Contents

问题

问题

有没有方式提供LDAP服务器故障切换或负载均衡？

可以配置Cisco ESA提供多个LDAP故障切换在负荷平衡的和在模式失效。下面显示如何的示例添加在ESA的多LDAP服务器项使用ldapconfig命令从CLI。当提示输入主机名-，您能输入几台主机，分离由逗号：

mail.example.com> ldapconfig

No LDAP server configurations.

Choose the operation you want to perform:

- NEW - Create a new server configuration.

[]> new

Please create a name for this server configuration (Ex: "PublicLDAP"):

[]> PublicLDAP2

Please enter the hostname:

[]> ldap1.example.com, ldap2.example.com, ldap3.example.com

Use SSL to connect to the LDAP server? [N]>

Please enter the port number:

[389]>

Please enter the base or enter 'NONE':

[dc=example,dc=com]>

Select the authentication method to use for this server configuration:

1. Anonymous

2. Password based

[1]>

Name: ldapservers

Hostname: ldap1.example.com,ldap2.example.com,ldap3.example.com Port 389

Authentication Type: anonymous

Base:dc=example,dc=com

Choose the operation you want to perform:

- SERVER - Change the server for the query.

- LDAPACCEPT - Configure whether a recipient address should be accepted or

bounced/dropped.

- LDAPROUTING - Configure message routing.

- MASQUERADE - Configure domain masquerading.

- LDAPGROUP - Configure whether a sender or recipient is in a specified group.

- SMTPAUTH - Configure SMTP authentication.

[]>

Current LDAP server configurations:

1. ldapservers:(ldap1.example.com,ldap2.example.com,ldap3.example.com:389)

Choose the operation you want to perform:

- NEW - Create a new server configuration.

- EDIT - Modify a server configuration.

- DELETE - Remove a server configuration.

[]>

mail.example.com> commit