目录

简介

先决条件

要求

使用的组件

背景信息

配置

网络图

配置

使用FMC在FTD上配置IPSec VPN

使用FMC在FTD上配置环回接口

在ASA上配置IPSec VPN

在ASA上配置环回接口

使用FMC在FTD上配置重叠BGP

在ASA上配置重叠BGP

验证

FTD上的输出

ASA上的输出

故障排除

简介

本文档介绍如何在自适应安全设备(ASA)与Firepower威胁防御(FTD)之间配置基于路由的站点到站点VPN隧道，该隧道由具有动态路由边界网关协议(BGP)的Firepower管理中心(FMC)管理。

先决条件

要求

Cisco 建议您了解以下主题：

- 对IPsec站点到站点VPN的基本了解

- FTD和ASA上的BGP配置

- 使用FMC的经验

使用的组件

- Cisco ASAv 9.20(2)2版

- 思科FMC版本7.4.1

- 思科FTD版本7.4.1

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

背景信息

基于路由的VPN允许确定要加密或通过VPN隧道发送的相关流量，并且使用流量路由而不是策略/访问列表，就像在基于策略或基于加密映射的VPN中一样。 加密域设置为允许任何进入IPSec隧道的流量。IPsec本地和远程流量选择器设置为0.0.0.0/0.0.0.0。路由到IPsec隧道的所有流量都会被加密，无论源/目标子网如何。

本文档重点介绍将动态路由BGP作为重叠的静态虚拟隧道接口(SVTI)配置。

配置

本节介绍在ASA和FTD上通过SVTI IPSec隧道建立BGP邻居关系所需的配置。

网络图

网络图

配置

使用FMC在FTD上配置IPSec VPN

步骤1:导航到Devices > VPN > Site To Site。

第二步：点击+Site to Site VPN。

站点到站点 VPN

第三步：提供Topology NameRoute Based (VTI) ，然后选择Type of VPN（VPN类型）。选择IKE Version。

在本演示中：

拓扑名称：ASAv-VTI

IKE版本：IKEv2

VPN拓扑

第四步：选择需要在其上配置隧道的Device。您可以添加新的虚拟隧道接口(点击+图标)，或从现有列表中选择一个虚拟隧道接口。

终端节点A

第五步：定义New Virtual Tunnel Interface的参数。单击。Ok

在本演示中：

名称：ASA-VTI

说明（可选）：使用外网ASA的VTI隧道

安全区域：VTI区域

隧道ID：1

IP地址：169.254.2.1/24

隧道源：GigabitEthernet0/1（外部）

IPsec隧道模式：IPv4

虚拟通道接口

第六步：点击OK弹出窗口，提示已创建新的VTI。

虚拟隧道接口已添加

步骤 7.在Virtual Tunnel Interface下选择新创建的VTI或VTI。提供节点B（对等设备）的信息。

在本演示中：

设备：外联网

设备名称：ASAv-Peer

终端IP地址：10.197.226.187

终端节点B

步骤 8导航到IKE选项卡。点击。您可以选择使用预定义的Policy，或单击Policy选项卡旁边的+按钮以创建一个新按钮。

第9步（可选，如果创建新的IKEv2策略。） 为策略提供Name并选择要在策略中使用的Algorithms。单击。Save

在本演示中：

名称：ASAv-IKEv2-policy

完整性算法：SHA-256

加密算法：AES-256

PRF算法：SHA-256

Diffie-Hellman组：14

IKEv2-策略

步骤 10选择新创建的Policy或Policy存在的。选择Authentication Type。如果使用预共享手动密钥，请在Key和Confirm Key 框中输入密钥。

在本演示中：

策略：ASAv-IKEv2-Policy

身份验证类型：预共享手动密钥

身份验证

步骤 11导航到选IPsec 项卡。点击，可选择使用预定义的IKEv2 IPsec建议或创建一个新建议。单击选IKEv2 IPsec Proposal 项卡旁边的+按钮。

第12步（可选，如果创建新的IKEv2 IPsec提议。） 输入建议书的Name命令，并选择要在建议书中使用的Algorithms。单击。Save

在本演示中：

名称：ASAv-IPSec-Policy

ESP哈希：SHA-256

ESP加密：AES-256

IKEv2-IPsec-Proposal

步骤 13 从可用建议列表中选择新创建的Proposal或Proposal。单击。OK

变换集

第14步：（可选）选择Perfect Forward Secrecy设置。配置IPsec Lifetime Duration and Lifetime Size。

在本演示中：

完全正向保密：模数组14

生存期持续时间：28800（默认值）

生存期大小：4608000（默认值）

PFS配置

步骤 15检查配置的设置。单击Save，如图所示。

保存配置

使用FMC在FTD上配置环回接口

导航到Devices > Device Management。编辑需要配置环回的设备。

步骤1:转到访问 。Interfaces > Add Interfaces > Loopback Interface

导航到环回接口

第二步：输入名称“loopback”，提供环回ID“1”并启用接口。

启用环回接口

第三步：配置接口的IP地址，点击OK 。

为环回接口提供IP地址

在ASA上配置IPSec VPN

!--- Configure IKEv2 Policy ---!

crypto ikev2 policy 1

encryption aes-256

integrity sha256

group 14

prf sha256

lifetime seconds 86400

!--- Enable IKEv2 on the outside interface ---!

crypto ikev2 enable outside

!---Configure Tunnel-Group with pre-shared-key---!

tunnel-group 10.197.226.222 type ipsec-l2l

tunnel-group 10.197.226.222 ipsec-attributes

ikev2 remote-authentication pre-shared-key *****

ikev2 local-authentication pre-shared-key *****

!--- Configure IPSec Policy ---!

crypto ipsec ikev2 ipsec-proposal ipsec_proposal_for_FTD

protocol esp encryption aes-256

protocol esp integrity sha-256

!--- Configure IPSec Profile ---!

crypto ipsec profile ipsec_profile_for_FTD

set ikev2 ipsec-proposal FTD-ipsec-proposal

set pfs group14

!--- Configure VTI ---!

interface Tunnel1

nameif FTD-VTI

ip address 169.254.2.2 255.255.255.0

tunnel source interface outside

tunnel destination 10.197.226.222

tunnel mode ipsec ipv4

tunnel protection ipsec profile ipsec_profile_for_FTD

!--- Configure the WAN routes ---!

route outside 0.0.0.0 0.0.0.0 10.197.226.1 1

在ASA上配置环回接口

interface Loopback1

nameif loopback

ip address 1.1.1.1 255.255.255.0

使用FMC在FTD上配置重叠BGP

导航到配置VTI隧道的设备Devices > Device Management.Edit，然后导航到Routing >General Settings > BGP。

步骤1:启用BGP并配置自治系统(AS)编号和路由器ID，如此图中所示。

设备FTD和ASA上的AS编号必须相同。

路由器ID用于标识参与BGP的每个路由器。

导航到配置BGP

第二步：导航到BGP > IPv4(CDP)并在FTD上启用BGP IPv4。

启用BGP

第三步：在Neighbor选项卡下，添加ASAv VTI隧道IP地址作为邻居并启用邻居。

添加BGP邻居

第四步：在Networks下，添加要通过BGP通告但需要通过VTI隧道的网络，在本例中为loopback1。

添加BGP网络

第五步：所有其他BGP设置都是可选的，您可以根据您的环境对其进行配置。验证配置并单击Save。

保存BGP配置

第六步：部署所有配置。

部署

在ASA上配置重叠BGP

router bgp 1000

bgp log-neighbor-changes

bgp router-id 10.1.1.2

address-family ipv4 unicast

neighbor 169.254.2.1 remote-as 1000

neighbor 169.254.2.1 transport path-mtu-discovery disable

neighbor 169.254.2.1 activate

network 1.1.1.0 mask 255.255.255.0

no auto-summary

no synchronization

exit-address-family

验证

使用本部分可确认配置能否正常运行。

FTD上的输出

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:20, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id         Local                   Remote                fvrf/ivrf          Status       Role

666846307      10.197.226.222/500      10.197.226.187/500    Global/Global      READY        RESPONDER

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1201 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0xa14edaf6/0x8540d49e

#show crypto ipsec sa

interface: ASAv-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.222

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.187

#pkts encaps: 45, #pkts encrypt: 45, #pkts digest: 45

#pkts decaps: 44, #pkts decrypt: 44, #pkts verify: 44

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.222/500, remote crypto endpt.: 10.197.226.187/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: 8540D49E

current inbound spi : A14EDAF6

inbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4331517/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

000001FFF 0xFFFFFFFF

outbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4101117/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.1, local AS number 1000

BGP table version is 5, main routing table version 5

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 21/19 prefixes, 24/22 paths, scan interval 60 secs

Neighbor           V         AS      MsgRcvd      MsgSent       TblVer      InQ      OutQ      Up/Down      State/PfxRcd

169.254.2.2      4         1000   22               22                  5             0         0            00:19:42        1

#show bgp neighbors

BGP neighbor is 169.254.2.2, vrf single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.2

BGP state = Established, up for 00:19:49

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent    Rcvd

Opens             1        1

Notifications:    0        0

Updates:          2        2

Keepalives:      19      19

Route Refresh: 0        0

Total:               22      22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.2

BGP table version 5, neighbor version 5/0

Output queue size : 0

Index 15

15 update-group member

Sent     Rcvd

Prefix activity:             ----    ----

Prefixes Current:            1          1         (Consumes 80 bytes)

Prefixes Total:              1          1

Implicit Withdraw:           0          0

Explicit Withdraw:           0          0

Used as bestpath:           n/a        1

Used as multipath:           n/a        0

Outbound           Inbound

Local Policy Denied Prefixes:   --------            -------

Bestpath from this peer:         1                          n/a

Invalid Path:                    1                          n/a

Total:                           2                            0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.2

Connections established 7; dropped 6

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B        1.1.1.0 255.255.255.0 [200/0] via 169.254.2.2, 00:19:55

ASA上的输出

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:7, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id    Local                       Remote                     fvrf/ivrf             Status           Role

442126361    10.197.226.187/500          10.197.226.222/500         Global/Global          READY           INITIATOR

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1200 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0x8540d49e/0xa14edaf6

#show crypto ipsec sa

interface: FTD-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.187

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.222

#pkts encaps: 44 #pkts encrypt: 44, #pkts digest: 44

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify: 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.187/500, remote crypto endpt.: 10.197.226.222/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: A14EDAF6

current inbound spi : 8540D49E

inbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4147198/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x007FFFFF

outbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (3916798/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.2, local AS number 1000

BGP table version is 7, main routing table version 7

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 5/3 prefixes, 7/5 paths, scan interval 60 secs

Neighbor        V      AS      MsgRcvd      MsgSent     TblVer    InQ     OutQ     Up/Down     State/PfxRcd

169.254.2.1   4     1000       22             22       7       0         0      00:19:42      1

#show bgp neighbors

BGP neighbor is 169.254.2.1, context single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.1

BGP state = Established, up for 00:19:42

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent     Rcvd

Opens:             1         1

Notifications:    0         0

Updates:          2         2

Keepalives:      19       19

Route Refresh: 0         0

Total:             22       22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.1

BGP table version 7, neighbor version 7/0

Output queue size : 0

Index 5

5 update-group member

Sent      Rcvd

Prefix activity:     ----   ----

Prefixes Current:    1         1 (Consumes 80 bytes)

Prefixes Total:      1         1

Implicit Withdraw:   0         0

Explicit Withdraw:   0         0

Used as bestpath:  n/a       1

Used as multipath:  n/a       0

Outbound        Inbound

Local Policy Denied Prefixes:     --------        -------

Bestpath from this peer:           1              n/a

Invalid Path:                      1              n/a

Total:                             2              0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.1

Connections established 5; dropped 4

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B       2.2.2.0 255.255.255.0 [200/0] via 169.254.2.1, 00:19:55

故障排除

本部分提供了可用于对配置进行故障排除的信息。

debug crypto ikev2 platform 255

debug crypto ikev2 protocol 255

debug crypto ipsec 255

debug ip bgp all

- 仅支持IPv4接口以及IPv4、受保护网络或VPN负载（不支持IPv6）。