目录

简介

背景信息

思科安全终端Mac/Linux CLI

导航至CLI

可用的CLI命令

CLI命令用法

其他信息

简介

本文档介绍可用于Linux和MacOS上的安全终端连接器的命令行界面(CLI)命令。

背景信息

CLI命令可供系统上的所有用户使用；但是，某些命令取决于策略配置和/或根权限。依赖于此的命令将在本文中介绍。

思科安全终端Mac/Linux CLI

导航至CLI

当系统上安装并运行安全终端连接器时，安全终端CLI可用：

- 打开Mac/Linux上的Terminal（终端）窗口。

- 使用以下路径运行CLI:

- 在Linux上:/opt/cisco/amp/bin/ampcli

- 在Mac上:/opt/cisco/amp/ampcli

- 当CLI启动时，将显示以下消息：

ampcli - Cisco Secure Endpoint Connector Command Line Interface

Interactive mode

Enter 'q' or Ctrl+c to Exit

[logger] Set minimum reported log level to notice

Trying to connect...

Connected.

ampcli>

可用的CLI命令

注意：所有可用的CLI命令也可直接从命令行运行，例如/opt/cisco/amp/bin/ampcli helpor/opt/cisco/amp/ampcli helpworks与启动CLI和runhelp相同。

- 对于CLI命令的完整列表，用户可以运行help:

ampcli> help

about               About Cisco Secure Endpoint connector

bp                  Show and sync behavioral protection signatures

* See 'bp help' for more.

clamav              Show and sync ClamAV definitions

* See 'clamav help' for more.

definitions         Show virus definitions

defupdate           Update virus definitions

exclusions          List custom exclusions

history             Show event history

* See 'history help' for more.

notify              Toggle notifications

policy              Show policy

quarantine          List/restore quarantined file(s)

* See 'quarantine help' for more.

quit (or q)         Quit ampcli interactive mode

scan                Initiate/pause/stop a scan

* See 'scan help' for more.

status              Get ampdaemon status

* See 'status help' for more.

sync                Sync policy

verbose             Toggle verbose mode

- 命令 扫描, 历史记录, 隔离 clamav和bptake additional parameters，如果用户随同运行该命令，则会对其进行描述 帮助:

ampcli> scan help

Supported scan parameters:

flash Perform a flash scan

full Perform a full scan

custom Perform a custom scan on a file or directory (recursive)

e.g. '...> scan custom file_or_directory_to_scan'

pause Pause a running scan

resume Resume a paused scan

cancel Cancel a running scan

list List scheduled scans

ampcli> history help

Supported history parameters:

list List history

* Listing starts at page 1. Each time 'list' is run we move to

the next page.  Specify a page number to jump directly to

that page.

pagesize Set history page size (max: 12)

* e.g. 'ampcli> history pagesize 10'

ampcli> quarantine help

Supported quarantine parameters:

list List currently quarantined files

* Listing starts at page 1. Each time 'list' is run we move to

the next page.  Specify a page number to jump directly to

that page.

restore Restore file by quarantine id

e.g. '...> quarantine restore

' run 'quarantine list' first to find

in listing

ampcli> clamav help

Supported clamav parameters:

status        Display engine and definition information

sync          Synchronizes ClamAV definitions

ampcli> bp help

Supported bp parameters:

status        Display engine and definition information

sync          Synchronizes BP signatures

NOTE:使用帮助参数，为给定命令提供支持的输入参数，状态帮助除外除外.获得帮助使用status CLI命令发出，它将显示所有支持的连接器状态的列表，以及每种状态的简短说明和可能原因。表格中当前连接器状态由**表示。

CLI命令用法

- about — 提供连接器的版本和GUID等信息。

ampcli> about

Cisco Secure Endpoint Connector v1.16.0.123

Copyright (c) 2013-2021 Cisco Systems, Inc. All rights reserved.

This product incorporates open source software; refer to

/opt/cisco/amp/doc/acknowledgement.txt for details.

[ 22b608b3-b20e-4bd3-8b53-def824acce8a ]

- bp(此选项仅适用于Linux连接器版本1.22.0及更高版本（不在Mac上）)

- status — 显示行为保护引擎和定义信息

- 如果未启用行为保护，则不提供其他引擎或签名信息：

ampcli> bp status

Behavioral Protection is not enabled

- 如果启用了行为保护，则会显示引擎、模式和签名信息：

ampcli> bp status

APDE Engine Version:              3.1.0.0

BP Mode:                          Protect

BP Signature Serial Number:       8071

BP Signature Last Loaded:         2023-05-02 05:44:09 PM

- sync — 同步行为保护签名

- 克拉马夫

- 状态 — 显示clamav引擎和定义信息

ampcli> clamav status

Definition Version:       ClamAV(bytecode.cvd: 334, daily.cvd: 26893, main.cvd: 62)

Definitions Published:    bytecode.cvd: 22 Feb 2023 16-33 -0500

daily.cvd: 01 May 2023 03-22 -0400

main.cvd: 16 Sep 2021 08-32 -0400

Definitions Last Updated: 2023-05-01 04:01:55 PM

- sync — 同步clamav签名

- defupdate  — 向云发送更新病毒定义的请求。

- 排除  — 显示连接器的当前例外项：

- 此设置还必须在连接器策略中启用，以便显示例外项。

ampcli> exclusions

Exclusions:

Path /home

Path /mnt/hgfs

Regular Expression /var/log/.*\.log

- 历史记录

- history list — 列出连接器活动的历史记录（扫描、隔离区等）

- history pagesize <numeric_value> — 设置历史记录视图的pagesize（最多12个）

ampcli> history pagesize 12

Page size set to 12

- 隔离 (此选项仅适用于Mac连接器版本1.21.0及更高版本（不适用于Linux）)

- isolate stop <token> — 使用用于启动隔离会话的令牌停止终端隔离会话

- notify — 在CLI中打开/关闭连接器通知。

- 此设置还必须在连接器策略中启用。

- 在Mac上，这不会影响用户界面中的通知。

ampcli> notify

Notifications set to on

ampcli> notify

Notifications set to off

- policy — 显示连接器的当前策略：

ampcli> policy

Quarantine Behavior:

Quarantine malicious files.

Protection:

Monitor program install.

Monitor program start.

Passive on-execute mode.

Proxy: NONE

Notifications: Do not display cloud notifications.

Policy: Audit Policy for Cisco Secure Endpoint (#5755)

Last Updated: 2020-01-08 04:49 PM

Definition Version:   ClamAV(bytecode.cvd: 331, daily.cvd: 25721, main.cvd: 59)

Definitions Last Updated: 2020-01-08 05:09 PM

对于Mac连接器版本1.16.0及更高版本，对于Linux连接器版本1.17.0及更高版本，策略包括Orbital的策略状态：

Orbital: Enabled

轨道策略设置有两个值：

1. 已启用：通过策略启用轨道。

2. 禁用：通过策略禁用轨道。

对于Mac连接器版本1.21.0及更高版本（不在Linux上），策略包括终端隔离的策略状态：

Isolation: Enabled

隔离策略设置有两个值：

1. 已启用：通过策略启用终端隔离。

2. 已禁用：通过策略禁用终端隔离。

- 状态 — 以JSON格式显示连接器状态

- posture prettyprint - pretty print JSON格式的打印状态

ampcli> posture

{"running": true, "connected": true, "connector_version": "1.19.1.1419", "agent_uuid": "e03ecde8-1aee-4d15-8bca-100e952ee4b9", "offline_engine": "ClamAV", "offline_engine_version": "0.103.5", "definition_version": "osx.cvd:1152", "last_definition_update_published": "osx.cvd: 05 May 2022 13-00 -0400", "last_definition_update_success": 1651857785, "last_scan": 1651857897, "last_scan_status": false, "protect_file_mode": true, "protect_process_mode": true, "scans": [{"scan_type": "flash", "scan_in_progress": false, "last_scan_finished": 1651857039}, {"scan_type": "full", "scan_in_progress": false, "last_scan_finished": 1651857897}, {"scan_type": "custom", "scan_in_progress": false, "last_scan_finished": 1651856819}], "engines": [{"enabled": true, "name": "ClamAV", "version": "0.103.5", "definitions": [{"version": 1152, "name": "osx.cvd", "timestamp": 1651770000, "last_successful_update": 1651857785}]}]}

- 隔离(此选项仅对具有root权限的用户可用。)

- 隔离列表  — 列出系统上的隔离项目。

- quarantine restore <quarantine_id> — 通过隔离id(可通过quarantine lists命令找到)恢复隔离文件。

- quit（或q）  — 退出安全终端Mac/Linux连接器CLI。

- 扫描

- scan flash — 执行系统的快速扫描。

- scan full — 执行系统的完全扫描。

- scan custom <path_to_scan>  — 扫描指定的文件或目录。

- 扫描暂停  — 暂停当前运行的所有扫描。

- 扫描恢复  — 恢复所有当前暂停的扫描。

- 扫描取消  — 取消当前运行的所有扫描。

- 扫描列表  — 列出要在系统上执行的所有计划扫描。

- status — 提供系统上连接器的当前状态。

- 状态帮助 — 显示一个表，其中包含所有连接器状态、当前连接器状态、每个状态状态的说明以及给定状态的原因。

ampcli> status

Status: Connected

Mode: Normal

Scan: Ready for scan

Last Scan: 2020-01-22 03:57 PM

Policy: Audit Policy for Cisco Secure Endpoint (#5755)

Command-line: Enabled

Faults: None

如果端点存在故障，故障字段显示每个严重性级别（严重/主要/次要）的故障数。从连接器版本1.12.3开始，CLI显示故障ID字段，显示终端上出现的每个故障的故障代码。CLI输出与终端上存在的每个故障相关的指南。

例如：

Faults: 1 Critical, 1 Major

Fault IDs: 1, 3

ID 1 - Critical: The system extensions failed to load. Approve the system extensions in Security & Privacy System Preferences.

ID 3 - Major: Full Disk Access not granted. Grant access to the ampdaemon executable in Security & Privacy System Preferences.

ampcli> status help

Status  Description  Reason(s)

=================================================================================

| Initializing...  | Program starting/loading.  | --

|  |  |

| Provisioning...  | Endpoint identity  | --

|  | enrollment/subscription.  |

|  |  |

| Provisioning  | Endpoint identity  | Cannot reach AMP services.

| failed, retrying  | enrollment/subscription failed.  | Missing SSL certificates.

|  | Connector will retry.  |

|  |  |

| Registering...  | Registering endpoint identity.  | --

|  |  |

| Registration  | Endpoint identity registration  | Cannot reach AMP services.

| failed, retrying  | failed. Connector will retry.  | Missing SSL certificates.

|  |  |

| Connecting...  | Registering with disposition  | --

|  | service.  |

|  |  |

| Connection failed,  | Registration with disposition  | Cannot reach AMP services.

| retrying  | service failed. Connector will  | Missing SSL certificates.

|  | retry.  |

|  |  |

| ** Connected  | Enrollment and registration  | --

|  | succeeded. Connected to AMP  |

|  | services. Connector is operating  |

|  | normally.  |

|  |  |

| Disabled  | Connector is not operational.  | AMP subscription is invalid

|  |  | or has expired.

|  |  |

| Disconnected,  | Lost connection to the disposition  | Network connection to the

| retrying  | service after an initial  | disposition service has been

|  | connection was established.  | interrupted.

|  | Connector will attempt to  |

|  | reconnect.  |

|  |  |

| Offline (the  | The local network has been  | Cable disconnected.

| network is down)  | disconnected.  | The network interface is

|  |  | disabled.

|  |  |

=================================================================================

** indicates the current status of the Connector

对于Mac连接器版本1.16.0及更高版本，对于Linux连接器版本1.17.0及更高版本，状态包括计算机上轨道的当前状态：

Orbital: Enabled (Running)

轨道状态有三个值：

1. Enabled(Running)：表示当前策略已启用Orbital，并且Orbital服务当前正在计算机上运行。

2. Enabled(Not Running)：表示当前策略已启用Orbital，但Orbital服务当前未在计算机上运行。

3. 已禁用：表示当前策略未启用轨道。

对于Mac连接器版本1.21.0及更高版本（不在Linux上），status包括计算机上终端隔离的当前状态：

Isolation: Isolated

轨道状态有三个值：

1. 隔离：表示当前策略已启用终端隔离，并且计算机与网络隔离。

2. Not Isolated：表示当前策略已启用Endpoint Isolation，且计算机未隔离。

3. Disabled in Policy：表示当前策略未启用Endpoint Isolation。

- 同步  — 将连接器与云同步以确保最新策略。

- 详细  — 打开/关闭CLI的详细日志。

ampcli> verbose

Verbose mode set to on

ampcli> verbose

Verbose mode set to off

其他信息

技术支持和文档 - Cisco Systems

思科安全终端 — 用户指南