目录

简介

先决条件

要求

使用的组件

背景信息

配置

IGMP基础知识

任务1 — 控制平面组播流量

任务2 — 配置基本组播

IGMP 侦听

任务3 - IGMP静态组与IGMP加入组

igmp static-group

igmp join-group

任务4 — 配置IGMP末节组播路由

已知问题

过滤目标区域上的组播流量

当超过IGMP接口限制时，防火墙会拒绝IGMP报告

防火墙忽略232.x.x.x/8地址范围的IGMP报告

相关信息

简介

本文档介绍组播的基础知识，以及Firepower威胁防御(FTD)如何实施互联网组管理协议(IGMP)。

先决条件

要求

基本IP路由知识。

使用的组件

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

本文内容也适用于自适应安全设备(ASA)软件。

本文档中的信息基于以下软件和硬件版本：

- 思科Firepower 4125威胁防御版本7.1.0。

- Firepower管理中心(FMC)版本7.1.0。

- ASA 9.19.1 版.

背景信息

定义

- 单播=从一台主机到另一台主机（一对一）。

- 广播=从一台主机到所有可能的主机（一对全）。

- 组播=从一组主机的主机到一组主机（一对多或多对多）。

- 任播=从主机到组的最近主机（一对多对一）。

基本信息

- 组播RFC 988由Steve Deering于1986年编写。

- IPv4组播使用的范围是224.0.0.0/4（前4位1110） — 224.0.0.0 - 239.255.255.255。

- 对于IPv4，第2层MAC地址来自第3层组播IP:01005e（24位）+第25位，始终为0 +组播IPv4地址的低23位。

- IPv6组播使用范围FF00::/8，它比IPv4组播更灵活，因为它可以嵌入交汇点(RP)IP。

- 对于IPv6,L2 MAC地址来自L3组播：333 + 32位组播IPv6地址。

- 组播优势：由于源上的负载减少，效率提高。性能，因为它避免了流量重复或泛洪。

- 组播的缺点：传输不可靠（基于UDP）、无拥塞避免、传输顺序不当。

- 公共互联网不支持组播，因为它需要路径中的所有设备才能启用组播。通常，当所有设备都受同一管理权限管理时使用。

- 典型组播应用：内部视频流、视频会议。

组播与复制单播

在复制单播中，源创建同一单播数据包（副本）的多个副本，并将它们发送到多个目标主机。组播将负担从源主机转移到网络，而在复制单播中，所有工作都在源主机上完成。

配置

IGMP基础知识

- IGMP是组播接收器和本地L3设备（通常为路由器）之间的“语言”。

- IGMP是第3层协议（与ICMP类似），使用IP协议编号2。

- 当前有3个IGMP版本。防火墙上的默认IGMP版本是版本2。当前仅支持版本1和2。

- IGMPv1和IGMPv2之间的主要区别如下：

- IGMPv1没有离开组消息。

- IGMPv1没有特定于组的查询（当主机离开组播组时，防火墙会使用它）。

- IGMPv1没有查询器选举过程。

- ASA/FTD目前不支持IGMPv3，但作为参考，IGMPv2和IGMPv3之间的重要区别在于IGMPv3中包含组和源特定查询，该查询用于源特定组播(SSM)。

- IGMPv1/IGMPv2/IGMPv3查询= 224.0.0.1

IGMPv2离开= 224.0.0.2

IGMPv3成员报告= 224.0.0.22

- 如果主机要加入，可以发送未经请求的IGMP成员身份报告消息：

- 从防火墙的角度来看，IGMP查询有两种类型：常规查询和特定组的查询

- 当防火墙收到IGMP离开组消息时，它必须检查该子网上是否有该组的其它成员。因此，防火墙会发送组特定查询：

- 在有多台路由器/防火墙的子网上，选择querier（发送所有IGMP查询的设备）：

firepower# show igmp interface INSIDE

INSIDE is up, line protocol is up

Internet address is 192.168.1.97/24

IGMP is enabled on interface

Current IGMP version is 2

IGMP query interval is 125 seconds

IGMP querier timeout is 60 seconds

IGMP max query response time is 10 seconds

Last member query response interval is 1 seconds

Inbound IGMP access group is:

IGMP limit is 500, currently active joins: 2

Cumulative IGMP activity: 21 joins, 20 leaves

IGMP querying router is 192.168.1.97 (this system)  <-- IGMP querier

- 在FTD上（类似于传统ASA），您可以启用debug igmp以查看与IGMP相关的消息：

firepower# debug igmp

IGMP debugging is on

IGMP: Received v2 Query on DMZ from 192.168.6.1

IGMP: Received v2 Report on INSIDE from 192.168.1.50 for 239.255.255.250   <-- Received an IGMP packet

IGMP: group_db: add new group 239.255.255.250 on INSIDE

IGMP: MRIB updated (*,239.255.255.250) : Success

IGMP: Switching to EXCLUDE mode for 239.255.255.250 on INSIDE

IGMP: Updating EXCLUDE group timer for 239.255.255.250

IGMP: Received v2 Report on INSIDE from 192.168.1.50 for 230.10.10.10

IGMP: group_db: add new group 230.10.10.10 on INSIDE

IGMP: MRIB updated (*,230.10.10.10) : Success

IGMP: Switching to EXCLUDE mode for 230.10.10.10 on INSIDE

IGMP: Updating EXCLUDE group timer for 230.10.10.10

IGMP: Send v2 general Query on INSIDE

IGMP: Received v2 Query on INSIDE from 192.168.1.97

IGMP: Send v2 general Query on OUTSIDE

IGMP: Received v2 Query on OUTSIDE from 192.168.103.91

IGMP: Received v2 Report on INSIDE from 192.168.1.50 for 239.255.255.250

IGMP: Updating EXCLUDE group timer for 239.255.255.250

IGMP: Received v2 Report on INSIDE from 192.168.1.50 for 230.10.10.10

IGMP: Updating EXCLUDE group timer for 230.10.10.10

- 主机通常使用离开组消息(IGMPv2)离开组播组。

任务1 — 控制平面组播流量

在FTD和ASA之间配置OSPFv2和OSPFv3。检查2台设备如何处理OSPF生成的L2和L3组播流量。

解决方案

OSPFv2配置

同样，对于OSPFv3

FTD CLI上的配置：

router ospf 1

network 192.168.103.0 255.255.255.0 area 0

log-adj-changes

!

ipv6 router ospf 1

no graceful-restart helper

log-adjacency-changes

!

interface Ethernet1/4

nameif OUTSIDE

security-level 0

ip address 192.168.103.91 255.255.255.0

ipv6 address fc00:103::91/64

ospf authentication null

ipv6 ospf 1 area 0

配置会在FTD加速安全路径(ASP)允许表中创建以下条目，以便入口组播流量不会被阻止：

firepower# show asp table classify domain permit

...

in id=0x14f922db85f0, priority=13, domain=permit, deny=false         <-- permit the packets

hits=1, user_data=0x0, cs_id=0x0, reverse, flags=0x0, protocol=89

src ip/id=0.0.0.0, mask=0.0.0.0, port=0, tag=any

dst ip/id=224.0.0.5, mask=255.255.255.255, port=0, tag=any, dscp=0x0, nsg_id=none     <-- OSPF for IPv4

input_ifc=OUTSIDE(vrfid:0), output_ifc=identity(vrfid:0)     <-- ingress interface

in id=0x14f922db9350, priority=13, domain=permit, deny=false         <-- permit the packets

hits=0, user_data=0x0, cs_id=0x0, reverse, flags=0x0, protocol=89

src ip/id=0.0.0.0, mask=0.0.0.0, port=0, tag=any

dst ip/id=224.0.0.6, mask=255.255.255.255, port=0, tag=any, dscp=0x0, nsg_id=none     <-- OSPF for IPv4

input_ifc=OUTSIDE(vrfid:0), output_ifc=identity(vrfid:0)     <-- ingress interface

对于IPv6:

...

in id=0x14f923fb16f0, priority=13, domain=permit, deny=false      <-- permit the packets

hits=1, user_data=0x0, cs_id=0x0, reverse, flags=0x0, protocol=89

src ip/id=::/0, port=0, tag=any

dst ip/id=ff02::5/128, port=0, tag=any, , nsg_id=none     <-- OSPF for IPv6

input_ifc=OUTSIDE(vrfid:0), output_ifc=identity(vrfid:0)  <-- ingress interface

in id=0x14f66e9d4780, priority=13, domain=permit, deny=false      <-- permit the packets

hits=0, user_data=0x0, cs_id=0x0, reverse, flags=0x0, protocol=89

src ip/id=::/0, port=0, tag=any

dst ip/id=ff02::6/128, port=0, tag=any, , nsg_id=none     <-- OSPF for IPv6

input_ifc=OUTSIDE(vrfid:0), output_ifc=identity(vrfid:0)  <-- ingress interface

...

OSPFv2和OSPFv3邻接关系为UP:

firepower# show ospf neighbor

Neighbor ID Pri State Dead Time Address Interface

192.168.103.50 1 FULL/BDR 0:00:35 192.168.103.50 OUTSIDE   <-- OSPF neighbor is up

firepower# show ipv6 ospf neighbor

Neighbor ID Pri State Dead Time Interface ID Interface

192.168.103.50 1 FULL/BDR 0:00:34 3267035482 OUTSIDE       <-- OSPF neighbor is up

以下是终止到该设备的组播OSPF会话：

firepower# show conn all | include OSPF

OSPF OUTSIDE fe80::2be:75ff:fef6:1d8e NP Identity Ifc ff02::5, idle 0:00:09, bytes 5924, flags

OSPF OUTSIDE 192.168.103.50 NP Identity Ifc 224.0.0.5, idle 0:00:03, bytes 8904, flags

OSPF OUTSIDE ff02::5 NP Identity Ifc fe80::f6db:e6ff:fe33:442e, idle 0:00:01, bytes 6304, flags

OSPF OUTSIDE 224.0.0.5 NP Identity Ifc 192.168.103.91, idle 0:00:00, bytes 25220, flags

作为测试，启用IPv4捕获并清除与设备的连接：

firepower# capture CAP interface OUTSIDE trace

firepower# clear conn all

12 connection(s) deleted.

firepower# clear capture CAP

firepower# !

警告：这会导致中断！显示的示例仅用于演示目的！

捕获的OSPF数据包：

firepower# show capture CAP | include proto-89

1: 12:25:33.142189 192.168.103.50 > 224.0.0.5 ip-proto-89, length 60

2: 12:25:33.702691 192.168.103.91 > 224.0.0.5 ip-proto-89, length 60

7: 12:25:36.317000 192.168.206.100 > 224.0.0.5 ip-proto-89, length 56

8: 12:25:36.952587 fe80::2be:75ff:fef6:1d8e > ff02::5 ip-proto-89 40 [flowlabel 0xe] [hlim 1]

12: 12:25:41.282608 fe80::f6db:e6ff:fe33:442e > ff02::5 ip-proto-89 40 [flowlabel 0xe] [hlim 1]

以下是防火墙处理OSPFv2组播数据包的方式：

firepower# show capture CAP packet-number 1 trace

115 packets captured

1: 12:25:33.142189 192.168.103.50 > 224.0.0.5 ip-proto-89, length 60    <-- The first packet of the flow

Phase: 1

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 6344 ns

Config:

Additional Information:

MAC Access list

Phase: 2

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 6344 ns

Config:

Implicit Rule

Additional Information:

MAC Access list

Phase: 3

Type: ROUTE-LOOKUP

Subtype: No ECMP load balancing

Result: ALLOW

Elapsed time: 10736 ns

Config:

Additional Information:

Destination is locally connected. No ECMP load balancing.

Found next-hop 192.168.103.50 using egress ifc OUTSIDE(vrfid:0)

Phase: 4

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 5205 ns

Config:

Implicit Rule

Additional Information:

Phase: 5

Type: NAT

Subtype: per-session

Result: ALLOW

Elapsed time: 5205 ns

Config:

Additional Information:

Phase: 6

Type: IP-OPTIONS

Subtype:

Result: ALLOW

Elapsed time: 5205 ns

Config:

Additional Information:

Phase: 7

Type: CLUSTER-REDIRECT

Subtype: cluster-redirect

Result: ALLOW

Elapsed time: 29280 ns

Config:

Additional Information:

Phase: 8

Type: MULTICAST

Subtype:

Result: ALLOW

Elapsed time: 976 ns

Config:

Additional Information:

Phase: 9

Type: OSPF                   <-- The OSPF process

Subtype: ospf

Result: ALLOW

Elapsed time: 488 ns

Config:

Additional Information:

Phase: 10

Type: FLOW-CREATION

Subtype:

Result: ALLOW

Elapsed time: 13176 ns

Config:

Additional Information:

New flow created with id 620, packet dispatched to next module

Result:

input-interface: OUTSIDE(vrfid:0)

input-status: up

input-line-status: up

output-interface: OUTSIDE(vrfid:0)

output-status: up

output-line-status: up

Action: allow

Time Taken: 82959 ns

以下是防火墙处理OSPFv3组播数据包的方式：

firepower# show capture CAP packet-number 8 trace

274 packets captured

8: 12:25:36.952587 fe80::2be:75ff:fef6:1d8e > ff02::5 ip-proto-89 40 [flowlabel 0xe] [hlim 1]  <-- The first packet of the flow

Phase: 1

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 7564 ns

Config:

Additional Information:

MAC Access list

Phase: 2

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 7564 ns

Config:

Implicit Rule

Additional Information:

MAC Access list

Phase: 3

Type: ROUTE-LOOKUP

Subtype: No ECMP load balancing

Result: ALLOW

Elapsed time: 8296 ns

Config:

Additional Information:

Destination is locally connected. No ECMP load balancing.

Found next-hop ff02::5 using egress ifc identity(vrfid:0)

Phase: 4

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 8784 ns

Config:

Implicit Rule

Additional Information:

Phase: 5

Type: NAT

Subtype: per-session

Result: ALLOW

Elapsed time: 8784 ns

Config:

Additional Information:

Phase: 6

Type: CLUSTER-REDIRECT

Subtype: cluster-redirect

Result: ALLOW

Elapsed time: 27816 ns

Config:

Additional Information:

Phase: 7

Type: OSPF                    <-- The OSPF process

Subtype: ospf

Result: ALLOW

Elapsed time: 976 ns

Config:

Additional Information:

Phase: 8

Type: FLOW-CREATION

Subtype:

Result: ALLOW

Elapsed time: 13664 ns

Config:

Additional Information:

New flow created with id 624, packet dispatched to next module

Result:

input-interface: OUTSIDE(vrfid:0)

input-status: up

input-line-status: up

output-interface: NP Identity Ifc

Action: allow

Time Taken: 83448 ns

任务2 — 配置基本组播

拓扑

要求

配置防火墙，以便将来自服务器的组播流量流传输到IP 230.10.10.10上的组播客户端

解决方案

从防火墙角度来看，最低配置是全局启用组播路由。这将在所有防火墙接口上启用后台IGMP和PIM。

在FMC UI上：

在防火墙CLI上，这是推送的配置：

firepower# show run multicast-routing

multicast-routing                   <-- Multicast routing is enabled

IGMP验证

firepower# show igmp interface

diagnostic is up, line protocol is up

Internet address is 0.0.0.0/0

IGMP is disabled on interface

INSIDE is up, line protocol is up          <-- The interface is UP

Internet address is 192.168.1.24/24

IGMP is enabled on interface             <-- IGMP is enabled on the interface

Current IGMP version is 2                <-- IGMP version

IGMP query interval is 125 seconds

IGMP querier timeout is 255 seconds

IGMP max query response time is 10 seconds

Last member query response interval is 1 seconds

Inbound IGMP access group is:

IGMP limit is 500, currently active joins: 1

Cumulative IGMP activity: 4 joins, 3 leaves

IGMP querying router is 192.168.1.24 (this system)

OUTSIDE is up, line protocol is up         <-- The interface is UP

Internet address is 192.168.103.91/24

IGMP is enabled on interface             <-- IGMP is enabled on the interface

Current IGMP version is 2                <-- IGMP version

IGMP query interval is 125 seconds

IGMP querier timeout is 255 seconds

IGMP max query response time is 10 seconds

Last member query response interval is 1 seconds

Inbound IGMP access group is:

IGMP limit is 500, currently active joins: 1

Cumulative IGMP activity: 1 joins, 0 leaves

IGMP querying router is 192.168.103.91 (this system)

firepower# show igmp group

IGMP Connected Group Membership

Group Address Interface Uptime Expires Last Reporter

239.255.255.250 INSIDE 00:09:05 00:03:19 192.168.1.50

239.255.255.250 OUTSIDE 00:06:01 00:02:33 192.168.103.60

firepower# show igmp traffic

IGMP Traffic Counters

Elapsed time since counters cleared: 03:40:48 Received Sent

Received     Sent

Valid IGMP Packets            21           207

Queries                       0            207

Reports                       15           0       <-- IGMP Reports received and sent

Leaves                        6            0

Mtrace packets                0            0

DVMRP packets                 0            0

PIM packets                   0            0

Errors:

Malformed Packets             0

Martian source                0

Bad Checksums                 0

PIM验证

firepower# show pim interface

Address          Interface          PIM  Nbr   Hello  DR         DR

Count Intvl  Prior

0.0.0.0          diagnostic         off  0     30     1          not elected

192.168.1.24     INSIDE             on   0     30     1          this system

192.168.103.91   OUTSIDE            on   0     30     1          this system

MFIB验证

firepower# show mfib

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second

Other counts: Total/RPF failed/Other drops

Interface Flags: A - Accept, F - Forward, NS - Negate Signalling

IC - Internal Copy, NP - Not platform switched

SP - Signal Present

Interface Counts: FS Pkt Count/PS Pkt Count

(*,224.0.1.39) Flags: S K

Forwarding: 0/0/0/0, Other: 0/0/0   <-- The Forwarding counters are: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second

(*,224.0.1.40) Flags: S K

Forwarding: 0/0/0/0, Other: 8/8/0   <-- The Other counters are: Total/RPF failed/Other drops

(*,232.0.0.0/8) Flags: K

Forwarding: 0/0/0/0, Other: 0/0/0

通过防火墙的组播流量

在这种情况下，VLC媒体播放器应用用作组播服务器和客户端来测试组播流量：

VLC组播服务器配置：

在下一个屏幕上，选择Next。

选择格式：

指定组播IP和端口：

在FTD防火墙上启用LINA捕获：

firepower# capture INSIDE interface INSIDE match ip host 192.168.103.60 host 230.10.10.10

firepower# capture OUTSIDE interface OUTSIDE trace match ip host 192.168.103.60 host 230.10.10.10

为设备选择流按钮以启动组播流：

启用“loop”选项，以便连续发送流：

验证（非操作场景）

此场景演示了一个非操作场景。目标是演示防火墙行为。

防火墙设备获取组播流，但不转发它：

firepower# show capture

capture INSIDE type raw-data interface INSIDE [Capturing - 0 bytes]     <-- No packets sent or received

match ip host 192.168.103.60 host 230.10.10.10

capture OUTSIDE type raw-data trace interface OUTSIDE [Buffer Full - 524030 bytes]  <-- The buffer is full

match ip host 192.168.103.60 host 230.10.10.10

Firewall LINA ASP drops显示：

firepower# clear asp drop

firepower# show asp drop

Frame drop:

Punt rate limit exceeded (punt-rate-limit)                         232  <-- The multicast packets were dropped

Flow is denied by configured rule (acl-drop)                         2

FP L2 rule drop (l2_acl)                                             2

Last clearing: 18:38:42 UTC Oct 12 2018 by enable_15

Flow drop:

Last clearing: 08:45:41 UTC May 17 2022 by enable_15

要跟踪数据包，需要捕获组播流的第一个数据包。因此，请清除当前流量：

firepower# clear capture OUTSIDE

firepower# clear conn all addr 230.10.10.10

2 connection(s) deleted.

firepower# show capture OUTSIDE

379 packets captured

1: 08:49:04.537875 192.168.103.60.54100 > 230.10.10.10.5005: udp 64

2: 08:49:04.537936 192.168.103.60.54099 > 230.10.10.10.5004: udp 1328

3: 08:49:04.538027 192.168.103.60.54099 > 230.10.10.10.5004: udp 1328

4: 08:49:04.538058 192.168.103.60.54099 > 230.10.10.10.5004: udp 1328

5: 08:49:04.538058 192.168.103.60.54099 > 230.10.10.10.5004: udp 1328

6: 08:49:04.538073 192.168.103.60.54099 > 230.10.10.10.5004: udp 1328

...

“detail”选项显示组播MAC地址：

firepower# show capture OUTSIDE detail

379 packets captured

1: 08:49:04.537875 0050.569d.344a 0100.5e0a.0a0a 0x0800 Length: 106

192.168.103.60.54100 > 230.10.10.10.5005: [udp sum ok] udp 64 (ttl 100, id 19759)

2: 08:49:04.537936 0050.569d.344a 0100.5e0a.0a0a 0x0800 Length: 1370

192.168.103.60.54099 > 230.10.10.10.5004: [udp sum ok] udp 1328 (ttl 100, id 19760)

3: 08:49:04.538027 0050.569d.344a 0100.5e0a.0a0a 0x0800 Length: 1370

192.168.103.60.54099 > 230.10.10.10.5004: [udp sum ok] udp 1328 (ttl 100, id 19761)

...

实际数据包的跟踪显示数据包被允许，但实际发生的情况并非如此：

firepower# show capture OUTSIDE packet-number 1 trace

379 packets captured

1: 08:49:04.537875 192.168.103.60.54100 > 230.10.10.10.5005: udp 64

Phase: 1

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 11712 ns

Config:

Additional Information:

MAC Access list

Phase: 2

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 11712 ns

Config:

Implicit Rule

Additional Information:

MAC Access list

Phase: 3

Type: ROUTE-LOOKUP

Subtype: No ECMP load balancing

Result: ALLOW

Elapsed time: 7808 ns

Config:

Additional Information:

Destination is locally connected. No ECMP load balancing.

Found next-hop 192.168.103.60 using egress ifc OUTSIDE(vrfid:0)

Phase: 4

Type: ACCESS-LIST

Subtype: log

Result: ALLOW

Elapsed time: 5246 ns

Config:

access-group CSM_FW_ACL_ global

access-list CSM_FW_ACL_ advanced permit ip any any rule-id 268434432

access-list CSM_FW_ACL_ remark rule-id 268434432: ACCESS POLICY: mzafeiro_empty - Default

access-list CSM_FW_ACL_ remark rule-id 268434432: L4 RULE: DEFAULT ACTION RULE

Additional Information:

This packet will be sent to snort for additional processing where a verdict will be reached

Phase: 5

Type: CONN-SETTINGS

Subtype:

Result: ALLOW

Elapsed time: 5246 ns

Config:

class-map class-default

match any

policy-map global_policy

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

service-policy global_policy global

Additional Information:

Phase: 6

Type: NAT

Subtype: per-session

Result: ALLOW

Elapsed time: 5246 ns

Config:

Additional Information:

Phase: 7

Type: IP-OPTIONS

Subtype:

Result: ALLOW

Elapsed time: 5246 ns

Config:

Additional Information:

Phase: 8

Type: CLUSTER-REDIRECT

Subtype: cluster-redirect

Result: ALLOW

Elapsed time: 31232 ns

Config:

Additional Information:

Phase: 9

Type: MULTICAST       <-- multicast process

Subtype:

Result: ALLOW

Elapsed time: 976 ns

Config:

Additional Information:

Phase: 10

Type: FLOW-CREATION   <-- the packet belongs to a new flow

Subtype:

Result: ALLOW

Elapsed time: 20496 ns

Config:

Additional Information:

New flow created with id 3705, packet dispatched to next module

Result:

input-interface: OUTSIDE(vrfid:0)

input-status: up

input-line-status: up

output-interface: OUTSIDE(vrfid:0)

output-status: up

output-line-status: up

Action: allow            <-- The packet is allowed

Time Taken: 104920 ns

根据mroute和mfib计数器，数据包被丢弃，因为传出接口列表(OIL)为空：

firepower# show mroute

Multicast Routing Table

Flags: D - Dense, S - Sparse, B - Bidir Group, s - SSM Group,

C - Connected, L - Local, I - Received Source Specific Host Report,

P - Pruned, R - RP-bit set, F - Register flag, T - SPT-bit set,

J - Join SPT

Timers: Uptime/Expires

Interface state: Interface, State

(192.168.103.60, 230.10.10.10), 00:01:33/00:01:56, flags: SPF

Incoming interface: OUTSIDE

RPF nbr: 192.168.103.60

Outgoing interface list: Null        <-- The OIL is empty!

(*, 239.255.255.250), 00:01:50/never, RP 0.0.0.0, flags: SCJ

Incoming interface: Null

RPF nbr: 0.0.0.0

Immediate Outgoing interface list:

INSIDE, Forward, 00:01:50/never

MFIB计数器显示RPF故障，在本例中，RPF故障并不是实际发生的情况：

firepower# show mfib 230.10.10.10

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

firepower# show mfib 230.10.10.10

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second   <-- Multicast forwarding counters

Other counts: Total/RPF failed/Other drops            <-- Multicast drop counters

Interface Flags: A - Accept, F - Forward, NS - Negate Signalling

IC - Internal Copy, NP - Not platform switched

SP - Signal Present

Interface Counts: FS Pkt Count/PS Pkt Count

(192.168.103.60,230.10.10.10) Flags: K

Forwarding: 0/0/0/0, Other: 650/650/0       <-- Allowed and dropped multicast packets

“show mfib count”输出中的类似RPF故障：

firepower# show mfib count

IP Multicast Statistics

8 routes, 4 groups, 0.25 average sources per group

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kilobits per second

Other counts: Total/RPF failed/Other drops(OIF-null, rate-limit etc)

Group: 224.0.1.39

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 224.0.1.40

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 230.10.10.10

Source: 192.168.103.60,

Forwarding: 0/0/0/0, Other: 1115/1115/0   <-- Allowed and dropped multicast packets

Tot. shown: Source count: 1, pkt count: 0

Group: 232.0.0.0/8

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 239.255.255.250

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

配置VLC组播接收器：

指定组播源IP并选择播放：

在后端中，只要选择播放，主机就会宣布愿意加入特定组播组并发送IGMP报告消息：

如果启用调试，您可以看到IGMP报告消息：

firepower# debug igmp group 230.10.10.10

IGMP: Received v2 Report on INSIDE from 192.168.1.50 for 230.10.10.10  <-- IGMPv2 Report received

IGMP: group_db: add new group 230.10.10.10 on INSIDE

IGMP: MRIB updated (*,230.10.10.10) : Success

IGMP: Switching to EXCLUDE mode for 230.10.10.10 on INSIDE

IGMP: Updating EXCLUDE group timer for 230.10.10.10

数据流开始于：

验证（操作场景）

firepower# show capture

capture INSIDE type raw-data interface INSIDE [Buffer Full - 524156 bytes]    <-- Multicast packets on the egress interface

match ip host 192.168.103.60 host 230.10.10.10

capture OUTSIDE type raw-data trace interface OUTSIDE [Buffer Full - 524030 bytes]   <-- Multicast packets on the ingress interface

match ip host 192.168.103.60 host 230.10.10.10

防火墙的mroute表

firepower# show mroute

Multicast Routing Table

Flags: D - Dense, S - Sparse, B - Bidir Group, s - SSM Group,

C - Connected, L - Local, I - Received Source Specific Host Report,

P - Pruned, R - RP-bit set, F - Register flag, T - SPT-bit set,

J - Join SPT

Timers: Uptime/Expires

Interface state: Interface, State

(*, 230.10.10.10), 00:00:34/never, RP 0.0.0.0, flags: SCJ

Incoming interface: Null

RPF nbr: 0.0.0.0

Immediate Outgoing interface list:

INSIDE, Forward, 00:00:34/never

(192.168.103.60, 230.10.10.10), 00:01:49/00:03:29, flags: SFJT

Incoming interface: OUTSIDE

RPF nbr: 192.168.103.60

Inherited Outgoing interface list:

INSIDE, Forward, 00:00:34/never        <-- The OIL shows an interface

firepower# show mfib 230.10.10.10

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second

Other counts: Total/RPF failed/Other drops

Interface Flags: A - Accept, F - Forward, NS - Negate Signalling

IC - Internal Copy, NP - Not platform switched

SP - Signal Present

Interface Counts: FS Pkt Count/PS Pkt Count

(*,230.10.10.10) Flags: C K

Forwarding: 0/0/0/0, Other: 0/0/0

INSIDE Flags: F NS

Pkts: 0/0

(192.168.103.60,230.10.10.10) Flags: K

Forwarding: 6373/0/1354/0, Other: 548/548/0      <-- There are multicast packets forwarded

OUTSIDE Flags: A

INSIDE Flags: F NS

Pkts: 6373/6

mfib计数器：

firepower# show mfib count

IP Multicast Statistics

10 routes, 5 groups, 0.40 average sources per group

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kilobits per second

Other counts: Total/RPF failed/Other drops(OIF-null, rate-limit etc)

Group: 224.0.1.39

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 224.0.1.40

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 230.10.10.10

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Source: 192.168.103.60,

Forwarding: 7763/0/1354/0, Other: 548/548/0   <-- There are multicast packets forwarded

Tot. shown: Source count: 1, pkt count: 0

Group: 232.0.0.0/8

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Group: 239.255.255.250

RP-tree:

Forwarding: 0/0/0/0, Other: 0/0/0

Source: 192.168.1.50,

Forwarding: 7/0/500/0, Other: 0/0/0

Tot. shown: Source count: 1, pkt count: 0

IGMP 侦听

- IGMP监听是交换机上使用的一种机制，用于防止组播泛洪。

- 交换机监控IGMP报告，以确定主机（接收器）的位置。

- 交换机监控IGMP查询，以确定路由器/防火墙（发送方）位于何处。

- IGMP监听在大多数思科交换机上默认启用。有关详细信息，请查看相关的交换指南。以下是L3 Catalyst交换机的输出示例：

switch# show ip igmp snooping statistics

Current number of Statistics entries    : 15

Configured Statistics database limit    : 32000

Configured Statistics database threshold: 25600

Configured Statistics database limit    : Not exceeded

Configured Statistics database threshold: Not exceeded

Snooping statistics for Vlan204

#channels: 3

#hosts   : 5

Source/Group                    Interface       Reporter        Uptime   Last-Join Last-Leave

0.0.0.0/230.10.10.10            Vl204:Gi1/48    192.168.1.50    2d13h        -     2d12h

0.0.0.0/230.10.10.10            Vl204:Gi1/48    192.168.1.97    2d13h    2d12h         -

0.0.0.0/230.10.10.10            Vl204:Gi2/1     192.168.1.50    2d10h    02:20:05  02:20:00

0.0.0.0/239.255.255.250         Vl204:Gi2/1     192.168.1.50    2d11h    02:20:05  02:20:00

0.0.0.0/239.255.255.250         Vl204:Gi2/1     192.168.2.50    2d14h    2d13h         -

0.0.0.0/239.255.255.250         Vl204:Gi2/1     192.168.6.50    2d13h        -     2d13h

0.0.0.0/224.0.1.40              Vl204:Gi2/26    192.168.2.1     2d14h    00:00:39  2d13h

Snooping statistics for Vlan206

#channels: 4

#hosts   : 3

Source/Group                    Interface       Reporter        Uptime   Last-Join Last-Leave

0.0.0.0/230.10.10.10            Vl206:Gi1/48    192.168.6.91    00:30:15 2d13h     2d13h

0.0.0.0/239.10.10.10            Vl206:Gi1/48    192.168.6.91    2d14h    2d13h         -

0.0.0.0/239.255.255.250         Vl206:Gi2/1     192.168.6.50    2d12h    00:52:49  00:52:45

0.0.0.0/224.0.1.40              Vl206:Gi2/26    192.168.6.1     00:20:10 2d13h     2d13h

0.0.0.0/230.10.10.10            Vl206:Gi2/26    192.168.6.1     2d13h    2d13h         -

0.0.0.0/230.10.10.10            Vl206:Gi2/26    192.168.6.91    2d13h        -     2d13h

0.0.0.0/239.10.10.10            Vl206:Gi2/26    192.168.6.1     2d14h    2d14h         -

0.0.0.0/239.10.10.10            Vl206:Gi2/26    192.168.6.91    2d14h        -     2d14h

任务3 - IGMP静态组与IGMP加入组

概述

ip igmp static-group

ip igmp join-group

是否应用于FTD接口？

Yes

Yes

FTD是否吸引组播流？

是，PIM加入发送到上游设备。源或交汇点(RP)。仅当使用此命令的FTD是该接口上的PIM指定路由器(DR)时，才会出现这种情况。

是，PIM加入发送到上游设备。源或交汇点(RP)。仅当使用此命令的FTD是该接口上的PIM指定路由器(DR)时，才会出现这种情况。

FTD是否将组播流量从接口转发出去？

Yes

Yes

FTD是否消耗并回复组播流量

无

是，FTD将组播流传送到CPU，使用它，然后回复源。

CPU影响

最小，因为数据包未传送到CPU。

可以影响FTD CPU，因为属于组的每个组播数据包都会被传送到FTD CPU。

任务要求

请思考以下拓扑：

在防火墙上启用以下捕获：

firepower# capture CAPI interface OUTSIDE trace match icmp host 192.168.103.62 any

firepower# capture CAPO interface INSIDE match icmp host 192.168.103.62 any

1. 使用来自L3交换机的ICMP ping将组播流量发送到IP 230.11.11.11，并检查防火墙如何处理该流量。

2. 在防火墙INSIDE接口上启用igmp static-group命令，并检查防火墙如何处理组播流(IP 230.11.11.11)。

3. 在防火墙INSIDE接口上启用igmp static-group命令，并检查防火墙如何处理组播流(IP 230.11.11.11)。

解决方案

防火墙没有IP 230.11.11.11的任何路由：

firepower# show mroute

Multicast Routing Table

Flags: D - Dense, S - Sparse, B - Bidir Group, s - SSM Group,

C - Connected, L - Local, I - Received Source Specific Host Report,

P - Pruned, R - RP-bit set, F - Register flag, T - SPT-bit set,

J - Join SPT

Timers: Uptime/Expires

Interface state: Interface, State

(*, 239.255.255.250), 00:43:21/never, RP 0.0.0.0, flags: SCJ

Incoming interface: Null

RPF nbr: 0.0.0.0

Immediate Outgoing interface list:

OUTSIDE, Forward, 00:05:41/never

INSIDE, Forward, 00:43:21/never

测试组播的一种简单方法是使用ICMP ping工具。在这种情况下，从R2对组播IP地址230.11.11.11发起ping:

L3-Switch# ping 230.11.11.11 re 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 230.11.11.11, timeout is 2 seconds:

...............................

在防火墙上，动态创建mroute，且OIL为空：

firepower# show mroute

Multicast Routing Table

Flags: D - Dense, S - Sparse, B - Bidir Group, s - SSM Group,

C - Connected, L - Local, I - Received Source Specific Host Report,

P - Pruned, R - RP-bit set, F - Register flag, T - SPT-bit set,

J - Join SPT

Timers: Uptime/Expires

Interface state: Interface, State

(192.168.103.62, 230.11.11.11), 00:02:33/00:00:56, flags: SPF  <-- The mroute is added

Incoming interface: OUTSIDE

RPF nbr: 192.168.103.62

Outgoing interface list: Null     <-- The OIL is empty

防火墙上的捕获显示：

firepower# show capture

capture CAPI type raw-data trace interface OUTSIDE [Capturing - 1040 bytes]    <-- There are ICMP packets captured on ingress interface

match icmp host 192.168.103.62 any

capture CAPO type raw-data interface INSIDE [Capturing - 0 bytes]     <-- There are no ICMP packets on egress

match icmp host 192.168.103.62 any

防火墙会为每个ping创建连接，但会以静默方式丢弃数据包：

firepower# show log | include 230.11.11.11

May 17 2022 11:05:47: %FTD-7-609001: Built local-host identity:230.11.11.11       <-- A new connection is created

May 17 2022 11:05:47: %FTD-6-302020: Built inbound ICMP connection for faddr 192.168.1.99/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:47: %FTD-6-302020: Built inbound ICMP connection for faddr 192.168.103.62/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:49: %FTD-6-302021: Teardown ICMP connection for faddr 192.168.1.99/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:49: %FTD-6-302021: Teardown ICMP connection for faddr 192.168.103.62/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:49: %FTD-7-609002: Teardown local-host identity:230.11.11.11 duration 0:00:02  <-- The connection is closed

May 17 2022 11:05:51: %FTD-7-609001: Built local-host identity:230.11.11.11             <-- A new connection is created

May 17 2022 11:05:51: %FTD-6-302020: Built inbound ICMP connection for faddr 192.168.1.99/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:51: %FTD-6-302020: Built inbound ICMP connection for faddr 192.168.103.62/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:53: %FTD-6-302021: Teardown ICMP connection for faddr 192.168.1.99/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:53: %FTD-6-302021: Teardown ICMP connection for faddr 192.168.103.62/6 gaddr 230.11.11.11/0 laddr 230.11.11.11/0 type 8 code 0

May 17 2022 11:05:53: %FTD-7-609002: Teardown local-host identity:230.11.11.11 duration 0:00:02      <-- The connection is closed

注意：LINA ASP丢弃捕获不会显示丢弃的数据包

组播数据包丢弃的主要指示如下：

firepower# show mfib

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second

Other counts: Total/RPF failed/Other drops

Interface Flags: A - Accept, F - Forward, NS - Negate Signalling

IC - Internal Copy, NP - Not platform switched

SP - Signal Present

Interface Counts: FS Pkt Count/PS Pkt Count

(*,224.0.1.39) Flags: S K

Forwarding: 0/0/0/0, Other: 0/0/0

(*,224.0.1.40) Flags: S K

Forwarding: 0/0/0/0, Other: 0/0/0

(192.168.103.62,230.11.11.11) Flags: K         <-- The multicast stream

Forwarding: 0/0/0/0, Other: 27/27/0          <-- The packets are dropped

igmp static-group

在FMC上配置静态IGMP组：

下面是后台部署的内容：

interface Port-channel1.205

vlan 205

nameif INSIDE

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 192.168.1.24 255.255.255.0

igmp static-group 230.11.11.11        <-- IGMP static group is enabled on the interface

ping失败，但ICMP组播流量现在通过防火墙转发：

L3-Switch# ping 230.11.11.11 re 10000

Type escape sequence to abort.

Sending 10000, 100-byte ICMP Echos to 230.11.11.11, timeout is 2 seconds:

............................

firepower# show capture

capture CAPI type raw-data trace interface OUTSIDE [Capturing - 650 bytes]   <-- ICMP packets are captured on ingress interface

match icmp host 192.168.103.62 any

capture CAPO type raw-data interface INSIDE [Capturing - 670 bytes]    <-- ICMP packets are captured on egress interface

match icmp host 192.168.103.62 any

firepower# show capture CAPI

8 packets captured

1: 11:31:32.470541 192.168.103.62 > 230.11.11.11 icmp: echo request

2: 11:31:34.470358 192.168.103.62 > 230.11.11.11 icmp: echo request

3: 11:31:36.470831 192.168.103.62 > 230.11.11.11 icmp: echo request

4: 11:31:38.470785 192.168.103.62 > 230.11.11.11 icmp: echo request

...

firepower# show capture CAPO

11 packets captured

1: 11:31:32.470587 802.1Q vlan#205 P0 192.168.103.62 > 230.11.11.11 icmp: echo request

2: 11:31:34.470404 802.1Q vlan#205 P0 192.168.103.62 > 230.11.11.11 icmp: echo request

3: 11:31:36.470861 802.1Q vlan#205 P0 192.168.103.62 > 230.11.11.11 icmp: echo request

4: 11:31:38.470816 802.1Q vlan#205 P0 192.168.103.62 > 230.11.11.11 icmp: echo request

注意：数据包的跟踪显示不正确的输出(入口接口与出口相同。有关详细信息，请查看Cisco Bug ID CSCvm89673。

firepower# show capture CAPI packet-number 1 trace

1: 11:39:33.553987 192.168.103.62 > 230.11.11.11 icmp: echo request

Phase: 1

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 3172 ns

Config:

Additional Information:

MAC Access list

Phase: 2

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 3172 ns

Config:

Implicit Rule

Additional Information:

MAC Access list

Phase: 3

Type: ROUTE-LOOKUP

Subtype: No ECMP load balancing

Result: ALLOW

Elapsed time: 9760 ns

Config:

Additional Information:

Destination is locally connected. No ECMP load balancing.

Found next-hop 192.168.103.62 using egress ifc OUTSIDE(vrfid:0)

Phase: 4

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 5368 ns

Config:

Implicit Rule

Additional Information:

Phase: 5

Type: CONN-SETTINGS

Subtype:

Result: ALLOW

Elapsed time: 5368 ns

Config:

class-map class-default

match any

policy-map global_policy

class class-default

set connection advanced-options UM_STATIC_TCP_MAP

service-policy global_policy global

Additional Information:

Phase: 6

Type: NAT

Subtype: per-session

Result: ALLOW

Elapsed time: 5368 ns

Config:

Additional Information:

Phase: 7

Type: IP-OPTIONS

Subtype:

Result: ALLOW

Elapsed time: 5368 ns

Config:

Additional Information:

Phase: 8

Type: CLUSTER-REDIRECT

Subtype: cluster-redirect

Result: ALLOW

Elapsed time: 31720 ns

Config:

Additional Information:

Phase: 9

Type: INSPECT

Subtype: np-inspect

Result: ALLOW

Elapsed time: 488 ns

Config:

class-map inspection_default

match default-inspection-traffic

policy-map global_policy

class inspection_default

inspect icmp

service-policy global_policy global

Additional Information:

Phase: 10

Type: INSPECT

Subtype: np-inspect

Result: ALLOW

Elapsed time: 2440 ns

Config:

Additional Information:

Phase: 11

Type: MULTICAST    <-- The packet is multicast

Subtype:

Result: ALLOW

Elapsed time: 976 ns

Config:

Additional Information:

Phase: 12

Type: FLOW-CREATION    <-- A new flow is created

Subtype:

Result: ALLOW

Elapsed time: 56120 ns

Config:

Additional Information:

New flow created with id 5690, packet dispatched to next module

Phase: 13

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 10248 ns

Config:

Additional Information:

MAC Access list

Result:

input-interface: OUTSIDE(vrfid:0)

input-status: up

input-line-status: up

output-interface: OUTSIDE(vrfid:0)

output-status: up

output-line-status: up

Action: allow       <-- The packet is allowed

Time Taken: 139568 ns

提示：可以从源主机使用超时0执行ping操作，还可以检查防火墙mfib计数器：

L3-Switch# ping 230.11.11.11 re 500 timeout 0

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 230.11.11.11, timeout is 0 seconds:

......................................................................

......................................................................

......................................................................

....................

firepower# clear mfib counters

firepower# !ping from the source host.

firepower# show mfib 230.11.11.11

Entry Flags: C - Directly Connected, S - Signal, IA - Inherit A flag,

AR - Activity Required, K - Keepalive

Forwarding Counts: Pkt Count/Pkts per second/Avg Pkt Size/Kbits per second

Other counts: Total/RPF failed/Other drops

Interface Flags: A - Accept, F - Forward, NS - Negate Signalling

IC - Internal Copy, NP - Not platform switched

SP - Signal Present

Interface Counts: FS Pkt Count/PS Pkt Count

(*,230.11.11.11) Flags: C K

Forwarding: 0/0/0/0, Other: 0/0/0

INSIDE Flags: F NS

Pkts: 0/0

(192.168.103.62,230.11.11.11) Flags: K

Forwarding: 500/0/100/0, Other: 0/0/0    <-- 500 multicast packets forwarded. The average size of each packet is 100 Bytes

OUTSIDE Flags: A

INSIDE Flags: F NS

Pkts: 500/0

igmp join-group

在FMC远程上，配置先前配置的静态组配置并配置IGMP加入组：

已部署的配置：

firepower# show run interface Port-channel1.205

!

interface Port-channel1.205

vlan 205

nameif INSIDE

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 192.168.1.24 255.255.255.0

igmp join-group 230.11.11.11       <-- The interface joined the multicast group

IGMP组：

firepower# show igmp group

IGMP Connected Group Membership

Group Address Interface Uptime Expires Last Reporter

230.11.11.11 INSIDE 00:30:43 never 192.168.1.24   <-- The group is enabled on the interface

从源主机，尝试对230.11.11.11 IP执行第一个ICMP组播测试：

L3-Switch# ping 230.11.11.11 repeat 10

Type escape sequence to abort.

Sending 10, 100-byte ICMP Echos to 230.11.11.11, timeout is 2 seconds:

Reply to request 0 from 192.168.1.24, 12 ms

Reply to request 1 from 192.168.1.24, 8 ms

Reply to request 2 from 192.168.1.24, 8 ms

Reply to request 3 from 192.168.1.24, 8 ms

Reply to request 4 from 192.168.1.24, 8 ms

Reply to request 5 from 192.168.1.24, 12 ms

Reply to request 6 from 192.168.1.24, 8 ms

Reply to request 7 from 192.168.1.24, 8 ms

Reply to request 8 from 192.168.1.24, 8 ms

Reply to request 9 from 192.168.1.24, 8 ms

注意：如果您没有看到所有回复，请检查Cisco Bug ID CSCvm90069。

任务4 — 配置IGMP末节组播路由

在FTD上配置末节组播路由，以便将INSIDE接口上收到的IGMP成员身份报告消息转发到OUTSIDE接口。

解决方案

已部署的配置：

firepower# show run multicast-routing

multicast-routing               <-- Multicast routing is enabled

firepower# show run interface Port-channel1.205

!

interface Port-channel1.205

vlan 205

nameif INSIDE

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 192.168.1.24 255.255.255.0

igmp forward interface OUTSIDE        <-- The interface does stub multicast routing

确认

在FTD上启用捕获：

firepower# capture CAPI interface INSIDE trace match igmp any host 230.10.10.10

firepower# capture CAPO interface OUTSIDE match igmp any host 230.10.10.10

确认

要强制IGMP成员报告，您可以使用类似VLC的应用程序：

FTD代理IGMP数据包：

firepower# show capture

capture CAPI type raw-data trace interface INSIDE [Capturing - 66 bytes]  <-- IGMP packets captured on ingress

match igmp any host 230.10.10.10

capture CAPO type raw-data interface OUTSIDE [Capturing - 62 bytes]   <-- IGMP packets captured on egress

match igmp any host 230.10.10.10

FTD更改源IP:

firepower# show capture CAPI

1 packet captured

1: 12:21:12.820483 802.1Q vlan#205 P6 192.168.1.50 > 230.10.10.10 ip-proto-2, length 8    <-- The source IP of the packet on ingress interface

1 packet shown

firepower# show capture CAPO

1 packet captured

1: 12:21:12.820743 192.168.103.91 > 230.10.10.10 ip-proto-2, length 8  <-- The source IP of the packet on egress interface

1 packet shown

如果检查Wireshark中的pcap，可以看到数据包完全由防火墙重新生成（IP标识更改）。

在FTD上创建组条目：

firepower# show igmp group

IGMP Connected Group Membership

Group Address    Interface            Uptime    Expires   Last Reporter

230.10.10.10     INSIDE               00:15:22  00:03:28  192.168.1.50     <-- IGMP group is enabled on the ingress interface

239.255.255.250  INSIDE               00:15:27  00:03:29  192.168.1.50

FTD防火墙创建2个控制平面连接：

firepower# show conn all address 230.10.10.10

9 in use, 28 most used

Inspect Snort:

preserve-connection: 0 enabled, 0 in effect, 0 most enabled, 0 most in effect

IGMP INSIDE 192.168.1.50 NP Identity Ifc 230.10.10.10, idle 0:00:09, bytes 8, flags          <-- Connection terminated on the ingress interface

IGMP OUTSIDE 230.10.10.10 NP Identity Ifc 192.168.103.91, idle 0:00:09, bytes 8, flags       <-- Connection terminated on the egress interface

第一个数据包的跟踪：

firepower# show capture CAPI packet-number 1 trace

6 packets captured

1: 12:21:12.820483 802.1Q vlan#205 P6 192.168.1.50 > 230.10.10.10 ip-proto-2, length 8   <-- The first packet of the flow

Phase: 1

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 5124 ns

Config:

Additional Information:

MAC Access list

Phase: 2

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 5124 ns

Config:

Implicit Rule

Additional Information:

MAC Access list

Phase: 3

Type: ROUTE-LOOKUP

Subtype: No ECMP load balancing

Result: ALLOW

Elapsed time: 7808 ns

Config:

Additional Information:

Destination is locally connected. No ECMP load balancing.

Found next-hop 192.168.1.50 using egress ifc INSIDE(vrfid:0)

Phase: 4

Type: CLUSTER-DROP-ON-SLAVE

Subtype: cluster-drop-on-slave

Result: ALLOW

Elapsed time: 5368 ns

Config:

Additional Information:

Phase: 5

Type: ACCESS-LIST

Subtype:

Result: ALLOW

Elapsed time: 5368 ns

Config:

Implicit Rule

Additional Information:

Phase: 6

Type: IP-OPTIONS

Subtype:

Result: ALLOW

Elapsed time: 5368 ns

Config:

Additional Information:

Phase: 7

Type: NAT

Subtype: per-session

Result: ALLOW

Elapsed time: 5368 ns

Config:

Additional Information:

Phase: 8

Type: CLUSTER-REDIRECT

Subtype: cluster-redirect

Result: ALLOW

Elapsed time: 40504 ns

Config:

Additional Information:

Phase: 9

Type: MULTICAST        <-- The packet is multicast

Subtype:

Result: ALLOW

Elapsed time: 976 ns

Config:

Additional Information:

Phase: 10

Type: FLOW-CREATION       <-- A new flow is created

Subtype:

Result: ALLOW

Elapsed time: 17568 ns

Config:

Additional Information:

New flow created with id 5945, packet dispatched to next module

Phase: 11

Type: FLOW-CREATION      <-- A second flow is created

Subtype:

Result: ALLOW

Elapsed time: 39528 ns

Config:

Additional Information:

New flow created with id 5946, packet dispatched to next module

Phase: 12

Type: NEXTHOP-LOOKUP-FROM-OUTPUT-ROUTE-LOOKUP

Subtype: Lookup Nexthop on interface

Result: ALLOW

Elapsed time: 6344 ns

Config:

Additional Information:

Found next-hop 230.10.10.10 using egress ifc OUTSIDE(vrfid:0)

Phase: 13

Type: CAPTURE

Subtype:

Result: ALLOW

Elapsed time: 9760 ns

Config:

Additional Information:

MAC Access list

Result:

input-interface: INSIDE(vrfid:0)

input-status: up

input-line-status: up

output-interface: INSIDE(vrfid:0)

output-status: up

output-line-status: up

Action: allow

Time Taken: 154208 ns

已知问题

过滤目标区域上的组播流量

您不能为匹配组播流量的访问控制策略规则指定目标安全区域：

FMC用户指南中也介绍了以下内容：

当超过IGMP接口限制时，防火墙会拒绝IGMP报告

默认情况下，防火墙允许接口上最多有500个当前活动联接（报告）。如果超过此阈值，防火墙会忽略来自组播接收器的其他传入IGMP报告。

要检查IGMP限制和活动联接，请运行命令show igmp interface nameif:

asa# show igmp interface inside

inside is up, line protocol is up

Internet address is 10.10.10.1/24

IGMP is enabled on interface

Current IGMP version is 2

IGMP query interval is 125 seconds

IGMP querier timeout is 255 seconds

IGMP max query response time is 10 seconds

Last member query response interval is 1 seconds

Inbound IGMP access group is:

IGMP limit is 500, currently active joins: 500

Cumulative IGMP activity: 0 joins, 0 leaves

IGMP querying router is 10.10.10.1 (this system)

IGMP debug命令debug igmp显示以下输出：

asa# debug igmp

Apr 20 2023 09:37:10: %ASA-7-711001: IGMP: Group 230.1.2.3 limit denied on inside

软件版本中修复了Cisco Bug ID CSCvw60976 允许用户为每个接口配置最多5000个组。

防火墙忽略232.x.x.x/8地址范围的IGMP报告

232.x.x.x/8地址范围用于源特定组播(SSM)。防火墙不支持PIM源特定组播(SSM)功能和相关配置。

IGMP debug命令debug igmp显示以下输出：

asa# debug igmp

Apr 20 2023 09:37:10: %ASA-7-711001: IGMP: Received v2 Report on inside from 10.10.10.11 for 232.179.89.253

Apr 20 2023 09:37:10: %ASA-7-711001: IGMP: group_db: add new group 232.179.89.253 on inside

Apr 20 2023 09:37:10: %ASA-7-711001: IGMP: Exclude report on inside ignored for SSM group 232.179.89.253

Cisco Bug ID CSCsr53916 跟踪增强功能以支持SSM范围。

相关信息

- 用于Firepower威胁防御的组播路由

- 排除Firepower威胁防御和ASA组播PIM故障