目录

问题

问题

环境：思科使安全电子邮件安全工具(ESA)或Web安全工具(WSA)满意和AsyncOS所有版本。

AsyncOS允许您更改根据您的网络配置的媒介速度设置。允许您设定媒介速度的命令是etherconfig。您有中的选项这七速度设置一：

1. 自动选择

2. 10baseT/UTP半双工

3. 10baseT/UTP全双工

4. 100baseTX半双工

5. 100baseTX全双工

6. 1000baseTX半双工

7. 1000baseTX全双工

登录到您的思科内容安全工具使用CLI并且遵从被概述的步骤此处：

从AsyncOS==============的===============output

example.com> etherconfig

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (Autoselect: 100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

Choose the operation you want to perform:

- EDIT - Edit an Ethernet interface.

- PAIRING - Configure pairing.

[]> edit

Enter the name or number of the ethernet interface you wish to edit.

[]> 2

Please choose the Ethernet media options for the Data 2 interface.

1. Autoselect

2. 10baseT/UTP half-duplex

3. 10baseT/UTP full-duplex

4. 100baseTX half-duplex

5. 100baseTX full-duplex

6. 1000baseTX half-duplex

7. 1000baseTX full-duplex

[1]> 5

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

Choose the operation you want to perform:

- EDIT - Edit an ethernet interface.

- PAIRING - Configure pairing.

[]>

example.com> commit

Please enter some comments describing your changes:

[]> Changed media speed settings from Auto to 100baseTX full-duplex.

[]>Changes committed: Mon Mar 28 13:45:24 2005 PST

example.com> etherconfig

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

===================output finished===================>

请验证更改正确地应用对正确的接口。

关于在以太网接口的媒介设置的更多信息，请参阅在思科内容安全支持门户的AsyncOS高级用户指南。