目录

简介

找出从ESA的DHAP出现

查看或更新从GUI的DHAP配置

查看或更新从CLI的DHAP配置

相关信息

简介

本文描述如何关于目录收获攻击在您的思科电子邮件安全工具(ESA)的预防(DHAP)警报查找信息。

找出从ESA的DHAP出现

描述DHAP事件的条目位于邮件日志。这是示例邮件日志条目，当DHAP发生时：

Tue Oct 18 00:25:35 2005 Warning: LDAP: Dropping connection due to potential Directory

Harvest Attack from host=(192.168.10.1', None), dhap_limit=4, sender_group=SUSPECTLIST

Note: 默认情况下， /24网络屏蔽在搜索寻找。

参与此查询到CLI为了查看邮件日志：

myesa.local> grep "dhap_limit=" mail_logs

DHAP计数器包括接收访问表(RATS)拒绝和轻量级目录访问协议(LDAP)接受查询拒绝。DHAP设置在邮件流量策略配置。

查看或更新从GUI的DHAP配置

完成这些步骤为了查看或编辑您的从GUI的DHAP配置参数：

1. 导航邮寄策略>邮件流量策略。

2. 点击策略名称为了做编辑或者点击默认策略参数为了查看当前DHAP配置。

3. 做对目录的变动收获攻击预防(DHAP)部分当必要时：

4. 单击提交，然后单击进行为了保存您的更改。

查看或更新从CLI的DHAP配置

为了查看或编辑您的从CLI的DHAP配置参数，输入listenerconfig > Edit [listener number] > hostaccess > default命令：

Default Policy Parameters

==========================

Maximum Message Size: 10M

Maximum Number Of Concurrent Connections From A Single IP: 10

Maximum Number Of Messages Per Connection: 10

Maximum Number Of Recipients Per Message: 50

Directory Harvest Attack Prevention: Enabled

Maximum Number Of Invalid Recipients Per Hour: 25

Maximum Number Of Recipients Per Hour: Disabled

Maximum Number of Recipients per Envelope Sender: Disabled

Use SenderBase for Flow Control: Yes

Spam Detection Enabled: Yes

Virus Detection Enabled: Yes

Allow TLS Connections: No

Allow SMTP Authentication: No

Require TLS To Offer SMTP authentication: No

DKIM/DomainKeys Signing Enabled: No

DKIM Verification Enabled: No

SPF/SIDF Verification Enabled: No

DMARC Verification Enabled: No

Envelope Sender DNS Verification Enabled: No

Domain Exception Table Enabled: No

Accept untagged bounces: No

There are currently 5 policies defined.

There are currently 8 sender groups.

Choose the operation you want to perform:

- NEW - Create a new entry.

- EDIT - Modify an entry.

- DELETE - Remove an entry.

- MOVE - Move an entry.

- DEFAULT - Set the defaults.

- PRINT - Display the table.

- IMPORT - Import a table from a file.

- EXPORT - Export the table to a file.

- RESET - Remove senders and set policies to system default.

[]> default

Enter the default maximum message size. Add a trailing k for kilobytes, M for

megabytes, or no letter for bytes.

[10M]>

Enter the maximum number of concurrent connections allowed from a single IP address.

[10]>

Enter the maximum number of messages per connection.

[10]>

Enter the maximum number of recipients per message.

[50]>

Do you want to override the hostname in the SMTP banner? [N]>

Would you like to specify a custom SMTP acceptance response? [N]>

Would you like to specify a custom SMTP rejection response? [N]>

Do you want to enable rate limiting per host? [N]>

Do you want to enable rate limiting per envelope sender? [N]>

Do you want to enable Directory Harvest Attack Prevention per host? [Y]>

Enter the maximum number of invalid recipients per hour from a remote host.

[25]>

Select an action to apply when a recipient is rejected due to DHAP:

1. Drop

2. Code

[1]>

Would you like to specify a custom SMTP DHAP response? [Y]>

Enter the SMTP code to use in the response. 550 is the standard code.

[550]>

Enter your custom SMTP response. Press Enter on a blank line to finish.

Would you like to use SenderBase for flow control by default? [Y]>

Would you like to enable anti-spam scanning? [Y]>

Would you like to enable anti-virus scanning? [Y]>

Do you want to allow encrypted TLS connections?

1. No

2. Preferred

3. Required

4. Preferred - Verify

5. Required - Verify

[1]>

Would you like to enable DKIM/DomainKeys signing? [N]>

Would you like to enable DKIM verification? [N]>

Would you like to change SPF/SIDF settings? [N]>

Would you like to enable DMARC verification? [N]>

Would you like to enable envelope sender verification? [N]>

Would you like to enable use of the domain exception table? [N]>

Do you wish to accept untagged bounces? [N]>

如果选择做更新，请保证您回到主CLI提示符并且确认所有更改。

相关信息

- 思科电子邮件安全工具–最终用户指南

- 技术支持和文档 - Cisco Systems