Contents

Introduction

什么‘共有的应用程序故障/VTLStatus.py’意味着？

Related Information

Introduction

本文描述‘共有的/VTLStatus.py’应用程序故障。

什么‘共有的应用程序故障/VTLStatus.py’意味着？

在Cisco电子邮件安全工具(ESA)上，有与此问题关连提醒的文本的两个主要变形：

An application fault occurred:

('shared/VTLStatus.py getVTLstatus|42', "<type

'exceptions.UnboundLocalError'>", "local variable 'fp' referenced

before assignment", '[shared/VTLStatus.py getVTLstatus|42]')

An application fault occurred:

('shared/VTLStatus.py getVTLstatus|37', "<type

'exceptions.UnboundLocalError'>", "local variable 'vtl_score_pattern'

referenced before assignment", '[shared/VTLStatus.py getVTLstatus|37]')

此应用程序故障是只影响病毒爆发过滤器状态的图形表示的一个瞬变问题。戒备与在工具上频繁地运行的进程一道发出。因为这样它是可能收到一些次戒备，因此，不用问题是插入的对您的ESA性能，和可能安全被忽略。

思科的推荐是保证您运行AsyncOS当前和支持的版本在您的ESA的。

Related Information

- Cisco电子邮件安全工具-终端用户指南

- Technical Support & Documentation - Cisco Systems