目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档提供了集线器动态多点VPN(DMVPN)的示例配置，该VPN使用通用路由封装(GRE)通过IPSec与增强型内部网关路由协议(EIGRP)、网络地址转换(NAT)和基于情景的访问控制(CBAC)。

先决条件

要求

必须先使用 crypto isakmp policy 命令定义 Internet 密钥交换 (IKE) 策略，然后才能创建多点 GRE (mGRE) 和 IPsec 隧道。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 中心路由器上的 Cisco IOS® 软件版本 12.2(15)T1 和分支路由器上的 Cisco IOS® 软件版本 12.3(1.6)

- Cisco 3620 作为中心路由器，两个 Cisco 1720 路由器和一个 Cisco 3620 路由器作为分支路由器

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

配置

本文档使用如下所示的配置。

- 中心 - 3620-B

- 分支 1 - 3620-A

- 分支 2 - 1720-b

- 分支 3 - 1720-A

中心 - 3620-B

3620-B#write terminal

Building configuration...

Current configuration : 2607 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

!

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

!--- Here "dmvpn" is the word that is used as the key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip split-horizon eigrp 1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnels.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.117.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0/0.

ip nat inside source list 110 interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 permit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-B#

分支 1 - 3620-A

3620-A#write terminal

Building configuration...

Current configuration : 2559 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnel.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.118.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Ethernet0/0.

ip nat inside source list 110 interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 permit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-A#

分支 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2543 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

boot system flash flash:c1700-ny-mz.122-8.YJ

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outside interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.116.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Dialer1.

ip nat inside source list 110 interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

分支 3 - 1720-A

1720-A#write terminal

Building configuration...

Current configuration : 1770 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outside interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.120.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0.

ip nat inside source list 110 interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-A#

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show crypto isakmp sa - 显示 ISAKMP 安全关联 (SA) 的状态。

- show crypto engine connections active - 按 SA 显示总加密/解密。

- show crypto ipsec sa - 显示有关活动隧道的统计数据。

- show ip route - 显示路由表。

- show ip eigrp neighbor - 显示 EIGRP 邻居。

- show ip nhrp - 显示 IP 下一跳解析协议 (NHRP) 缓存，可选择限制为特定接口的动态或静态缓存条目。

- show crypto socket - 显示 NHRP 和 IPSec 之间的加密套接字表。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- debug crypto ipsec — 显示 IPSec 事件。

- debug crypto isakmp — 显示关于 IKE 事件的消息。

- debug crypto engine - 显示来自加密引擎的信息。

- debug crypto socket 显示有关 NHRP 和 IPSec 之间的套接字表的信息。

- debug nhrp - 显示有关 NHRP 事件的信息。

- debug nhrp packet - 显示有关 NHRP 数据包的信息。

- debug tunnel protection - 显示有关动态 GRE 隧道的信息。

有关 IPsec 故障排除的其他信息，请参阅 IP 安全故障排除 - 了解和使用 debug 命令。

相关信息

- DMVPN 和 Cisco IOS 概述

- IPSec 支持页面

- 技术支持和文档 - Cisco Systems