目录

简介

Windows对安全终端Windows连接器8.x版的支持（仅限64位）

旧版Windows支持安全终端Windows Connector 7.x（64位或32位）

简介

本文档介绍支持版本的安全终端Windows连接器的操作系统兼容性。

注意：私有云支持高达8.4.1的Windows连接器版本。

Windows对安全终端Windows连接器版本8.x的支持（仅限64位）

此信息现在可在安全终端联机帮助中找到，地址为https://console.amp.cisco.com/help/en/Content/Secure_Endpoint_User_Guide/Windows_System_Requireme.html

旧版Windows支持安全终端Windows Connector 7.x（64位或32位）

此信息现在可在安全终端联机帮助中找到，地址为https://console.amp.cisco.com/help/en/Content/Secure_Endpoint_User_Guide/Windows_System_Requireme.html