS-Tunnel: (1)SHA384

Bytes Tx : 14664 Bytes Rx : 26949

Group Policy : DfltGrpPolicy Tunnel Group : RAVPN_PROFILE

Login Time : 11:45:48 UTC Sun Sep 29 2024

Duration : 0h:38m:59s

Inactivity : 0h:00m:00s

VLAN Mapping : N/A VLAN : none

Audt Sess ID : cb0071820000700066f93dec

Security Grp : none Tunnel Zone : 0