目录

简介

背景信息

IPS如何在事件日志中显示未转换的实际IP地址？

相关信息

简介

本文档说明Cisco入侵防御系统(IPS)如何在事件日志中显示未转换的实际IP地址，尽管自适应安全设备(ASA)在执行网络地址转换(NAT)后会向IPS发送流量。

背景信息

拓扑

- 服务器的专用IP地址：192.168.1.10

- 服务器的公有IP地址(Nated):  203.0.113.2

- 攻击者的IP地址：203.0.113.10

IPS如何在事件日志中显示未转换的实际IP地址？

解释

当ASA向IPS发送数据包时，它会将该数据包封装到Cisco ASA/安全服务模块(SSM)背板协议报头中。此报头包含一个字段，表示ASA后面内部用户的实际IP地址。

这些日志显示向服务器公有IP地址203.0.113.2发送Internet控制消息协议(ICMP)数据包的攻击者。IPS上捕获的数据包显示ASA在执行NAT后将数据包发送到IPS。

IPS# packet display PortChannel0/0

Warning: This command will cause significant performance degradation

tcpdump: WARNING: po0_0: no IPv4 address assigned

tcpdump: verbose output suppressed, use -v or -vv for full protocol decode

listening on po0_0, link-type EN10MB (Ethernet), capture size 65535 bytes

03:40:06.239024 IP 203.0.113.10 > 192.168.1.10: ICMP echo request, id 512, seq

31232, length 40

03:40:06.239117 IP 203.0.113.10 > 192.168.1.10: ICMP echo request, id 512, seq

31232, length 40

03:40:06.239903 IP 203.0.113.2 > 203.0.113.10: ICMP echo reply, id 512, seq

31232, length 40

03:40:06.239946 IP 203.0.113.2 > 203.0.113.10: ICMP echo reply, id 512, seq

31232, length 40

以下是来自攻击者的ICMP请求数据包的IPS事件日志。

evIdsAlert: eventId=6821490063343  vendor=Cisco  severity=informational

originator:

hostId: IPS

appName: sensorApp

appInstanceId: 1305

time: Dec 24, 2014 03:43:57 UTC  offset=0  timeZone=UTC

signature:   description=ICMP Echo Request  id=2004  version=S666  type=other

created=20001127

subsigId: 0

sigDetails: ICMP Echo Request

interfaceGroup: vs0

vlan: 0

participants:

attacker:

addr: 203.0.113.10  locality=OUT

target:

addr: 192.168.1.10  locality=OUT

os:   idSource=unknown  type=unknown  relevance=relevant

alertDetails: InterfaceAttributes:  context="single_vf" physical="Unknown"

backplane="PortChannel0/0" ;

riskRatingValue: 35  targetValueRating=medium  attackRelevanceRating=relevant

threatRatingValue: 35

interface: PortChannel0/0  context=single_vf  physical=Unknown  backplane=

PortChannel0/0

protocol: icmp

以下是IPS上从内部服务器获取ICMP应答的事件日志。

evIdsAlert: eventId=6821490063344  vendor=Cisco  severity=informational

originator:

hostId: IPS

appName: sensorApp

appInstanceId: 1305

time: Dec 24, 2014 03:43:57 UTC  offset=0  timeZone=UTC

signature:   description=ICMP Echo Reply  id=2000  version=S666  type=other

created=20001127

subsigId: 0

sigDetails: ICMP Echo Reply

interfaceGroup: vs0

vlan: 0

participants:

attacker:

addr: 192.168.1.10  locality=OUT

target:

addr: 203.0.113.10  locality=OUT

os:   idSource=unknown  type=unknown  relevance=relevant

alertDetails: InterfaceAttributes:  context="single_vf" physical="Unknown"

backplane="PortChannel0/0" ;

riskRatingValue: 35  targetValueRating=medium  attackRelevanceRating=relevant

threatRatingValue: 35

interface: PortChannel0/0  context=single_vf  physical=Unknown  backplane=

PortChannel0/0

protocol: icmp

以下是在ASA数据平面上收集的捕获。

1: 09:55:50.203267       203.0.113.10 > 192.168.1.10: icmp: echo request

2: 09:55:50.203877       203.0.113.2 > 203.0.113.10: icmp: echo reply

3: 09:55:51.203541       203.0.113.10 > 192.168.1.10: icmp: echo request

4: 09:55:51.204182       203.0.113.2 > 203.0.113.10: icmp: echo reply

解码的ASA数据平面捕获。

相关信息

- 适用于IPS 7.1的思科入侵防御系统传感器CLI配置指南

- 通过Cisco ASA防火墙的数据包流

- 技术支持和文档 - Cisco Systems