目录

简介

先决条件

要求

使用的组件

相关产品

规则

背景信息

配置

网络图

配置

CLI 配置

ASDM 配置

验证

确认配置完成

确认安装了备份路由（CLI 方法）

确认安装了备份路由（ASDM 方法）

故障排除

调试命令

不必要地删除了所跟踪的路由

ASA 上的 SLA 监控

相关信息

简介

静态路由存在一个问题，即没有任何内在机制可确定路由有效还是失效。即使下一跳网关不可用，路由表中也会保留该路由。只有在安全设备上的相关接口失效时，才会从路由表中删除静态路由。为了解决此问题，使用了一种静态路由跟踪功能以跟踪静态路由的可用性，如果该路由失败，则从路由表中将其删除，并将其替换为备份路由。

本文档提供一个示例，介绍如何在 PIX 500 系列安全设备或 ASA 5500 系列自适应安全设备上使用静态路由跟踪功能，以使设备可以使用冗余或备份 Internet 连接。在本示例中，通过静态路由跟踪，安全设备可以在主租用线路失效时使用辅助 Internet 服务提供商 (ISP) 的廉价连接。

为了实现此冗余，安全设备将静态路由与所定义的监控目标相关联。服务水平协议 (SLA) 操作定期采用 Internet 控制消息协议 (ICMP) 的回声请求监控目标。如果未收到回声应答，则将对象视为失效，并从路由表中删除相关路由，并用以前配置的备份路由代替所删除的路由。当使用备份路由时，SLA 监控操作不断尝试访问监控目标。目标再次可用后，将替换路由表中的第一个路由，并删除备份路由。

注意：本文档中描述的配置不能用于负载均衡或负载共享，因为ASA/PIX不支持此配置。此配置仅用于冗余或备份用途。传出流量使用主 ISP，如果主 ISP 失败，则使用辅助 ISP。主 ISP 故障会导致流量临时中断。

先决条件

要求

选择可响应ICMP回应请求的监控目标。目标可以是所选择的任何网络对象，但建议采用与 ISP 连接紧密联系的目标。下面列出了一些可能的监控目标：

- ISP 网关地址

- 由另一个 ISP 管理的地址

- 安全设备需要与之通信的另一个网络上的服务器（如 AAA 服务器）

- 另一个网络上的持久性网络对象（不宜选择晚间可能关闭的桌面或笔记本计算机）

本文档假设安全设备运行完全正常，并配置为允许 Cisco ASDM 对配置做出更改。

注意：有关如何允许ASDM配置设备的信息，请参阅允许ASDM的HTTPS访问。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 软件版本为 7.2(1) 或更高版本的 Cisco PIX 安全设备 515E

- Cisco 自适应安全设备管理器 5.2(1) 或更高版本

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

相关产品

还可以将此配置用于 Cisco ASA 5500 系列安全设备版本 7.2(1)。

注意：在ASA 5505上配置第四个接口时，需要使用backup interface命令。有关详细信息，请参阅备份接口。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

在本示例中，安全设备与 Internet 保持两个连接。第一个连接是通过主 ISP 提供的路由器访问的高速租用线路。第二个连接是通过辅助 ISP 提供的 DSL 调制解调器进行访问的低速数字用户线路 (DSL) 线路。

注意：本示例中不进行负载均衡。

只要租用线路处于活动状态，并且主 ISP 网关可访问，DSL 连接就处于空闲。但是，如果与主 ISP 的连接失效，则安全设备将更改路由表，以便将流量定向到 DSL 连接。静态路由跟踪用于实现此冗余。

为安全设备配置了一条静态路由，用于将所有 Internet 流量定向到主 ISP。SLA 监控进程每 10 秒检查一次，确认主 ISP 网关可访问。如果 SLA 监控进程确定主 ISP 网关不可访问，则从路由表中删除将流量定向到该接口的静态路由。为替换该静态路由，安装了一条备用静态路由，用于将流量定向到辅助 ISP。此备用静态路由通过 DSL 调制解调器将流量定向到辅助 ISP，直到主 ISP 的链路可访问为止。

此配置提供一个相对廉价的方式，以确保安全设备后的用户仍可进行出站 Internet 访问。如本文档所述，此设置可能不适于对安全设备后的资源进行入站访问。需要高级联网技能才能实现无缝入站连接。本文档中不涉及这些技能。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：此配置中使用的IP地址在Internet上无法合法路由。这些地址是在实验室环境中使用的 RFC 1918 地址。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- 命令行界面 (CLI)

- 自适应安全设备管理器 (ASDM)

注意：使用命令查找工具(仅限注册客户)可获取有关本节中使用的命令的详细信息。

CLI 配置

PIX

pix# show running-config

: Saved

:

PIX Version 7.2(1)

!

hostname pix

domain-name default.domain.invalid

enable password 9jNfZuG3TC5tCVH0 encrypted

names

!

interface Ethernet0

nameif outside

security-level 0

ip address 10.200.159.2 255.255.255.248

!

interface Ethernet1

nameif backup

!--- The interface attached to the Secondary ISP. !--- "backup" was chosen here, but any name can be assigned.

security-level 0

ip address 10.250.250.2 255.255.255.248

!

interface Ethernet2

nameif inside

security-level 100

ip address 172.22.1.163 255.255.255.0

!

interface Ethernet3

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet4

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet5

shutdown

no nameif

no security-level

no ip address

!

passwd 2KFQnbNIdI.2KYOU encrypted

ftp mode passive

dns server-group DefaultDNS

domain-name default.domain.invalid

pager lines 24

logging enable

logging buffered debugging

mtu outside 1500

mtu backup 1500

mtu inside 1500

no failover

asdm image flash:/asdm521.bin

no asdm history enable

arp timeout 14400

global (outside) 1 interface

global (backup) 1 interface

nat (inside) 1 172.16.1.0 255.255.255.0

!--- NAT Configuration for Outside and Backup

route outside 0.0.0.0 0.0.0.0 10.200.159.1 1 track 1

!--- Enter this command in order to track a static route. !--- This is the static route to be installed in the routing !--- table while the tracked object is reachable. The value after !--- the keyword "track" is a tracking ID you specify.

route backup 0.0.0.0 0.0.0.0 10.250.250.1 254

!--- Define the backup route to use when the tracked object is unavailable. !--- The administrative distance of the backup route must be greater than !--- the administrative distance of the tracked route. !--- If the primary gateway is unreachable, that route is removed !--- and the backup route is installed in the routing table !--- instead of the tracked route.

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout uauth 0:05:00 absolute

username cisco password ffIRPGpDSOJh9YLq encrypted

http server enable

http 172.22.1.0 255.255.255.0 inside

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

sla monitor 123

type echo protocol ipIcmpEcho 10.0.0.1 interface outside

num-packets 3

frequency 10

!--- Configure a new monitoring process with the ID 123. Specify the !--- monitoring protocol and the target network object whose availability the tracking !--- process monitors. Specify the number of packets to be sent with each poll. !--- Specify the rate at which the monitor process repeats (in seconds).

sla monitor schedule 123 life forever start-time now

!--- Schedule the monitoring process. In this case the lifetime !--- of the process is specified to be forever. The process is scheduled to begin !--- at the time this command is entered. As configured, this command allows the !--- monitoring configuration specified above to determine how often the testing !--- occurs. However, you can schedule this monitoring process to begin in the !--- future and to only occur at specified times.

!

track 1 rtr 123 reachability

!--- Associate a tracked static route with the SLA monitoring process. !--- The track ID corresponds to the track ID given to the static route to monitor: !--- route outside 0.0.0.0 0.0.0.0 10.0.0.2 1 track 1 !--- "rtr" = Response Time Reporter entry. 123 is the ID of the SLA process !--- defined above.

telnet timeout 5

ssh timeout 5

console timeout 0

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum 512

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect netbios

inspect rsh

inspect rtsp

inspect skinny

inspect esmtp

inspect sqlnet

inspect sunrpc

inspect tftp

inspect sip

inspect xdmcp

!

service-policy global_policy global

prompt hostname context

Cryptochecksum:a4a0e9be4593ad43bc17a1cc25e32dc2

: end

ASDM 配置

要用 ASDM 应用程序配置冗余或备份 ISP 支持，请完成以下这些步骤：

1. 在 ASDM 应用程序中，单击 Configuration，然后单击 Interfaces。

2. 从 Interfaces 列表中，选择 Ethernet0，然后单击 Edit。

此时显示以下对话框。

3. 选中 Enable Interface 复选框，并在 Interface Name、Security Level、IP Address 和 Subnet Mask 字段中输入值。

4. 单击 OK 关闭对话框。

5. 根据需要配置其他接口，然后单击 Apply 更新安全设备配置。

6. 单击 ASDM 应用程序左侧的 Routing。

7. 单击 Add 添加新的静态路由。

此时显示以下对话框。

8. 从 Interface Name 下拉列表中选择路由所在的接口，然后配置到达网关的默认路由。在本示例中，10.0.0.1 为 ISP 的主网关，以及要用 ICMP 回声监控的对象。

9. 在 Options 区域中，单击 Tracked 单选按钮，并在 Track ID、SLA ID 和 Track IP Address 字段中输入值。

10. 单击 Monitoring Options。

此时显示以下对话框。

11. 输入频率和其他监控选项的值，然后单击 OK。

12. 添加辅助 ISP 的另一个静态路由，以提供到达 Internet 的路由。

为使其成为辅助路由，请使用更高的度量（例如254）配置此路由。如果主路由（主ISP）发生故障，该路由将从路由表中删除。并在 PIX 路由表中安装此辅助路由（辅助 ISP）。

13. 单击 OK 关闭对话框。

配置显示在 Interface 列表中。

14. 选择路由配置，然后单击 Apply 更新安全设备配置。

验证

使用本部分可确认配置能否正常运行。

确认配置完成

使用以下这些 show 命令验证配置是否完整。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

- show running-config sla monitor — 显示配置中的 SLA 命令。

pix# show running-config sla monitor

sla monitor 123

type echo protocol ipIcmpEcho 10.0.0.1 interface outside

num-packets 3

frequency 10

sla monitor schedule 123 life forever start-time now

- show sla monitor configuration — 显示操作的当前配置设置。

pix# show sla monitor configuration 123

IP SLA Monitor, Infrastructure Engine-II.

Entry number: 123

Owner:

Tag:

Type of operation to perform: echo

Target address: 10.0.0.1

Interface: outside

Number of packets: 3

Request size (ARR data portion): 28

Operation timeout (milliseconds): 5000

Type Of Service parameters: 0x0

Verify data: No

Operation frequency (seconds): 10

Next Scheduled Start Time: Start Time already passed

Group Scheduled : FALSE

Life (seconds): Forever

Entry Ageout (seconds): never

Recurring (Starting Everyday): FALSE

Status of entry (SNMP RowStatus): Active

Enhanced History:

- show sla monitor operational-state — 显示 SLA 操作的运行统计信息。

- 在主 ISP 发生故障之前，正常运行的状态如下：

pix# show sla monitor operational-state 123

Entry number: 123

Modification time: 13:59:37.824 UTC Thu Oct 12 2006

Number of Octets Used by this Entry: 1480

Number of operations attempted: 367

Number of operations skipped: 0

Current seconds left in Life: Forever

Operational state of entry: Active

Last time this entry was reset: Never

Connection loss occurred: FALSE

Timeout occurred: FALSE

Over thresholds occurred: FALSE

Latest RTT (milliseconds): 1

Latest operation start time: 15:00:37.825 UTC Thu Oct 12 2006

Latest operation return code: OK

RTT Values:

RTTAvg: 1       RTTMin: 1       RTTMax: 1

NumOfRTT: 3     RTTSum: 3       RTTSum2: 3

- 在主 ISP 发生故障（和 ICMP 回声超时）之后，正常运行的状态如下：

pix# show sla monitor operational-state

Entry number: 123

Modification time: 13:59:37.825 UTC Thu Oct 12 2006

Number of Octets Used by this Entry: 1480

Number of operations attempted: 385

Number of operations skipped: 0

Current seconds left in Life: Forever

Operational state of entry: Active

Last time this entry was reset: Never

Connection loss occurred: FALSE

Timeout occurred: TRUE

Over thresholds occurred: FALSE

Latest RTT (milliseconds): NoConnection/Busy/Timeout

Latest operation start time: 15:03:27.825 UTC Thu Oct 12 2006

Latest operation return code: Timeout

RTT Values:

RTTAvg: 0       RTTMin: 0       RTTMax: 0

NumOfRTT: 0     RTTSum: 0       RTTSum2: 0

确认安装了备份路由（CLI 方法）

使用 show route 命令确定安装备份路由的时间。

- 在主 ISP 发生故障之前，路由表如下：

pix# show route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.159.1 to network 0.0.0.0

S    64.101.0.0 255.255.0.0 [1/0] via 172.22.1.1, inside

C    172.22.1.0 255.255.255.0 is directly connected, inside

C    10.250.250.0 255.255.255.248 is directly connected, backup

C    10.200.159.0 255.255.255.248 is directly connected, outside

S*   0.0.0.0 0.0.0.0 [1/0] via 10.200.159.1, outside

- 在主 ISP 发生故障之后，删除静态路由，然后安装备份路由，路由表如下：

pix(config)# show route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.250.250.1 to network 0.0.0.0

S    64.101.0.0 255.255.0.0 [1/0] via 172.22.1.1, inside

C    172.22.1.0 255.255.255.0 is directly connected, inside

C    10.250.250.0 255.255.255.248 is directly connected, backup

C    10.200.159.0 255.255.255.248 is directly connected, outside

S*   0.0.0.0 0.0.0.0 [254/0] via 10.250.250.1, backup

确认安装了备份路由（ASDM 方法）

要用 ASDM 确认安装了备份路由，请完成以下这些步骤：

1. 单击 Monitoring，然后单击 Routing。

2. 从 Routing 树中，选择 Routes。

- 在主 ISP 发生故障之前，路由表如下：

DEFAULT 路由通过外部接口指向 10.0.0.2。

- 在主 ISP 发生故障之后，删除该路由，然后安装备份路由。DEFAULT 路由现在通过备份接口指向 10.250.250.1。

故障排除

调试命令

- debug sla monitor trace — 显示回声操作的进度。

- 跟踪的对象（主 ISP 网关）有效，并且 ICMP 回声成功。

IP SLA Monitor(123) Scheduler: Starting an operation

IP SLA Monitor(123) echo operation: Sending an echo operation

IP SLA Monitor(123) echo operation: RTT=3 OK

IP SLA Monitor(123) echo operation: RTT=3 OK

IP SLA Monitor(123) echo operation: RTT=4 OK

IP SLA Monitor(123) Scheduler: Updating result

- 跟踪的对象（主 ISP 网关）失效，并且 ICMP 回声失败。

IP SLA Monitor(123) Scheduler: Starting an operation

IP SLA Monitor(123) echo operation: Sending an echo operation

IP SLA Monitor(123) echo operation: Timeout

IP SLA Monitor(123) echo operation: Timeout

IP SLA Monitor(123) echo operation: Timeout

IP SLA Monitor(123) Scheduler: Updating result

- debug sla monitor error — 显示 SLA 监控进程遇到的错误。

- 跟踪的对象（主 ISP 网关）有效，并且 ICMP 成功。

%PIX-7-609001: Built local-host NP Identity Ifc:10.200.159.2

%PIX-7-609001: Built local-host outside:10.0.0.1

%PIX-6-302020: Built ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/52696 laddr 10.200.159.2/52696

%PIX-6-302021: Teardown ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/52696 laddr 10.200.159.2/52696

%PIX-7-609002: Teardown local-host NP Identity Ifc:10.200.159.2 duration

0:00:00

%PIX-7-609002: Teardown local-host outside:10.0.0.1 duration 0:00:00

%PIX-7-609001: Built local-host NP Identity Ifc:10.200.159.2

%PIX-7-609001: Built local-host outside:10.0.0.1

%PIX-6-302020: Built ICMP connection for faddr 10.0.0.1/0 gaddr

0.200.159.2/52697 laddr 10.200.159.2/52697

%PIX-6-302021: Teardown ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/52697 laddr 10.200.159.2/52697

%PIX-7-609002: Teardown local-host NP Identity Ifc:10.200.159.2

duration 0:00:00

%PIX-7-609002: Teardown local-host outside:10.0.0.1 duration 0:00:00

- 跟踪的对象（主 ISP 网关）失效，并且删除了所跟踪的路由。

%PIX-7-609001: Built local-host NP Identity Ifc:10.200.159.2

%PIX-7-609001: Built local-host outside:10.0.0.1

%PIX-6-302020: Built ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6405 laddr 10.200.159.2/6405

%PIX-6-302020: Built ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6406 laddr 10.200.159.2/6406

%PIX-6-302020: Built ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6407 laddr 10.200.159.2/6407

%PIX-6-302021: Teardown ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6405 laddr 10.200.159.2/6405

%PIX-6-302021: Teardown ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6406 laddr 10.200.159.2/6406

%PIX-6-302021: Teardown ICMP connection for faddr 10.0.0.1/0 gaddr

10.200.159.2/6407 laddr 10.200.159.2/6407

%PIX-7-609002: Teardown local-host NP Identity Ifc:10.200.159.2

duration 0:00:02

%PIX-7-609002: Teardown local-host outside:10.0.0.1 duration 0:00:02

%PIX-6-622001: Removing tracked route 0.0.0.0 0.0.0.0 10.200.159.1,

distance 1, table Default-IP-Routing-Table, on interface

outside

!--- 10.0.0.1 is unreachable, so the route to the Primary ISP is removed.

不必要地删除了所跟踪的路由

如果不必要地删除了所跟踪的路由，请确保监控目标始终可供接收回声请求。此外，请确保监控目标状态（即目标是否可访问）与主 ISP 连接的状态紧密相关。

如果选择的监控目标比 ISP 网关还要远，则沿该路由的另一条链路可能发生故障或另一个设备可能产生干扰。此配置可能造成 SLA 监控断定与主 ISP 的连接发生故障，并造成安全设备不必要地故障转移到辅助 ISP 链路。

例如，如果选择分支机构路由器作为监控目标，则 ISP 与分支机构的连接以及沿路的任何其他链路可能发生故障。监控操作发送的 ICMP 回声失败后，将删除所跟踪的主路由，即使主 ISP 链路仍有效也是如此。

在本示例中，用作监控目标的主 ISP 网关由 ISP 管理，并位于 ISP 链路的另一端。此配置可确保如果监控操作发送的 ICMP 回声失败，则 ISP 链路几乎无疑地处于失效状态。

ASA 上的 SLA 监控

问题：

ASA 升级到 8.0 版之后，SLA 监控不起作用。

解决方案：

问题可能是由于在 OUTSIDE 接口中配置了 IP Reverse-Path 命令。删除 ASA 中的该命令，并尝试检查 SLA 监控。

相关信息

- 配置静态路由跟踪

- PIX/ASA 7.2 命令参考

- Cisco ASA 5500 系列安全设备

- Cisco PIX 500 系列安全设备

- 技术支持和文档 - Cisco Systems